Residuals on Straw Tubes (LOST)

0 2.5 5 7.5 10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 84 -0.1005E-01 0.3152E-01

8.000 0.000 76.00 11.58 / 16 Constant 4.893 0.9571 Mean -0.3361E-02 0.3166E-02 Sigma 0.1963E-01 0.3838E-02

cm counts

0 2.5 5 7.5 10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 84 -0.1079E-01 0.3392E-01 7.000 1.000 76.00 9.228 / 15 Constant 5.017 0.9691 Mean -0.5369E-02 0.4192E-02 Sigma 0.2080E-01 0.5019E-02

cm counts

0 2.5 5 7.5 10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 84 -0.8000E-02 0.1995E-01

2.000 0.000 82.00 16.79 / 16 Constant 8.002 1.729 Mean -0.7201E-02 0.1569E-02 Sigma 0.1182E-01 0.2150E-02

cm counts

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 84 -0.7902E-02 0.1977E-01 2.000 0.000 82.00 12.51 / 15 Constant 8.051 1.416 Mean -0.3459E-02 0.1803E-02 Sigma 0.1365E-01 0.1829E-02

cm counts

Residuals on Straw Tubes (RIST)

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 84 -0.1373E-01 0.5413E-01

9.000 0.000 75.00 16.70 / 15 Constant 4.297 10.01 Mean -0.3838 0.4222 Sigma 0.3296 0.2437

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 46 -0.2195E-02 0.5484E-01 5.000 0.000 41.00 3.281 / 13 Constant 1.527 0.4889 Mean -0.9544E-02 0.2545E-01 Sigma 0.4888E-01 0.4476E-01

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 84 -0.9710E-02 0.4275E-01

14.00 1.000 69.00 16.18 / 18 Constant 2.374 0.5043 Mean -0.8683E-02 0.1850E-01 Sigma 0.3778E-01 0.2829E-01

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 51 -0.1349E-01 0.5496E-01 11.00 1.000 39.00 3.661 / 12 Constant 1.359 0.5492 Mean -0.3077E-01 0.1802 Sigma 0.1167 0.3287

cm counts

Residuals on Straw Tubes (LEST)

0 2 4 6 8

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 84 -0.1301E-01 0.4921E-01

10.00 1.000 73.00 17.83 / 16 Constant 2.561 0.6281 Mean -0.8828E-02 0.4582E-01 Sigma 0.3610E-01 0.5422E-01

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 21 -0.3075E-01 0.7077E-01 5.000 0.000 16.00 1.120 / 3 Constant 1.351 0.8213 Mean -0.1360E-01 0.2097E-01 Sigma 0.2808E-01 0.4554E-01

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 84 -0.8319E-02 0.4989E-01

15.00 0.000 69.00 13.02 / 15 Constant 4.827 10.76 Mean -0.5294 0.6896 Sigma 0.4147 0.3425

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 84 -0.2200E-01 0.4942E-01 0.000 60.00 24.00 2.067 / 9 Constant 16.49 61.54 Mean 0.7363 0.3691 Sigma 0.3251 0.2121

cm counts

Z Residuals on Straw Tubes

0 2 4 6 8

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 84 -0.3738 1.393 0.000 0.000 84.00 11.82 / 23 Constant 3.953 0.6366 Mean -0.1943 0.2569 Sigma 1.635 0.3069

cm counts

0

2

4

6

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 84 -0.2690 1.616 0.000 0.000 84.00 22.37 / 27 Constant 2.585 0.4801 Mean 0.4155E-01 0.4514 Sigma 2.188 0.6482

cm counts

Residuals on Drift Chambers

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 37 -0.4205E-01 0.2105 2.000 2.000 33.00 4.507 / 6 Constant 5.242 1.598 Mean -0.7160E-01 0.1216E-01 Sigma 0.4860E-01 0.1484E-01

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 37 0.2353 1.972 1.000 2.000 34.00 4.919 / 8 Constant 3.173 0.8313 Mean 0.5344 0.3810 Sigma 1.160 0.5620

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 37 0.1858E-01 0.1798 0.000 0.000 37.00 3.840 / 3 Constant 18.93 4.581 Mean 0.1457E-01 0.2840E-02 Sigma 0.1427E-01 0.2364E-02

cm counts

0 2 4 6 8

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 37 0.4053E-01 0.2088 2.000 2.000 33.00 0.000 / 0 Constant 383.8 1886. Mean 0.9292 0.1578 Sigma 0.2829 0.1638

cm counts

Residuals on Drift Chambers

0 2 4 6 8

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 33 0.3203E-01 0.1066 0.000 1.000 32.00 4.144 / 5 Constant 5.841 1.708 Mean 0.5657E-01 0.1383E-01 Sigma 0.4456E-01 0.1608E-01

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 33 0.4962 1.650 0.000 0.000 33.00 7.897 / 10 Constant 1.800 0.5879 Mean 0.4668E-01 0.8161 Sigma 1.898 1.506

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 33 0.1780E-01 0.6847E-01 0.000 0.000 33.00 2.000 / 1 Constant 24.34 5.018 Mean 0.1047E-01 0.2591E-02 Sigma 0.1209E-01 0.1470E-02

cm counts

0 2 4 6 8

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 33 0.3125E-01 0.1064 0.000 1.000 32.00 0.000 / 0 Constant 4.989 2.115 Mean 0.3658E-01 0.6259E-01 Sigma 0.3622E-01 0.4891E-01

cm counts

Residuals on Drift Chambers

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 36 -0.6944E-01 0.2680 0.000 0.000 36.00 2.419 / 7 Constant 4.153 1.089 Mean -0.8182E-01 0.2917E-01 Sigma 0.9267E-01 0.3224E-01

