M_{ππ} (MeV)

Events

Data Background

M_{πγ} (MeV)

Events

0 2000

4000

6000

200 300 400 500 600 700 800 900 1000 1100 1200

0 2000

4000

6000

8000

0 100 200 300 400 500 600 700 800 900 1000