Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5111 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5112 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5121 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2211 338 -0.3644E-01 0.3153 37.00 19.00 282.0 17.21 / 12 Constant 26.03 2.583 Mean -0.2491E-02 0.5738E-02 Sigma 0.7437E-01 0.5573E-02

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3211 338 0.4157 1.709 3.000 3.000 332.0 16.01 / 15 Constant 29.56 2.521 Mean 0.1956 0.6072E-01 Sigma 0.9076 0.6012E-01

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4211 338 0.3502E-01 0.3095 19.00 37.00 282.0 8.404 / 7 Constant 28.69 2.920 Mean 0.3493E-02 0.5626E-02 Sigma 0.6429E-01 0.5887E-02

cm counts

0

25

50

75

100

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5211 338 -0.2596E-01 0.1765 0.000 0.000 338.0 1.832 / 1 Constant 115.6 9.970 Mean -0.9656E-03 0.1352E-02 Sigma 0.1873E-01 0.1042E-02

cm counts

Residuals on Drift Ch. - module 2

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2212 3 0.000 0.000 0.000 0.000 3.000

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3212 3 -0.4167E-01 1.124 0.000 0.000 3.000 0.000 / 0 Constant 1.011 1.306 Mean -3.639 192.8 Sigma 26.07 758.3

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4212 3 0.000 0.000 0.000 0.000 3.000

cm counts

0 0.5 1 1.5 2

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5212 3 0.000 0.000 0.000 0.000 3.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5221 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5311 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5312 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2321 340 0.2839E-01 0.3219 17.00 35.00 288.0 7.907 / 12 Constant 28.25 2.463 Mean -0.8471E-02 0.5651E-02 Sigma 0.7868E-01 0.4910E-02

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3321 340 -0.3274 1.566 2.000 2.000 336.0 9.864 / 15 Constant 34.16 2.647 Mean -0.4128 0.5335E-01 Sigma 0.8551 0.4785E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4321 340 -0.2839E-01 0.3219 35.00 17.00 288.0 4.342 / 7 Constant 28.54 2.670 Mean 0.1074E-01 0.7336E-02 Sigma 0.7809E-01 0.8157E-02

cm counts

0

50

100

150

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5321 340 -0.3676E-03 0.1249E-01 0.000 0.000 340.0 -9999. / -1 Constant 276.1 236.3 Mean -0.3793E-03 0.9659E-03 Sigma 0.1269E-01 0.1122E-01

cm counts

Residuals on Drift Ch. - module 3

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2322 3 0.000 0.000 1.000 1.000 1.000

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3322 3 0.000 0.000 2.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4322 3 0.000 0.000 1.000 1.000 1.000

cm counts

0 0.5 1 1.5 2

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5322 3 0.4167E-02 0.1179E-01 0.000 0.000 3.000 -9999. / -1 Constant 2.578 19.67 Mean 0.4006E-02 0.6311E-01 Sigma 0.1198E-01 0.9362E-01

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5411 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5412 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5421 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5511 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5512 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5521 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5611 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2612 314 -0.2803E-01 0.2703 20.00 9.000 285.0 11.51 / 12 Constant 26.14 2.726 Mean -0.3077E-01 0.5686E-02 Sigma 0.7448E-01 0.6210E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3612 314 0.5467 1.628 1.000 0.000 313.0 11.36 / 15 Constant 28.21 2.228 Mean 0.4464 0.7139E-01 Sigma 0.9767 0.6032E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4612 314 -0.2706E-01 0.2654 20.00 9.000 285.0 2.360 / 7 Constant 29.00 2.986 Mean -0.3011E-01 0.6264E-02 Sigma 0.6478E-01 0.6571E-02

cm counts

0

50

100

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5612 314 0.1760E-01 0.1211 0.000 0.000 314.0 13.84 / 1 Constant 100.3 10.95 Mean 0.4397E-02 0.1852E-02 Sigma 0.2167E-01 0.2064E-02

