Residuals on Straw Tubes (LOST)

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 840 -0.7502E-02 0.2792E-01

42.00 7.000 791.0 26.04 / 19 Constant 57.64 3.004 Mean -0.4892E-02 0.8519E-03 Sigma 0.2000E-01 0.8727E-03

cm counts

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 840 -0.7564E-02 0.2644E-01 52.00 3.000 785.0 26.78 / 19 Constant 57.00 2.947 Mean -0.4987E-02 0.8775E-03 Sigma 0.2028E-01 0.8825E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 840 -0.3182E-02 0.2881E-01

26.00 5.000 809.0 28.05 / 19 Constant 71.03 3.434 Mean -0.8251E-03 0.6615E-03 Sigma 0.1652E-01 0.5489E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 840 -0.4265E-02 0.2722E-01 32.00 1.000 807.0 36.51 / 19 Constant 72.42 3.573 Mean -0.6426E-03 0.6583E-03 Sigma 0.1603E-01 0.5484E-03

cm counts

Residuals on Straw Tubes (RIST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 840 -0.6016E-02 0.4547E-01

74.00 8.000 758.0 12.66 / 19 Constant 40.41 2.269 Mean -0.4283E-02 0.1342E-02 Sigma 0.2588E-01 0.1555E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 505 -0.7516E-02 0.4953E-01 50.00 9.000 446.0 23.56 / 19 Constant 25.30 1.917 Mean -0.7331E-02 0.1485E-02 Sigma 0.2179E-01 0.1530E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 840 -0.4916E-02 0.4371E-01

55.00 14.00 771.0 20.58 / 19 Constant 43.75 2.421 Mean 0.4628E-03 0.1101E-02 Sigma 0.2305E-01 0.1165E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 405 -0.4601E-02 0.5026E-01 35.00 7.000 363.0 22.07 / 19 Constant 19.02 1.616 Mean -0.2291E-02 0.1774E-02 Sigma 0.2415E-01 0.2055E-02

cm counts

Residuals on Straw Tubes (LEST)

0 10 20 30 40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 840 -0.6315E-02 0.5000E-01

66.00 12.00 762.0 15.62 / 19 Constant 36.01 2.111 Mean -0.5070E-02 0.1587E-02 Sigma 0.2753E-01 0.1899E-02

cm counts

0 5 10 15 20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 402 -0.1248E-01 0.4762E-01 46.00 5.000 351.0 11.22 / 19 Constant 17.24 1.431 Mean -0.4650E-02 0.2295E-02 Sigma 0.2709E-01 0.2553E-02

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 840 -0.5591E-02 0.4527E-01

62.00 5.000 773.0 12.12 / 19 Constant 43.93 2.465 Mean -0.1387E-02 0.1132E-02 Sigma 0.2342E-01 0.1256E-02

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 840 -0.5235E-02 0.5845E-01 16.00 709.0 115.0 20.67 / 19 Constant 3.130 0.5688 Mean -0.1481E-01 0.1552E-01 Sigma 0.4337E-01 0.1826E-01

cm counts

Z Residuals on Straw Tubes

0

20

40

60

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 840 0.8452E-01 1.454 0.000 0.000 840.0 35.50 / 32 Constant 45.18 1.998 Mean 0.1827 0.5425E-01 Sigma 1.428 0.4243E-01

cm counts

0

20

40

60

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 840 -0.1928 1.526 1.000 1.000 838.0 41.27 / 33 Constant 43.78 1.887 Mean -0.1785 0.5462E-01 Sigma 1.456 0.3910E-01

cm counts

Residuals on Drift Chambers

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 224 -0.1102 0.3855 18.00 11.00 195.0 17.75 / 12 Constant 17.43 2.365 Mean -0.6643E-01 0.6791E-02 Sigma 0.6686E-01 0.7540E-02

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 224 0.6621 1.726 0.000 49.00 175.0 16.33 / 13 Constant 18.13 2.320 Mean 0.2927 0.6907E-01 Sigma 0.7818 0.8216E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 224 0.1007 0.3855 7.000 14.00 203.0 5.943 / 7 Constant 21.71 3.138 Mean 0.5136E-01 0.7543E-02 Sigma 0.5772E-01 0.9373E-02

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 224 0.7810E-01 0.3603 1.000 5.000 218.0 4.264 / 1 Constant 36.56 19.03 Mean 0.5761E-01 0.6921E-01 Sigma 0.5069E-01 0.3622E-01

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 293 0.7080E-01 0.2785 9.000 13.00 271.0 27.63 / 11 Constant 31.70 3.482 Mean 0.7069E-01 0.4429E-02 Sigma 0.5295E-01 0.4653E-02

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 293 0.2825E-01 1.661 0.000 1.000 292.0 13.46 / 15 Constant 27.90 2.407 Mean 0.1352 0.5966E-01 Sigma 0.8886 0.5674E-01

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 293 0.5808E-01 0.2850 8.000 8.000 277.0 20.09 / 7 Constant 37.88 4.821 Mean 0.6280E-01 0.5502E-02 Sigma 0.4722E-01 0.7347E-02

cm counts

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 293 0.4740E-01 0.2743 4.000 1.000 288.0 3.870 / 1 Constant 56.42 17.12 Mean 0.4952E-01 0.8166E-01 Sigma 0.3930E-01 0.2889E-01

