Residuals on Straw Tubes (LOST)

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 571 -0.2076E-02 0.3543E-01

33.00 10.00 528.0 37.98 / 19 Constant 37.57 2.455 Mean 0.1236E-02 0.1007E-02 Sigma 0.1910E-01 0.9839E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 571 -0.2339E-02 0.3004E-01 48.00 4.000 519.0 30.39 / 19 Constant 37.78 2.417 Mean 0.1487E-02 0.9928E-03 Sigma 0.1916E-01 0.9488E-03

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 571 -0.9494E-02 0.3166E-01

23.00 2.000 546.0 29.08 / 19 Constant 44.55 2.687 Mean -0.7149E-02 0.8735E-03 Sigma 0.1696E-01 0.7352E-03

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 571 -0.1016E-01 0.2890E-01 30.00 1.000 540.0 24.62 / 19 Constant 44.85 2.698 Mean -0.6378E-02 0.8745E-03 Sigma 0.1710E-01 0.7425E-03

cm counts

Residuals on Straw Tubes (RIST)

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 571 0.2344E-04 0.5933E-01

46.00 13.00 512.0 29.49 / 19 Constant 26.50 2.006 Mean 0.4050E-02 0.1257E-02 Sigma 0.2050E-01 0.1307E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 310 0.3127E-02 0.6224E-01 46.00 5.000 259.0 11.06 / 18 Constant 10.06 1.177 Mean 0.1292E-02 0.3956E-02 Sigma 0.3216E-01 0.6742E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 571 -0.1401E-01 0.5649E-01

45.00 8.000 518.0 28.48 / 19 Constant 22.45 1.723 Mean -0.1274E-02 0.1800E-02 Sigma 0.2598E-01 0.2196E-02

cm counts

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 192 -0.1644E-01 0.6041E-01 24.00 4.000 164.0 28.01 / 19 Constant 15.30 26.06 Mean -0.6244 0.2490 Sigma 0.3545 0.8409E-01

cm counts

Residuals on Straw Tubes (LEST)

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 571 0.9386E-03 0.5301E-01

54.00 12.00 505.0 24.77 / 19 Constant 28.15 2.058 Mean 0.4582E-02 0.1223E-02 Sigma 0.2047E-01 0.1258E-02

cm counts

0

5

10

15

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 306 -0.3477E-02 0.5393E-01 44.00 2.000 260.0 14.63 / 19 Constant 10.79 1.140 Mean -0.3073E-02 0.3226E-02 Sigma 0.3026E-01 0.4388E-02

cm counts

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 571 -0.1385E-01 0.5017E-01

46.00 5.000 520.0 32.47 / 19 Constant 28.30 2.040 Mean -0.6210E-02 0.1291E-02 Sigma 0.2067E-01 0.1278E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 571 -0.8971E-02 0.5034E-01 28.00 228.0 315.0 18.75 / 19 Constant 13.34 1.253 Mean 0.2196E-02 0.2508E-02 Sigma 0.2744E-01 0.2922E-02

cm counts

Z Residuals on Straw Tubes

0 10 20 30 40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 571 -0.1704 1.415 0.000 0.000 571.0 22.69 / 31 Constant 31.97 1.725 Mean -0.1170 0.6202E-01 Sigma 1.375 0.4974E-01

cm counts

0

10

20

30

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 571 -0.8354E-01 1.419 0.000 0.000 571.0 15.16 / 28 Constant 29.72 1.634 Mean -0.2699E-01 0.7511E-01 Sigma 1.549 0.6978E-01

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 221 0.3649E-01 0.3329 17.00 30.00 174.0 18.28 / 12 Constant 19.00 2.662 Mean 0.1168E-01 0.6765E-02 Sigma 0.6043E-01 0.6501E-02

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 221 -0.2087 1.503 1.000 2.000 218.0 33.04 / 15 Constant 21.57 2.766 Mean -0.3635 0.6675E-01 Sigma 0.8027 0.8768E-01

cm counts

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 221 -0.7565E-01 0.4108 6.000 4.000 211.0 18.52 / 7 Constant 31.04 4.881 Mean -0.6836E-02 0.4157E-02 Sigma 0.3843E-01 0.5003E-02

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 221 0.7052E-01 0.3963 12.00 22.00 187.0 1.805 / 1 Constant 27.62 3.974 Mean 0.3009E-01 0.2749E-01 Sigma 0.5080E-01 0.2602E-01

cm counts

Residuals on Drift Chambers

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 208 -0.6250E-01 0.3107 11.00 15.00 182.0 17.90 / 11 Constant 16.58 2.567 Mean -0.6933E-01 0.7370E-02 Sigma 0.6990E-01 0.1071E-01

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 208 0.5433 1.584 0.000 0.000 208.0 14.97 / 15 Constant 16.45 1.702 Mean 0.3230 0.9809E-01 Sigma 1.080 0.9744E-01

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 208 -0.7524E-02 0.3633 1.000 1.000 206.0 14.79 / 6 Constant 28.85 4.381 Mean -0.3972E-01 0.4118E-02 Sigma 0.4167E-01 0.5630E-02

