Residuals on Straw Tubes (LOST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 673 -0.3747E-02 0.3385E-01

49.00 15.00 609.0 15.91 / 19 Constant 44.05 2.583 Mean 0.1155E-02 0.9186E-03 Sigma 0.1931E-01 0.8750E-03

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 673 -0.4762E-02 0.3479E-01 65.00 7.000 601.0 20.06 / 19 Constant 43.52 2.580 Mean 0.1168E-02 0.9237E-03 Sigma 0.1936E-01 0.8959E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 673 -0.8809E-02 0.3043E-01

19.00 6.000 648.0 18.29 / 19 Constant 52.64 2.902 Mean -0.4854E-02 0.7673E-03 Sigma 0.1733E-01 0.6804E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 673 -0.8809E-02 0.2612E-01 35.00 0.000 638.0 27.90 / 19 Constant 53.58 3.026 Mean -0.4948E-02 0.7408E-03 Sigma 0.1672E-01 0.6769E-03

cm counts

Residuals on Straw Tubes (RIST)

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 673 0.5159E-02 0.5391E-01

63.00 20.00 590.0 24.09 / 19 Constant 27.66 1.951 Mean 0.5733E-02 0.1605E-02 Sigma 0.2507E-01 0.1905E-02

cm counts

0 5 10 15 20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 426 -0.8360E-02 0.6180E-01 56.00 9.000 361.0 13.34 / 19 Constant 15.22 1.316 Mean 0.2387E-03 0.2678E-02 Sigma 0.3026E-01 0.3427E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 673 -0.6719E-02 0.5759E-01

55.00 12.00 606.0 12.48 / 19 Constant 26.41 1.821 Mean -0.4150E-02 0.1849E-02 Sigma 0.2796E-01 0.2331E-02

cm counts

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 265 -0.3836E-02 0.6073E-01 55.00 3.000 207.0 11.48 / 19 Constant 9.068 1.095 Mean -0.9385E-03 0.2629E-02 Sigma 0.2460E-01 0.3032E-02

cm counts

Residuals on Straw Tubes (LEST)

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 673 -0.1428E-02 0.5199E-01

78.00 8.000 587.0 20.46 / 19 Constant 28.02 1.808 Mean 0.1928E-02 0.1503E-02 Sigma 0.2475E-01 0.1493E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 352 -0.4963E-02 0.5723E-01 41.00 14.00 297.0 22.46 / 19 Constant 11.16 1.146 Mean -0.1030E-02 0.3939E-02 Sigma 0.3453E-01 0.6182E-02

cm counts

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 673 -0.9804E-02 0.5544E-01

57.00 4.000 612.0 22.67 / 19 Constant 31.03 2.065 Mean -0.4730E-02 0.1314E-02 Sigma 0.2272E-01 0.1393E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 673 -0.9522E-02 0.5802E-01 31.00 282.0 360.0 22.47 / 19 Constant 14.67 1.467 Mean -0.1417E-02 0.2227E-02 Sigma 0.2603E-01 0.3038E-02

cm counts

Z Residuals on Straw Tubes

0 10 20 30 40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 673 -0.1208 1.613 1.000 0.000 672.0 23.55 / 31 Constant 34.84 1.714 Mean -0.4066E-01 0.6340E-01 Sigma 1.477 0.4941E-01

cm counts

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 673 -0.2356 1.618 2.000 0.000 671.0 23.94 / 32 Constant 35.81 1.781 Mean -0.1275 0.5949E-01 Sigma 1.413 0.4619E-01

cm counts

Residuals on Drift Chambers

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 239 0.6057E-01 0.3763 13.00 19.00 207.0 9.073 / 12 Constant 16.51 2.045 Mean 0.2391E-01 0.7478E-02 Sigma 0.7687E-01 0.7660E-02

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 239 -0.4963 1.216 1.000 1.000 237.0 11.01 / 15 Constant 25.26 2.467 Mean -0.3941 0.6174E-01 Sigma 0.8278 0.6232E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 239 -0.5114E-01 0.3672 5.000 3.000 231.0 15.04 / 7 Constant 28.95 3.760 Mean -0.1328E-01 0.4132E-02 Sigma 0.4545E-01 0.4680E-02

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 239 0.3926E-01 0.3599 9.000 17.00 213.0 0.9223 / 1 Constant 0.1432E+05 0.1833E+05 Mean 1.203 0.4537E-01 Sigma 0.3288 0.4111E-01

cm counts

Residuals on Drift Chambers

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 231 -0.4360E-01 0.2473 7.000 11.00 213.0 27.40 / 12 Constant 26.61 3.322 Mean -0.7250E-01 0.4813E-02 Sigma 0.5349E-01 0.5304E-02

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 231 0.2008 1.264 0.000 0.000 231.0 25.55 / 15 Constant 19.95 1.854 Mean 0.2743 0.8620E-01 Sigma 0.9600 0.6575E-01

cm counts

0

20

40

60

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 231 -0.1217E-01 0.2709 1.000 2.000 228.0 27.47 / 7 Constant 44.93 5.692 Mean -0.3970E-01 0.2761E-02 Sigma 0.3265E-01 0.3267E-02