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5621 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5622 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5711 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5712 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2721 3 -0.3750E-01 0.7500E-01 0.000 1.000 2.000 -9999. / -1 Constant 1.309 14.64 Mean -0.3750E-01 0.9848E-01 Sigma 0.1022 2.121

cm counts

0 0.5 1 1.5 2

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3721 3 3.625 4.596 0.000 0.000 3.000 -0.2000E+05/ -2 Constant 2.000 1.414 Mean 0.3750 17.99 Sigma 1.125 0.4773

cm counts

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4721 3 -0.3750E-01 0.7500E-01 0.000 1.000 2.000 -9999. / -1 Constant 1.309 14.58 Mean -0.3750E-01 0.1725 Sigma 0.1022 2.118

cm counts

0 0.5 1 1.5 2

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5721 3 0.4167E-02 0.1179E-01 0.000 0.000 3.000 -9999. / -1 Constant 2.578 19.67 Mean 0.4006E-02 0.6311E-01 Sigma 0.1198E-01 0.9362E-01

cm counts

Residuals on Drift Ch. - module 7

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2722 393 -0.3999E-01 0.2607 32.00 19.00 342.0 18.68 / 12 Constant 34.16 2.904 Mean -0.3246E-01 0.5295E-02 Sigma 0.7677E-01 0.5060E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3722 393 0.8577 1.911 2.000 1.000 390.0 18.10 / 13 Constant 38.48 2.803 Mean 0.7172 0.5693E-01 Sigma 0.8585 0.5025E-01

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4722 393 -0.3999E-01 0.2607 32.00 19.00 342.0 7.240 / 7 Constant 37.89 3.277 Mean -0.2287E-01 0.5701E-02 Sigma 0.6333E-01 0.5016E-02

cm counts

0 50 100 150 200

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5722 393 -0.1240E-02 0.1244E-01 0.000 0.000 393.0 -9999. / -1 Constant 320.7 250.6 Mean -0.1271E-02 0.2139E-02 Sigma 0.1263E-01 0.1018E-01

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5811 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5812 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5821 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5822 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 1

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

131 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

141 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 1

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

132 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

142 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 2

0 2500

5000

7500

10000 x 10^6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 4 -0.4250 0.2586 0.000 0.000 4.000 -0.2000E+05/ -2 Constant 0.1014E+11 0.1353E+12 Mean -0.1100 0.7380E-03 Sigma 0.8490E-09 0.2346E-20

cm counts

0 2500

5000

7500

10000 x 10^6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 4 -0.6333E-01 0.3364 1.000 0.000 3.000 -0.2000E+05/ -2 Constant 0.1014E+11 0.1353E+12 Mean -0.1100 0.7380E-03 Sigma 0.8490E-09 0.2346E-20

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

231 4 0.000 0.000 0.000 0.000 4.000

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

241 4 0.000 0.000 0.000 0.000 4.000

cm counts

Residuals on OSIM - module 2

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

232 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

242 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 3

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 321 -0.3148E-01

0.2773 7.000 4.000 310.0 12.52 / 11 Constant 24.05 2.509 Mean -0.2126E-01 0.5601E-02 Sigma 0.6430E-01 0.6046E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 321 0.5531E-02 0.2879 23.00 25.00 273.0 9.535 / 11 Constant 16.88 1.955 Mean -0.5257E-02 0.7672E-02 Sigma 0.7760E-01 0.9394E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

331 321 -0.3148E-01

0.2768 7.000 4.000 310.0 3.015 / 5 Constant 26.60 2.959 Mean -0.1479E-01 0.6275E-02 Sigma 0.5220E-01 0.7515E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

341 321 -0.4330E-02 0.3287E-01 0.000 0.000 321.0 3.806 / 1 Constant 160.2 12.89 Mean -0.2501E-02 0.8923E-03 Sigma 0.1379E-01 0.7508E-03

cm counts

Residuals on OSIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

332 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

342 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 4

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

411 305 0.9064E-02

0.2567 2.000 4.000 299.0 14.62 / 11 Constant 20.24 2.210 Mean -0.3158E-01 0.7776E-02 Sigma 0.7699E-01 0.9484E-02

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

421 305 0.4756E-01 0.3032 11.00 15.00 279.0 26.78 / 11 Constant 10.44 1.438 Mean 0.2268E-01 0.3483E-01 Sigma 0.1373 0.6775E-01

