x vs y (mm)

-5000-4000-3000-2000-1000 0 10002000300040005000

-5000

-4000

-3000

-2000

-1000 0 1000

2000

3000

4000

5000 h_scplot^{h_scplot}_{Entries 10046}

Mean x -5.239 Mean y -2.169 RMS x 1174 RMS y 775.1 0 0 0 2 10039 5 0 0 0

h_scplot

x vs y (mm)

-5000-4000-3000-2000-1000 0 10002000300040005000

-5000

-4000

-3000

-2000

-1000 0 1000

2000

3000

4000

5000 h_scplot^{h_scplot}_{Entries 10046}

Mean x -5.239 Mean y -2.169 RMS x 1174 RMS y 775.1 0 0 0 2 10039 5 0 0 0

h_scplot

Entries 10046

h_scplot