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 332 -0.7419E-01 0.2876 22.00 17.00 293.0 8.585 / 12 Constant 26.89 2.526 Mean -0.7507E-01 0.7150E-02 Sigma 0.8180E-01 0.6999E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 332 0.1458 1.524 6.000 2.000 324.0 18.16 / 15 Constant 31.33 2.466 Mean 0.1771 0.5797E-01 Sigma 0.9001 0.5113E-01

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 332 0.6990E-01 0.3238 11.00 10.00 311.0 10.79 / 7 Constant 37.86 3.642 Mean 0.5153E-01 0.5903E-02 Sigma 0.5701E-01 0.5663E-02

cm counts

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 332 0.6621E-01 0.3175 11.00 11.00 310.0 2.585 / 1 Constant 109.6 59.15 Mean 0.1521 0.4821E-01 Sigma 0.8657E-01 0.1769E-01

cm counts

Residuals on Drift Chambers

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 235 0.3854E-01 0.2868 8.000 10.00 217.0 10.48 / 12 Constant 19.13 2.016 Mean 0.3553E-01 0.7865E-02 Sigma 0.8572E-01 0.7515E-02

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 235 0.2899 2.034 0.000 0.000 235.0 19.47 / 15 Constant 15.84 1.653 Mean 0.1138 0.1002 Sigma 1.135 0.1065

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 235 0.1632E-01 0.3165 4.000 2.000 229.0 2.683 / 7 Constant 27.71 2.883 Mean 0.3014E-01 0.6216E-02 Sigma 0.6390E-01 0.6310E-02

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 235 0.1643E-01 0.3166 4.000 2.000 229.0 0.1266E-01/ 1 Constant 26.83 3.786 Mean 0.1870E-01 0.1134 Sigma 0.5173E-01 0.7626E-01

cm counts

Residuals on OSIM

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 675 0.5442E-01

0.2547 2.000 4.000 669.0 42.13 / 11 Constant 50.25 4.248 Mean 0.4016E-01 0.4099E-02 Sigma 0.6719E-01 0.6187E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 675 0.5496E-02 0.2748 35.00 45.00 595.0 11.80 / 11 Constant 35.29 2.657 Mean 0.4752E-02 0.6294E-02 Sigma 0.8900E-01 0.8128E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 675 0.4780E-01

0.2122 0.000 2.000 673.0 32.83 / 5 Constant 80.81 7.461 Mean 0.2719E-01 0.2685E-02 Sigma 0.3856E-01 0.4188E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 675 0.2042E-01 0.1590 1.000 0.000 674.0 4.062 / 1 Constant 157.8 11.70 Mean 0.1135E-01 0.1350E-02 Sigma 0.1973E-01 0.1481E-02

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 624 -0.1585E-01

0.2473 3.000 2.000 619.0 38.71 / 11 Constant 50.49 4.195 Mean -0.2043E-01 0.3518E-02 Sigma 0.6241E-01 0.4928E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 624 -0.1820E-02 0.2781 28.00 41.00 555.0 16.63 / 11 Constant 32.28 2.580 Mean -0.1449E-01 0.6645E-02 Sigma 0.8826E-01 0.8655E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 624 0.7496E-02

0.2068 1.000 0.000 623.0 24.51 / 5 Constant 72.06 6.011 Mean 0.1632E-01 0.2607E-02 Sigma 0.4053E-01 0.3535E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 624 0.1501E-01 0.1585 0.000 1.000 623.0 0.6679 / 1 Constant 137.9 9.870 Mean 0.3022E-02 0.1497E-02 Sigma 0.2270E-01 0.1665E-02

cm counts

Residuals on ISIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 740 -0.3675E-01

0.2549 10.00 4.000 726.0 41.15 / 9 Constant 57.79 4.913 Mean -0.3069E-01 0.3648E-02 Sigma 0.6003E-01 0.5734E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 740 0.5167E-03 0.2767 37.00 45.00 658.0 11.85 / 11 Constant 38.98 2.720 Mean -0.3295E-02 0.5918E-02 Sigma 0.8801E-01 0.7091E-02

cm counts

0 25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 740 0.3500E-01

0.2121 2.000 6.000 732.0 14.14 / 5 Constant 86.46 6.242 Mean 0.2282E-01 0.2698E-02 Sigma 0.4176E-01 0.3285E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 740 0.8277E-03 0.1677 1.000 2.000 737.0 36.89 / 4 Constant 110.0 8.168 Mean 0.1125E-01 0.1650E-02 Sigma 0.3126E-01 0.2052E-02

cm counts

Residuals on ISIM

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 682 0.8713E-02

0.2505 8.000 6.000 668.0 30.39 / 9 Constant 52.07 3.985 Mean 0.7614E-02 0.3749E-02 Sigma 0.6303E-01 0.4940E-02

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 682 0.3290E-02 0.2895 32.00 39.00 611.0 5.485 / 11 Constant 34.85 2.600 Mean -0.7055E-02 0.7072E-02 Sigma 0.9454E-01 0.9407E-02

cm counts

0

25

50

75

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 682 0.6582E-02

0.2184 7.000 2.000 673.0 9.087 / 5 Constant 78.06 5.613 Mean 0.7875E-02 0.2401E-02 Sigma 0.4029E-01 0.2657E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 682 0.2321E-01 0.1573 0.000 2.000 680.0 29.99 / 4 Constant 105.3 7.968 Mean 0.2984E-02 0.1830E-02 Sigma 0.3288E-01 0.2359E-02

cm counts