Max Count [r.u.]

40 50 60 70 80 90 100 110 120 130 140

Vertex [r.u.]

40 50 60 70 80 90 100 110 120 130 140 / ndf

2χ 673.890 / 1300 q 0.419 ± -4.541 m 0.006 ± 1.012 ± ± M4R1