Mean 0.00244 RMS 0.0587 p0 395±

2e+05 p1 1.94e-05 ± -1e-03 p2 3.7e-05 ± 2e-02 p3 421±

8e+04 p4 4.6e-05 ± 3e-03 p5 1.1e-04 ± 5e-02

± ± ± ±

-0.4 -0.2 0 0.2 0.4 0

100

200

310 ×_{Mean 0.00244}

± ± ± ±

Events / 0.08

gen - Y recY