Residuals on Straw Tubes (LOST)

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 91 -0.1240E-01 0.2441E-01

6.000 0.000 85.00 17.34 / 17 Constant 7.500 1.627 Mean -0.9249E-02 0.1911E-02 Sigma 0.1358E-01 0.2414E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 91 -0.1254E-01 0.2434E-01 6.000 0.000 85.00 21.65 / 18 Constant 6.748 1.680 Mean -0.8279E-02 0.1809E-02 Sigma 0.1289E-01 0.2811E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 91 -0.5461E-02 0.2704E-01

1.000 1.000 89.00 10.76 / 17 Constant 7.145 1.137 Mean -0.6504E-02 0.2270E-02 Sigma 0.1787E-01 0.2434E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 91 -0.7636E-02 0.1640E-01 3.000 0.000 88.00 12.11 / 16 Constant 7.726 1.350 Mean -0.6849E-02 0.2087E-02 Sigma 0.1629E-01 0.2606E-02

cm counts

Residuals on Straw Tubes (RIST)

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 91 -0.9373E-02 0.4021E-01

6.000 2.000 83.00 13.58 / 19 Constant 2.699 0.5430 Mean -0.2319E-02 0.1810E-01 Sigma 0.4038E-01 0.3291E-01

cm counts

0 1 2 3 4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 44 -0.8900E-02 0.4653E-01 4.000 0.000 40.00 6.328 / 17 Constant 1.328 0.3484 Mean -0.1776E-01 0.5225E-01 Sigma 0.8014E-01 0.1004

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 91 -0.9890E-02 0.5038E-01

17.00 1.000 73.00 7.941 / 18 Constant 3.364 0.7205 Mean -0.1118E-01 0.5087E-02 Sigma 0.2449E-01 0.6633E-02

cm counts

0

2

4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 67 -0.9680E-02 0.4828E-01 17.00 0.000 50.00 8.629 / 14 Constant 1.601 0.7014 Mean -0.4350E-01 0.1223 Sigma 0.1218 0.1775

cm counts

Residuals on Straw Tubes (LEST)

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 91 -0.4333E-02 0.4316E-01

7.000 0.000 84.00 19.04 / 18 Constant 2.791 0.5689 Mean -0.6300E-02 0.9902E-02 Sigma 0.3505E-01 0.1715E-01

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 44 -0.5905E-02 0.5069E-01 2.000 0.000 42.00 5.050 / 15 Constant 1.488 0.3871 Mean -0.1295E-01 0.1176 Sigma 0.1186 0.3441

cm counts

0 1 2 3 4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 91 -0.2227E-01 0.4937E-01

18.00 0.000 73.00 8.836 / 15 Constant 9.008 19.42 Mean -0.6539 0.5198 Sigma 0.3753 0.2057

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 91 -0.2800E-01 0.5486E-01 1.000 74.00 16.00 1.217 / 5 Constant 1.184 0.5496 Mean 0.5902E-02 0.5213E-01 Sigma 0.5579E-01 0.1330

cm counts

Z Residuals on Straw Tubes

0 2.5 5 7.5 10

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 91 -0.2011 1.582 0.000 0.000 91.00 18.90 / 25 Constant 3.734 0.6219 Mean 0.6301E-01 0.2793 Sigma 1.733 0.3288

cm counts

0 2.5 5 7.5 10

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 91 -0.6582 1.578 0.000 0.000 91.00 21.22 / 22 Constant 3.793 0.6714 Mean 0.4996 0.7300 Sigma 1.862 0.7434

cm counts

Residuals on Drift Chambers

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 40 -0.6641E-01 0.3466 3.000 5.000 32.00 2.032 / 3 Constant 4.577 1.300 Mean -0.9084E-01 0.2358E-01 Sigma 0.6210E-01 0.1702

cm counts

0 1 2 3 4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 40 0.6736 1.652 1.000 3.000 36.00 4.198 / 9 Constant 2.718 0.8006 Mean 0.2058 0.8070 Sigma 1.488 1.163

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 40 0.2313E-01 0.1623 0.000 0.000 40.00 3.049 / 3 Constant 43.31 32.34 Mean -0.2731E-01 0.8676E-02 Sigma 0.3119E-01 0.5059E-02

cm counts

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 40 0.6406E-01 0.3387 3.000 5.000 32.00 -0.2000E+05/ -2 Constant 3.000 0.8552E-02 Mean 0.2820E-01 0.8998 Sigma 4.317 0.2845E+08

cm counts

Residuals on Drift Chambers

0 1 2 3 4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 31 0.1458 0.3215 1.000 0.000 30.00 1.301 / 5 Constant 3.036 0.8902 Mean 0.4475E-01 0.3063E-01 Sigma 0.8532E-01 0.3754E-01

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 31 0.3266 2.044 0.000 0.000 31.00 3.018 / 8 Constant 2.547 0.7834 Mean 0.1208 1.008 Sigma 1.114 1.610

cm counts

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 31 0.1492E-01 0.9596E-01 0.000 0.000 31.00 8.000 / 3 Constant 3108. 0.1068E+05 Mean 0.2431E-01 0.4501E-03 Sigma 0.3616E-02 0.1053E-02

cm counts

0 1 2 3 4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 31 0.1442 0.3190 1.000 0.000 30.00 0.000 / 0 Constant 3.156 2.111 Mean -0.5709E-05 0.2044E-01 Sigma 0.3909E-01 0.3683E-01

cm counts

Residuals on Drift Chambers

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 37 -0.1480 0.2824 2.000 4.000 31.00 5.345 / 5 Constant 3.763 1.383 Mean -0.1001 0.1767E-01 Sigma 0.5222E-01 0.3196E-01