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

431 305 0.1689E-01

0.2344 2.000 1.000 302.0 9.547 / 5 Constant 26.72 3.255 Mean -0.1866E-01 0.6237E-02 Sigma 0.4950E-01 0.8026E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

441 305 -0.1066E-01 0.1604 0.000 1.000 304.0 0.5817 / 1 Constant 44.66 4.904 Mean 0.2028E-01 0.1577E-01 Sigma 0.3501E-01 0.1293E-01

cm counts

Residuals on OSIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

432 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

442 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

531 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

541 1 0.000 0.000 0.000 0.000 1.000

cm counts

Residuals on OSIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

532 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

542 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

631 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

641 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

632 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

642 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

731 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

741 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 7

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 7 -0.3020 0.3176 1.000 1.000 5.000 -9999. / -1 Constant 1.346 15.05 Mean 0.2000E-01 0.3573E-01 Sigma 0.3893E-01 0.7331

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 7 0.3100 0.4301 0.000 3.000 4.000 -0.2000E+05/ -2 Constant 1.000 0.2313E-01 Mean 0.9156E-01 13.81 Sigma 5.977 0.1267E+08

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

732 7 0.5333E-01

0.4585 0.000 1.000 6.000 -9999. / -1 Constant 1.328 14.85 Mean -0.1000E-01 0.4991E-01 Sigma 0.5313E-01 1.048

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

742 7 0.1786 0.4877 0.000 0.000 7.000 -9999. / -1 Constant 1.623 18.14 Mean -0.2000E-01 0.9421E-02 Sigma 0.1016E-01 0.1173

cm counts

Residuals on OSIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

831 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

841 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 8

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 317 -0.1155E-01

0.2471 5.000 3.000 309.0 16.01 / 11 Constant 20.91 2.226 Mean 0.1408E-01 0.7168E-02 Sigma 0.7941E-01 0.9436E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 317 0.4468E-02 0.2946 17.00 18.00 282.0 32.57 / 11 Constant 13.49 1.798 Mean -0.4772E-02 0.1112E-01 Sigma 0.8823E-01 0.1527E-01

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

832 317 0.1181E-01

0.2465 3.000 5.000 309.0 10.30 / 5 Constant 24.42 2.934 Mean -0.1221E-01 0.8678E-02 Sigma 0.5514E-01 0.1051E-01

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

842 317 -0.1987E-02 0.3019E-01 0.000 0.000 317.0 0.1178E-01/ 1 Constant 126.9 9.931 Mean -0.3357E-02 0.1156E-02 Sigma 0.1777E-01 0.1037E-02

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

911 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

921 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

931 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

941 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 9

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

912 296 0.1277E-01

0.2697 2.000 5.000 289.0 18.08 / 11 Constant 20.93 2.252 Mean 0.1947E-02 0.5552E-02 Sigma 0.6436E-01 0.5753E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

922 296 -0.7846E-02 0.2829 19.00 17.00 260.0 8.219 / 11 Constant 15.40 1.727 Mean -0.3358E-01 0.1789E-01 Sigma 0.1056 0.2266E-01

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

932 296 -0.1935E-01

0.2409 3.000 2.000 291.0 20.85 / 5 Constant 23.43 3.308 Mean -0.1073E-01 0.7227E-02 Sigma 0.5504E-01 0.1291E-01

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

942 296 0.4644E-02 0.1740 0.000 1.000 295.0 2.147 / 1 Constant 34.14 4.691 Mean 0.2219E-02 0.1330E-01 Sigma 0.5473E-01 0.3700E-01

cm counts

Residuals on OSIM - module 10

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1011 1 0.000 0.000 0.000 1.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1021 1 0.000 0.000 0.000 1.000 0.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1031 1 0.000 0.000 0.000 0.000 1.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1041 1 0.000 0.000 0.000 1.000 0.000

cm counts

Residuals on OSIM - module 10

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1012 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1022 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1032 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1042 1 0.000 0.000 0.000 0.000 1.000

cm counts

Residuals on ISIM - module 1

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1131 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1141 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 1

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1132 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1142 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 2

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1211 123 0.3404E-01

0.3021 3.000 6.000 114.0 10.34 / 8 Constant 7.173 1.549 Mean 0.1658E-01 0.1157E-01 Sigma 0.6055E-01 0.1483E-01

