0

10000

0 20 40 0

1000

200 400

0 2000

4000

-1 0 1 0

20000

700 800

0 10000

20000

700 800 0

2000

700 800

a) Data Signal ϕ Bkg a_1π Bkg

χ^2 _{KFit}

b)

χ^2 _{KFit} c)

cos θ_Α

d)

M_{rec} (MeV) evt/2.2 MeV

e)

M_{rec} (MeV) evt/2.2 MeV

f)

M_{rec} (MeV) evt/2.2 MeV