0 1000

2000

3000

4000

600 800 1000

m (MeV)

Events

0 1000

2000

3000

4000

600 800 1000

m (MeV)

Events

-4 -2 0 2 4

600 800 1000

m (MeV)

Fit residuals

-4 -2 0 2 4

600 800 1000

m (MeV)

Fit residuals

0 200 400 600 800

900 950 1000

m (MeV)

Events - non scalar

0 200 400 600 800

900 950 1000

m (MeV)

Events - non scalar