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1221 123 -0.1037E-01 0.2473 7.000 9.000 107.0 8.106 / 10 Constant 5.929 1.176 Mean -0.2006E-01 0.2272E-01 Sigma 0.9438E-01 0.3413E-01

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1231 123 -0.4061E-01

0.2967 5.000 3.000 115.0 6.163 / 5 Constant 8.413 1.560 Mean -0.4338E-01 0.6914E-01 Sigma 0.6719E-01 0.4624E-01

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1241 123 -0.2508E-01 0.1534 0.000 1.000 122.0 8.525 / 4 Constant 20.29 3.321 Mean -0.1098E-01 0.3687E-02 Sigma 0.2653E-01 0.3429E-02

cm counts

Residuals on ISIM - module 2

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1212 4 0.000 0.000 1.000 0.000 3.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1222 4 0.000 0.000 1.000 1.000 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1232 4 0.000 0.000 0.000 1.000 3.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1242 4 0.1050 0.2483 0.000 0.000 4.000 -0.2000E+05/ -2 Constant 1.000 0.9382E-02 Mean 0.9043E-01 6.325 Sigma 6.967 0.4645E+08

cm counts

Residuals on ISIM - module 3

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1311 479 0.1318E-01

0.2603 3.000 4.000 472.0 19.03 / 9 Constant 32.44 2.858 Mean 0.2183E-01 0.7067E-02 Sigma 0.7442E-01 0.8515E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1321 479 0.3116E-01 0.3145 21.00 28.00 430.0 17.58 / 11 Constant 20.08 1.998 Mean 0.3740E-02 0.1075E-01 Sigma 0.1043 0.1695E-01

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1331 479 -0.8647E-02

0.2395 4.000 2.000 473.0 16.55 / 5 Constant 41.66 4.284 Mean -0.8708E-02 0.3793E-02 Sigma 0.4529E-01 0.5268E-02

cm counts

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1341 479 0.6813E-02 0.1269 0.000 2.000 477.0 6.821 / 4 Constant 69.13 5.543 Mean 0.1002E-01 0.2675E-02 Sigma 0.3861E-01 0.3160E-02

cm counts

Residuals on ISIM - module 3

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1312 7 -0.9000E-01

0.1639 0.000 0.000 7.000 0.000 / 0 Constant 7.368 26.28 Mean 0.3774 0.5693 Sigma 0.1888 0.2570

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1322 7 -0.5000E-01 0.2463 1.000 1.000 5.000 0.000 / 0 Constant 1.016 0.5910 Mean -0.4100E-01 1.920 Sigma 0.5287 0.5593

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1332 7 0.8714E-01

0.1464 0.000 0.000 7.000 0.000 / 0 Constant 7.368 27.48 Mean 0.3174 0.6262 Sigma 0.1888 0.2686

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1342 7 -0.3571E-01 0.6020E-01 0.000 0.000 7.000 0.3651 / 1 Constant 1.289 2.381 Mean 0.7022E-04 0.7469E-01 Sigma 0.6260E-01 0.1482

cm counts

Residuals on ISIM - module 4

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1411 56 0.1174E-01

0.3388 8.000 2.000 46.00 3.971 / 8 Constant 59.64 186.7 Mean 1.954 0.2136 Sigma 0.7111 0.3222

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1421 56 0.1228 0.3398 2.000 4.000 50.00 4.161 / 7 Constant 2.248 0.9739 Mean -0.2738E-01 0.1519 Sigma 0.1506 0.2467

cm counts

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1431 56 0.5143E-01

0.2139 0.000 0.000 56.00 2.090 / 4 Constant 8.785 2.380 Mean -0.1853E-01 0.4811E-02 Sigma 0.2362E-01 0.4725E-02

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1441 56 0.1080E-01 0.4109 6.000 0.000 50.00 1.624 / 3 Constant 61.57 212.8 Mean -0.6669 0.4416 Sigma 0.2530 0.1083

cm counts

Residuals on ISIM - module 4

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1412 2 0.000 0.000 0.000 0.000 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1422 2 0.4700 0.3800 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 0.9000E-01 337.1 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1432 2 0.1000E+00

