Mean 7.53e-05 RMS 0.0355 p0 757±

8e+05 p1 1.0e-05 ± 4e-05 p2 1.6e-05 ± 2e-02 p3 678±

2e+05 p4 3.2e-05 ± 1e-04 p5 5.8e-05 ± 4e-02

-0.4 -0.2 0 0.2 0.4 0

500

1000 310 ×_{Mean 7.53e-05}

± ±

± ±

Events / 0.08

gen - X recX