Residuals on Straw Tubes (LOST)

0

25 50 75

100

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 993 -0.4657E-02 0.3742E-01

61.00 6.000 926.0 28.97 / 19 Constant 76.74 3.573 Mean 0.7932E-03 0.6199E-03 Sigma 0.1696E-01 0.5577E-03

cm counts

0

25

50

75

100

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 993 -0.5359E-02 0.3600E-01 65.00 4.000 924.0 29.20 / 19 Constant 78.12 3.682 Mean 0.8017E-03 0.6047E-03 Sigma 0.1661E-01 0.5566E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 993 -0.2886E-02 0.2983E-01

35.00 1.000 957.0 24.83 / 19 Constant 87.18 3.821 Mean 0.5257E-03 0.5541E-03 Sigma 0.1581E-01 0.4563E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 993 -0.3433E-02 0.2762E-01 43.00 1.000 949.0 29.68 / 19 Constant 86.32 3.814 Mean 0.3867E-03 0.5568E-03 Sigma 0.1586E-01 0.4653E-03

cm counts

Residuals on Straw Tubes (RIST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 993 -0.4205E-02 0.5026E-01

115.0 18.00 860.0 14.07 / 19 Constant 44.13 2.409 Mean -0.1716E-02 0.1180E-02 Sigma 0.2454E-01 0.1329E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 574 0.2130E-03 0.5245E-01 88.00 7.000 479.0 21.63 / 19 Constant 19.84 1.416 Mean 0.7566E-02 0.3163E-02 Sigma 0.3441E-01 0.3901E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 993 -0.3278E-03 0.4083E-01

68.00 16.00 909.0 27.04 / 19 Constant 54.19 2.726 Mean 0.1061E-02 0.9890E-03 Sigma 0.2281E-01 0.1043E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 512 0.4326E-05 0.4537E-01 39.00 10.00 463.0 13.43 / 19 Constant 23.80 1.675 Mean 0.1307E-02 0.1827E-02 Sigma 0.2705E-01 0.2082E-02

cm counts

Residuals on Straw Tubes (LEST)

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 993 -0.2733E-03 0.4732E-01

102.0 13.00 878.0 16.26 / 19 Constant 45.54 2.422 Mean 0.2517E-03 0.1231E-02 Sigma 0.2557E-01 0.1424E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 620 -0.1277E-02 0.5404E-01 74.00 15.00 531.0 54.18 / 19 Constant 23.95 1.728 Mean -0.4192E-02 0.1818E-02 Sigma 0.2495E-01 0.1846E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 993 -0.9967E-03 0.4527E-01

66.00 10.00 917.0 15.88 / 19 Constant 51.43 2.654 Mean 0.1592E-02 0.1055E-02 Sigma 0.2383E-01 0.1196E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 993 0.2301E-02 0.4866E-01 34.00 720.0 239.0 22.62 / 19 Constant 11.79 1.290 Mean 0.2101E-03 0.2472E-02 Sigma 0.2547E-01 0.3100E-02

cm counts

Z Residuals on Straw Tubes

0

20

40

60

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 993 -0.1805 1.678 4.000 0.000 989.0 26.07 / 32 Constant 52.24 2.130 Mean -0.5001E-01 0.5024E-01 Sigma 1.435 0.3859E-01

cm counts

0

20

40

60

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 993 0.8305E-01 1.382 2.000 0.000 991.0 35.00 / 32 Constant 56.18 2.234 Mean 0.6274E-01 0.4599E-01 Sigma 1.361 0.3386E-01

cm counts

Residuals on Drift Chambers

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 419 -0.1372E-01 0.3232 20.00 9.000 390.0 22.58 / 12 Constant 39.87 3.204 Mean -0.5041E-02 0.4248E-02 Sigma 0.6673E-01 0.3625E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 419 0.9187E-01 1.701 2.000 2.000 415.0 5.815 / 15 Constant 39.04 2.617 Mean -0.5365E-02 0.5247E-01 Sigma 0.9407 0.4413E-01

cm counts

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 419 0.1224E-01 0.3224 11.00 17.00 391.0 9.805 / 7 Constant 41.46 3.585 Mean 0.1935E-02 0.4628E-02 Sigma 0.6276E-01 0.4815E-02

cm counts

0

50

100

150

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 419 -0.7846E-02 0.1193 0.000 0.000 419.0 0.4474 / 1 Constant 164.5 11.94 Mean -0.1880E-02 0.1091E-02 Sigma 0.1860E-01 0.8688E-03

cm counts

Residuals on Drift Chambers

0

20

40

60

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 420 -0.4710E-01 0.2760 27.00 10.00 383.0 23.03 / 12 Constant 41.02 3.392 Mean -0.3186E-01 0.3989E-02 Sigma 0.6273E-01 0.3538E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 420 0.4571 1.553 1.000 2.000 417.0 15.95 / 15 Constant 33.72 2.405 Mean 0.3457 0.6650E-01 Sigma 1.084 0.6588E-01

cm counts

0

20

40

60

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 420 -0.4396E-01 0.2707 25.00 12.00 383.0 10.55 / 7 Constant 42.48 3.628 Mean -0.3121E-01 0.4979E-02 Sigma 0.5960E-01 0.4597E-02

cm counts

0

50

100

150

200

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 420 0.1601E-01 0.1381 0.000 0.000 420.0 16.09 / 1 Constant 178.8 15.52 Mean 0.8209E-02 0.1045E-02 Sigma 0.1632E-01 0.1089E-02

cm counts

Residuals on Drift Chambers

0 10 20 30 40 50

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 443 0.2127E-01 0.2837 18.00 26.00 399.0 8.042 / 11 Constant 43.14 3.139 Mean 0.1789E-02 0.4444E-02 Sigma 0.7281E-01 0.3726E-02