0.1300 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.3647E-02 Mean -0.3788E-01 1.195 Sigma 4.595 0.6278E+08

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1442 2 0.000 0.000 0.000 0.000 2.000

cm counts

Residuals on ISIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1531 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1541 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1532 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1542 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 6

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1611 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1621 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1631 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1641 1 0.000 0.000 0.000 0.000 1.000

cm counts

Residuals on ISIM - module 6

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1612 156 -0.1373E-02

0.3025 0.000 3.000 153.0 8.185 / 8 Constant 8.776 1.400 Mean -0.1669E-01 0.2274E-01 Sigma 0.9548E-01 0.3853E-01

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1622 156 0.4901E-01 0.3047 7.000 8.000 141.0 17.12 / 11 Constant 8.065 1.798 Mean 0.1125E-01 0.1362E-01 Sigma 0.6543E-01 0.1586E-01

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1632 156 0.5974E-02

0.2948 0.000 2.000 154.0 5.936 / 5 Constant 9.669 1.686 Mean -0.1660E-01 0.2856E-01 Sigma 0.8787E-01 0.4974E-01

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1642 156 0.7051E-02 0.1191 0.000 0.000 156.0 6.054 / 4 Constant 26.64 4.083 Mean -0.5857E-02 0.3793E-02 Sigma 0.3124E-01 0.4638E-02

cm counts

Residuals on ISIM - module 7

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1711 5 -0.3660 0.2758 0.000 0.000 5.000 -0.2000E+05/ -2 Constant 1.000 0.3647E-02 Mean -0.3788E-01 1.195 Sigma 4.595 0.6278E+08

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1721 5 -0.1380 0.4387 0.000 0.000 5.000 -9999. / -1 Constant 1.623 18.15 Mean 0.6000E-01 0.7497E-02 Sigma 0.1016E-01 0.1173

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1731 5 -0.3300 0.2495 0.000 0.000 5.000 -0.2000E+05/ -2 Constant 1.000 0.3647E-02 Mean -0.3788E-01 1.195 Sigma 4.595 0.6278E+08

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1741 5 0.1580 0.1197 0.000 0.000 5.000 -0.2000E+05/ -2 Constant 1.000 0.6191E-03 Mean 0.7084E-02 0.7293 Sigma 10.18 0.2456E+07

cm counts

Residuals on ISIM - module 7

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1712 417 0.1123E-01

0.2688 6.000 5.000 406.0 28.10 / 9 Constant 25.16 2.867 Mean 0.2082E-02 0.6600E-02 Sigma 0.7332E-01 0.1106E-01

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1722 417 0.2322E-01 0.3219 24.00 33.00 360.0 7.043 / 11 Constant 19.29 1.989 Mean -0.1767E-01 0.1041E-01 Sigma 0.9773E-01 0.1510E-01

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1732 417 0.7555E-02

0.2552 4.000 4.000 409.0 12.69 / 5 Constant 34.91 3.716 Mean -0.2579E-03 0.3855E-02 Sigma 0.4319E-01 0.4614E-02

cm counts

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1742 417 -0.3525E-02 0.1504 0.000 0.000 417.0 12.90 / 4 Constant 55.86 5.215 Mean -0.1237E-02 0.3123E-02 Sigma 0.3906E-01 0.4059E-02

cm counts

Residuals on ISIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1831 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1841 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 8

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1812 61 -0.3596E-01

0.3520 3.000 1.000 57.00 9.720 / 9 Constant 5.632 17.08 Mean 1.940 0.5078 Sigma 1.197 1.394

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1822 61 -0.1923E-02 0.3159 4.000 5.000 52.00 10.40 / 11 Constant 2.137 0.6133 Mean 0.1533E-01 0.4573E-01 Sigma 0.1255 0.7737E-01

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1832 61 -0.2443E-01

0.1528 0.000 0.000 61.00 13.33 / 5 Constant 6.006 2.810 Mean 0.1692E-01 0.1082E-01 Sigma 0.3382E-01 0.1358E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1842 61 0.3491E-01 0.3339 1.000 3.000 57.00 5.625 / 4 Constant 4.190 2.537 Mean -0.1412E-01 0.9059E-02 Sigma 0.2419E-01 0.1245E-01

cm counts