0.1

0.15

0.2

0.25

0.3

0.35

0.4

0.45

0.5

1016 1017 1018 1019 1020 1021 1022 1023

1719. / 1668 P1 0.27546E-06 0.6697E-09

475.1 / 506 P1 0.31343E-06 0.9905E-09

σ_b(MeV) = 7.79113E-07 E_b^2 (MeV) σ_b(MeV) = 8.86503E-07 E_b^2 (MeV)

sqrt(s) (MeV)

CMBes (MeV)