Run number

C. M. Energy spread (MeV)

sqrt(s) (MeV)

29/08/02

20/06/02

03/05/02

sqrt(s) C.M. Energy spread Avg C.M. Energy spread 0.1

0.15

0.2

0.25

0.3

0.35

0.4

0.45

0.5

23500 24000 24500 25000 25500 26000 26500 27000

1016

1017

1018

1019

1020

1021

1022

1023

23500 24000 24500 25000 25500 26000 26500 27000