χ^2 _{Fit2}/ndf

Data Signal ϕ5Sγ Other backgr. a)

ΔM_{γγ}/σ_M b)

M_{πγ} (MeV) c)

cosΨ d)

M_{πγ} (MeV) e)

M_{πγ} (MeV) f)

0

5000

0 2 4 6 8 10 0

10000

-10 -5 0 5 10

0

5000

700 800 900 0

2000

0 0.2 0.4 0.6 0.8 1

0

2500

700 800 900 0

500

700 800 900