cm counts

0

20

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 443 -0.3099 1.857 2.000 3.000 438.0 16.48 / 15 Constant 42.18 2.850 Mean -0.3148 0.4882E-01 Sigma 0.8881 0.4266E-01

cm counts

0 10 20 30 40 50

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 443 -0.1939E-01 0.2838 24.00 20.00 399.0 6.143 / 7 Constant 43.37 3.352 Mean 0.3960E-03 0.5271E-02 Sigma 0.7243E-01 0.5549E-02

cm counts

0

100

200

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 443 0.1975E-03 0.1250E-01 0.000 0.000 443.0 -9999. / -1 Constant 359.6 270.0 Mean 0.2039E-03 0.6885E-03 Sigma 0.1270E-01 0.9845E-02

cm counts

Residuals on Drift Chambers

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 467 -0.2634E-01 0.2242 16.00 21.00 430.0 11.97 / 12 Constant 45.56 3.165 Mean -0.3320E-01 0.4758E-02 Sigma 0.7870E-01 0.4064E-02

cm counts

0

20

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 467 0.5038 1.478 0.000 3.000 464.0 18.19 / 15 Constant 42.78 2.881 Mean 0.5145 0.5524E-01 Sigma 0.9781 0.5472E-01

cm counts

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 467 -0.3064E-01 0.2237 21.00 16.00 430.0 8.539 / 7 Constant 46.88 3.437 Mean -0.2807E-01 0.6357E-02 Sigma 0.7358E-01 0.5933E-02

cm counts

0

100

200

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 467 -0.1793E-02 0.1237E-01 0.000 0.000 467.0 -9999. / -1 Constant 383.3 269.0 Mean -0.1823E-02 0.2690E-02 Sigma 0.1256E-01 0.9083E-02

cm counts

Residuals on OSIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 801 -0.2621E-01

0.2627 6.000 3.000 792.0 28.43 / 11 Constant 59.25 3.880 Mean -0.1971E-01 0.3381E-02 Sigma 0.6542E-01 0.3742E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 801 0.4073E-01 0.3112 44.00 47.00 710.0 27.03 / 11 Constant 40.48 3.101 Mean 0.1014E-01 0.4996E-02 Sigma 0.7881E-01 0.6545E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 801 -0.2407E-01

0.2418 6.000 3.000 792.0 12.67 / 5 Constant 70.72 5.050 Mean -0.2016E-01 0.3953E-02 Sigma 0.5280E-01 0.5094E-02

cm counts

0

100

200

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 801 -0.9114E-03 0.1154 0.000 0.000 801.0 8.352 / 1 Constant 236.0 13.56 Mean 0.3805E-03 0.9042E-03 Sigma 0.1850E-01 0.8312E-03

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 779 0.3650E-01

0.2593 9.000 4.000 766.0 11.33 / 11 Constant 57.60 3.581 Mean 0.1110E-01 0.3592E-02 Sigma 0.6911E-01 0.3728E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 779 0.1156E-01 0.3062 42.00 46.00 691.0 11.85 / 11 Constant 40.83 3.064 Mean -0.1136E-01 0.4980E-02 Sigma 0.7828E-01 0.6260E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 779 -0.2964E-01

0.2407 7.000 4.000 768.0 5.455 / 5 Constant 69.63 5.049 Mean -0.1078E-01 0.3654E-02 Sigma 0.5264E-01 0.5064E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 779 0.1650E-01 0.1264 0.000 0.000 779.0 5.326 / 1 Constant 165.7 10.75 Mean 0.3696E-03 0.1724E-02 Sigma 0.2717E-01 0.2422E-02

cm counts

Residuals on ISIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 852 0.3627E-01

0.2883 9.000 7.000 836.0 18.12 / 9 Constant 58.45 4.054 Mean 0.1637E-01 0.3748E-02 Sigma 0.6523E-01 0.4732E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 852 0.3967E-01 0.3171 43.00 50.00 759.0 16.59 / 11 Constant 40.93 3.026 Mean 0.2540E-02 0.5308E-02 Sigma 0.8213E-01 0.6801E-02

cm counts

0

25

50

75

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 852 -0.3218E-01

0.2534 4.000 3.000 845.0 10.99 / 5 Constant 80.33 5.579 Mean -0.1082E-01 0.2548E-02 Sigma 0.4298E-01 0.2917E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 852 0.1489E-02 0.1675 6.000 0.000 846.0 18.95 / 4 Constant 112.1 7.418 Mean 0.3543E-02 0.2143E-02 Sigma 0.3847E-01 0.2737E-02

cm counts

Residuals on ISIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 836 -0.1929E-01

0.2819 9.000 11.00 816.0 21.38 / 9 Constant 58.75 4.111 Mean -0.9212E-02 0.3667E-02 Sigma 0.6436E-01 0.4658E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 836 0.1330E-01 0.3166 47.00 55.00 734.0 6.696 / 11 Constant 41.86 2.963 Mean -0.8395E-02 0.5022E-02 Sigma 0.7897E-01 0.5768E-02

cm counts

0 20 40 60 80 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 836 -0.8547E-02

0.2539 4.000 6.000 826.0 6.751 / 5 Constant 77.72 5.322 Mean -0.8659E-02 0.3202E-02 Sigma 0.4925E-01 0.4029E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 836 0.1463E-01 0.1608 1.000 5.000 830.0 19.67 / 4 Constant 122.0 8.176 Mean 0.2530E-02 0.1641E-02 Sigma 0.3249E-01 0.1949E-02

cm counts