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 231 0.1846E-01 0.2694 7.000 6.000 218.0 0.4344 / 1 Constant 0.1446E+05 0.2057E+05 Mean 0.5271 0.2173E-01 Sigma 0.1396 0.1933E-01

cm counts

Residuals on Drift Chambers

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 169 -0.5557E-01 0.3514 12.00 9.000 148.0 17.36 / 12 Constant 11.99 2.006 Mean 0.3322E-01 0.1108E-01 Sigma 0.8560E-01 0.1367E-01

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 169 1.111 1.278 2.000 1.000 166.0 8.272 / 14 Constant 16.11 1.767 Mean 1.073 0.1370 Sigma 0.9298 0.1084

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 169 0.6949E-01 0.3732 5.000 3.000 161.0 10.91 / 7 Constant 17.72 2.571 Mean -0.2791E-01 0.7076E-02 Sigma 0.6041E-01 0.8103E-02

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 169 -0.6949E-01 0.3732 3.000 5.000 161.0 0.4415E-02/ 1 Constant 17.93 4.142 Mean 0.3753E-01 0.4873E-01 Sigma 0.5487E-01 0.3691E-01

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 261 -0.6733E-01 0.1783 17.00 6.000 238.0 18.83 / 11 Constant 26.43 2.951 Mean -0.8452E-01 0.6564E-02 Sigma 0.7384E-01 0.8198E-02

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 261 -0.2859 1.771 2.000 1.000 258.0 5.523 / 15 Constant 24.01 2.113 Mean -0.2183 0.6726E-01 Sigma 0.9380 0.6064E-01

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 261 -0.4930E-01 0.2695 6.000 5.000 250.0 13.80 / 6 Constant 37.56 4.616 Mean -0.5959E-01 0.6548E-02 Sigma 0.5427E-01 0.8660E-02

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 261 0.4940E-01 0.2685 5.000 6.000 250.0 0.9806 / 1 Constant 0.2532E+06 0.2994E+06 Mean 0.7392 0.1793E-01 Sigma 0.1686 0.1408E-01

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 565 -0.1629E-01

0.2344 1.000 4.000 560.0 37.18 / 11 Constant 44.06 3.699 Mean -0.2678E-01 0.4166E-02 Sigma 0.6768E-01 0.5600E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 565 0.2812E-01 0.2890 29.00 24.00 512.0 32.83 / 11 Constant 28.26 2.686 Mean 0.1080E-01 0.6637E-02 Sigma 0.8433E-01 0.9867E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 565 -0.4256E-03

0.1394 1.000 0.000 564.0 32.97 / 5 Constant 80.93 6.151 Mean -0.9439E-02 0.2264E-02 Sigma 0.3884E-01 0.2765E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 565 0.1156E-01 0.2098 0.000 0.000 565.0 1.843 / 1 Constant 152.4 78.85 Mean 0.1281 0.5872E-01 Sigma 0.8562E-01 0.2227E-01

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 535 -0.3283E-02

0.2309 1.000 4.000 530.0 37.26 / 11 Constant 42.43 3.369 Mean 0.1308E-01 0.4339E-02 Sigma 0.6689E-01 0.4794E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 535 -0.1124E-01 0.2924 32.00 19.00 484.0 12.30 / 11 Constant 26.50 2.452 Mean -0.3157E-01 0.8190E-02 Sigma 0.8951E-01 0.1126E-01

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 535 0.2150E-02

0.1540 0.000 0.000 535.0 14.90 / 5 Constant 90.76 6.416 Mean -0.7255E-02 0.1851E-02 Sigma 0.3359E-01 0.1842E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 535 -0.2015E-02 0.1805 0.000 4.000 531.0 0.1677 / 1 Constant 190.7 74.19 Mean 0.1558 0.3803E-01 Sigma 0.9516E-01 0.1675E-01

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 580 0.3307E-01

0.2215 3.000 4.000 573.0 34.04 / 9 Constant 47.42 4.026 Mean 0.1954E-01 0.3839E-02 Sigma 0.5986E-01 0.5048E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 580 0.2592E-01 0.2916 36.00 19.00 525.0 21.92 / 11 Constant 27.99 2.502 Mean 0.1070E-01 0.7177E-02 Sigma 0.8988E-01 0.1043E-01

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 580 -0.1138E-01

0.1265 2.000 0.000 578.0 26.95 / 5 Constant 92.27 6.813 Mean -0.4773E-02 0.1911E-02 Sigma 0.3512E-01 0.2208E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 580 0.2388E-01 0.2018 2.000 0.000 578.0 10.39 / 4 Constant 65.33 5.382 Mean 0.1865E-01 0.3199E-02 Sigma 0.4330E-01 0.4385E-02

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 587 0.8491E-02

0.2367 3.000 1.000 583.0 21.45 / 9 Constant 45.05 3.391 Mean 0.3707E-02 0.4792E-02 Sigma 0.6806E-01 0.5451E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 587 -0.7925E-02 0.3071 36.00 21.00 530.0 8.636 / 11 Constant 28.42 2.381 Mean -0.2578E-01 0.7624E-02 Sigma 0.8826E-01 0.9213E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 587 0.1491E-01

0.1522 0.000 0.000 587.0 17.30 / 5 Constant 97.50 6.617 Mean 0.2934E-02 0.1859E-02 Sigma 0.3538E-01 0.1953E-02

cm counts

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 587 -0.1092E-01 0.1890 0.000 3.000 584.0 4.814 / 4 Constant 66.30 5.294 Mean 0.4367E-02 0.2894E-02 Sigma 0.4007E-01 0.3415E-02

cm counts