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 37 0.3056 2.076 1.000 0.000 36.00 5.045 / 10 Constant 3.122 0.7961 Mean 0.4542 0.2660 Sigma 1.053 0.3170

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 37 -0.8446E-02 0.9215E-02 0.000 0.000 37.00 -9999. / -1 Constant 39.88 88.54 Mean -0.5821E-02 0.1875E-01 Sigma 0.9414E-02 0.1515E-01

cm counts

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 37 0.1480 0.2824 3.000 3.000 31.00 -9999. / -1 Constant 3.657 21.87 Mean 0.1952E-01 0.6474E-01 Sigma 0.1116E-01 0.6575E-01

cm counts

Residuals on Drift Chambers

0 1 2 3 4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 34 0.7702E-01 0.4807 1.000 2.000 31.00 2.449 / 7 Constant 2.077 0.6723 Mean 0.2324E-01 0.1252 Sigma 0.1943 0.1736

cm counts

0 1 2 3 4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 34 0.1103 2.379 0.000 0.000 34.00 4.737 / 11 Constant 1.831 0.5747 Mean 0.2515 0.7727 Sigma 1.817 1.086

cm counts

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 34 -0.2941E-02 0.1215E-01 0.000 0.000 34.00 -9999. / -1 Constant 28.41 69.59 Mean -0.2917E-02 0.1478E-01 Sigma 0.1233E-01 0.3104E-01

cm counts

0 1 2 3 4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 34 0.1456 0.4646 1.000 2.000 31.00 0.1201 / 1 Constant 3.703 1.627 Mean 0.2109E-02 0.1387E-01 Sigma 0.3364E-01 0.1963E-01

cm counts

Residuals on OSIM

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 64 0.1252 0.2103 0.000 2.000 62.00 11.91 / 6 Constant 7.608 2.146 Mean 0.5830E-01 0.8093E-02 Sigma 0.3792E-01 0.1141E-01

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 64 -0.2600E-01 0.2261 4.000 10.00 50.00 6.198 / 10 Constant 2.822 0.7976 Mean 0.1604E-01 0.3454E-01 Sigma 0.9491E-01 0.6375E-01

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 64 0.7062E-01

0.1515 0.000 0.000 64.00 8.483 / 4 Constant 27.46 6.179 Mean 0.1222E-01 0.1971E-02 Sigma 0.1234E-01 0.2336E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 64 0.9806E-01 0.1554 0.000 2.000 62.00 1.267 / 1 Constant 0.2290E+05 0.6545E+05 Mean 0.5841 0.3695E-01 Sigma 0.1381 0.2990E-01

cm counts

Residuals on OSIM

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 50 -0.1168 0.2466 3.000 0.000 47.00 1.918 / 8 Constant 4.510 1.143 Mean -0.5085E-01 0.1937E-01 Sigma 0.6960E-01 0.2364E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 50 -0.9872E-01 0.2476 2.000 9.000 39.00 6.852 / 6 Constant 2.177 1.117 Mean -0.7542E-01 0.4093 Sigma 0.3405 0.4675

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 50 0.9200E-02

0.1477 0.000 0.000 50.00 4.309 / 4 Constant 9.733 3.059 Mean 0.1863E-01 0.5778E-02 Sigma 0.2845E-01 0.9876E-02

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 50 0.8957E-01 0.2215 0.000 3.000 47.00 0.000 / 0 Constant 0.3705E+05 0.1241E+06 Mean 0.9712 0.6707E-01 Sigma 0.2239 0.5296E-01

cm counts

Residuals on ISIM

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 66 -0.1145 0.2349 4.000 0.000 62.00 4.836 / 7 Constant 10.08 2.605 Mean -0.4031E-01 0.5432E-02 Sigma 0.3197E-01 0.7240E-02

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 66 -0.5815E-01 0.2439 2.000 10.00 54.00 6.208 / 8 Constant 637.1 1361. Mean 4.639 0.3121 Sigma 1.401 0.3358

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 66 0.1014 0.2303 0.000 1.000 65.00 2.887 / 5 Constant 13.49 2.732 Mean 0.1600E-01 0.4342E-02 Sigma 0.2814E-01 0.4368E-02

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 66 0.8219E-01 0.1535 0.000 2.000 64.00 1.118 / 4 Constant 12.43 2.644 Mean 0.3159E-01 0.4758E-02 Sigma 0.2718E-01 0.4808E-02

cm counts

Residuals on ISIM

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 64 0.5871E-01

0.2770 0.000 2.000 62.00 4.315 / 7 Constant 5.838 1.600 Mean 0.3014E-01 0.2358E-01 Sigma 0.5302E-01 0.2741E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 64 -0.3909E-01 0.3033 2.000 7.000 55.00 10.29 / 11 Constant 1.735 0.5434 Mean -0.4399E-01 0.1362 Sigma 0.1882 0.2721

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 64 0.2281E-01

0.1720 0.000 0.000 64.00 4.772 / 5 Constant 12.65 3.241 Mean 0.1049E-01 0.4285E-02 Sigma 0.2675E-01 0.5958E-02

cm counts

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 64 0.9952E-01 0.2475 0.000 1.000 63.00 3.099 / 4 Constant 8.247 1.968 Mean 0.2193E-01 0.6718E-02 Sigma 0.3333E-01 0.7188E-02

cm counts