E_γ (MeV)

Events

Data MC Signal ηγ_7 ηπγ 3γ

0

2000

4000

6000

0 200 400 600 0

100

200

0 10 20 30 40 50

0

200

400

0 5 10 15 20

χ^2 _{ηγ3}

Events χ^2 _{πγ}

Events χ^2 _{ηπγ}

Events

0 500 1000

1500

2000

0 5 10 15 20