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 36 1.021 1.100 0.000 0.000 36.00 2.184 / 7 Constant 4.190 1.019 Mean 0.9398 0.2805 Sigma 0.9223 0.3516

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 36 -0.7639E-02 0.9894E-02 0.000 0.000 36.00 -9999. / -1 Constant 35.23 70.77 Mean -0.6058E-02 0.2169E-01 Sigma 0.1032E-01 0.1847E-01

cm counts

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 36 0.6944E-01 0.2680 0.000 0.000 36.00 0.000 / 0 Constant 5.053 2.041 Mean 0.1685E-01 0.1857E-01 Sigma 0.3020E-01 0.1444E-01

cm counts

Residuals on Drift Chambers

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 46 0.6948E-01 0.4065 2.000 1.000 43.00 3.159 / 6 Constant 4.620 1.461 Mean 0.7862E-01 0.1562E-01 Sigma 0.5781E-01 0.2541E-01

cm counts

0 2 4 6 8 10

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 46 0.2011 1.937 0.000 0.000 46.00 6.088 / 10 Constant 3.564 0.8340 Mean -0.1119 0.2770 Sigma 1.105 0.3268

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 46 -0.4891E-02 0.1150E-01 0.000 0.000 46.00 -9999. / -1 Constant 40.25 75.44 Mean -0.4553E-02 0.1734E-01 Sigma 0.1173E-01 0.2231E-01

cm counts

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 46 0.6948E-01 0.4065 2.000 1.000 43.00 0.000 / 0 Constant 3.442 1.726 Mean 0.2498E-01 0.1854E-01 Sigma 0.2384E-01 0.1773E-01

cm counts

Residuals on OSIM

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 63 0.2651E-01

0.2312 0.000 0.000 63.00 19.20 / 9 Constant 15.13 4.913 Mean 0.6144E-01 0.3541E-02 Sigma 0.1308E-01 0.3216E-02

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 63 0.3690E-01 0.3109 1.000 4.000 58.00 7.735 / 8 Constant 3.269 0.9518 Mean -0.1109E-01 0.6432E-01 Sigma 0.8571E-01 0.8186E-01

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 63 0.1127E-01

0.1326 0.000 0.000 63.00 12.42 / 5 Constant 13.01 5.240 Mean 0.1233E-01 0.4329E-02 Sigma 0.2371E-01 0.8244E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 63 0.2048E-01 0.1919 0.000 0.000 63.00 2.983 / 1 Constant 4.975 2.310 Mean -0.9949E-02 0.6011E-02 Sigma 0.1123E-01 0.5377E-02

cm counts

Residuals on OSIM

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 63 -0.3226E-03

0.1990 1.000 0.000 62.00 5.336 / 11 Constant 5.036 1.154 Mean -0.5082E-01 0.1774E-01 Sigma 0.7265E-01 0.2087E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 63 0.2547E-01 0.2741 3.000 7.000 53.00 4.909 / 9 Constant 3.603 0.9816 Mean 0.3620E-01 0.3593E-01 Sigma 0.8878E-01 0.4534E-01

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 63 -0.2587E-01

0.1381 0.000 0.000 63.00 6.920 / 5 Constant 13.25 3.149 Mean 0.1554E-01 0.4396E-02 Sigma 0.2546E-01 0.4823E-02

cm counts

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 63 0.1677E-01 0.1667 0.000 1.000 62.00 1.876 / 1 Constant 2534. 5879. Mean 1.903 0.2420 Sigma 0.5345 0.1458

cm counts

Residuals on ISIM

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 67 -0.3585E-01

0.2167 0.000 2.000 65.00 9.695 / 6 Constant 9.492 2.172 Mean -0.6417E-01 0.7158E-02 Sigma 0.3011E-01 0.6496E-02

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 67 0.2700E-01 0.2874 1.000 6.000 60.00 12.17 / 11 Constant 2.591 0.7438 Mean 0.4101E-02 0.2722E-01 Sigma 0.9056E-01 0.4303E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 67 0.3576E-01

0.1404 1.000 0.000 66.00 10.79 / 5 Constant 13.60 4.799 Mean 0.1877E-01 0.8769E-02 Sigma 0.2308E-01 0.9535E-02

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 67 0.2121E-01 0.1826 0.000 1.000 66.00 7.052 / 4 Constant 13.70 3.424 Mean 0.4334E-01 0.3759E-02 Sigma 0.1833E-01 0.3973E-02

cm counts

Residuals on ISIM

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 67 -0.2424E-02

0.2353 1.000 0.000 66.00 11.78 / 8 Constant 4.408 1.053 Mean 0.2132E-01 0.1829E-01 Sigma 0.7243E-01 0.2453E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 67 0.2322E-01 0.2856 2.000 6.000 59.00 11.99 / 11 Constant 2.505 0.6642 Mean 0.1983E-01 0.3850E-01 Sigma 0.9941E-01 0.5203E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 67 -0.2000E-01

0.1364 1.000 0.000 66.00 11.25 / 5 Constant 17.69 3.730 Mean 0.1166E-01 0.3429E-02 Sigma 0.1793E-01 0.2539E-02

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 67 0.1239E-01 0.1977 0.000 0.000 67.00 3.412 / 4 Constant 7.340 1.770 Mean 0.3108E-01 0.1805E-01 Sigma 0.4897E-01 0.2307E-01

cm counts