KLOE MASTHEAD GUIDELINES Physicists (including dottorandi), mathematicians and engineers: start to be on the masthead after three equivalent person-month work on any facet of KLOE until official resignation from KLOE.

Laureandi: start to be on masthead after six months’ work on KLOE and stay on masthead until six months after graduation.