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 208 0.1328E-01 0.3695 8.000 8.000 192.0 0.2697 / 1 Constant 17.55 5.828 Mean 0.4476E-01 0.6214E-01 Sigma 0.5429E-01 0.4116E-01

cm counts

Residuals on Drift Chambers

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 158 -0.3805E-01 0.4153 16.00 6.000 136.0 15.60 / 11 Constant 9.474 1.491 Mean 0.3607E-01 0.1055E-01 Sigma 0.7974E-01 0.1060E-01

cm counts

0

5

10

15

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 158 1.136 1.733 2.000 1.000 155.0 14.27 / 13 Constant 12.59 2.093 Mean 1.830 0.6786 Sigma 1.513 0.3858

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 158 0.8485E-01 0.4307 4.000 3.000 151.0 8.910 / 7 Constant 14.14 2.195 Mean -0.2455E-01 0.7470E-02 Sigma 0.5851E-01 0.8043E-02

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 158 -0.8485E-01 0.4306 3.000 4.000 151.0 1.885 / 1 Constant 9691. 0.1554E+05 Mean 1.202 0.5634E-01 Sigma 0.3270 0.5080E-01

cm counts

Residuals on Drift Chambers

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 238 -0.7949E-01 0.2628 16.00 13.00 209.0 6.221 / 11 Constant 21.16 2.176 Mean -0.8647E-01 0.9910E-02 Sigma 0.8202E-01 0.8359E-02

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 238 0.2026 1.601 3.000 3.000 232.0 12.07 / 15 Constant 22.54 2.006 Mean -0.4935E-01 0.6582E-01 Sigma 0.8852 0.5173E-01

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 238 -0.3955E-01 0.3055 8.000 11.00 219.0 8.363 / 7 Constant 33.17 3.687 Mean -0.5895E-01 0.5790E-02 Sigma 0.4593E-01 0.4990E-02

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 238 0.3955E-01 0.3048 11.00 8.000 219.0 1.097 / 1 Constant 37.52 45.88 Mean 0.4459E-01 0.5202E-01 Sigma 0.3341E-01 0.1998E-01

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 436 -0.3640E-01

0.2251 6.000 5.000 425.0 49.98 / 11 Constant 45.27 5.242 Mean -0.4209E-01 0.3016E-02 Sigma 0.4314E-01 0.4531E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 436 -0.2030E-02 0.2958 23.00 19.00 394.0 5.065 / 11 Constant 26.19 2.340 Mean 0.2960E-01 0.7299E-02 Sigma 0.7978E-01 0.7938E-02

cm counts

0 25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 436 -0.9213E-02

0.1513 3.000 1.000 432.0 43.79 / 5 Constant 58.67 6.191 Mean -0.1462E-01 0.2829E-02 Sigma 0.3870E-01 0.4175E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 436 0.3336E-01 0.2207 1.000 1.000 434.0 2.470 / 1 Constant 0.5437E+07 0.4958E+07 Mean 0.9537 0.1496E-01 Sigma 0.1941 0.9800E-02

cm counts

Residuals on OSIM

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 405 0.3441E-01

0.2450 1.000 5.000 399.0 28.15 / 11 Constant 38.11 4.184 Mean 0.2322E-01 0.3587E-02 Sigma 0.5168E-01 0.4994E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 405 -0.6095E-01 0.3051 20.00 18.00 367.0 4.633 / 11 Constant 22.49 1.993 Mean -0.4321E-01 0.1021E-01 Sigma 0.8972E-01 0.1011E-01

cm counts

0 25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 405 -0.2050E-01

0.1417 0.000 1.000 404.0 28.12 / 5 Constant 64.88 6.633 Mean -0.1285E-01 0.2149E-02 Sigma 0.3219E-01 0.2936E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 405 0.3214E-01 0.2161 2.000 1.000 402.0 0.1660 / 1 Constant 58.92 5.709 Mean 0.1778E-01 0.8064E-02 Sigma 0.3130E-01 0.7114E-02

cm counts

Residuals on ISIM

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 449 0.3751E-01

0.2419 7.000 5.000 437.0 36.05 / 9 Constant 42.61 4.678 Mean 0.3061E-01 0.3030E-02 Sigma 0.4288E-01 0.4201E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 449 -0.9210E-02 0.3093 23.00 21.00 405.0 13.10 / 11 Constant 25.34 2.315 Mean 0.1568E-01 0.6476E-02 Sigma 0.7771E-01 0.7291E-02

cm counts

0 25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 449 0.6413E-02

0.1512 3.000 0.000 446.0 34.07 / 5 Constant 64.30 6.563 Mean -0.7055E-02 0.2273E-02 Sigma 0.3447E-01 0.3258E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 449 0.3989E-01 0.2163 5.000 3.000 441.0 2.871 / 4 Constant 55.08 5.052 Mean 0.2450E-01 0.2888E-02 Sigma 0.3608E-01 0.3252E-02

cm counts

Residuals on ISIM

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 433 0.1294E-02

0.2477 5.000 3.000 425.0 24.38 / 9 Constant 39.04 4.204 Mean -0.6589E-02 0.3450E-02 Sigma 0.5024E-01 0.4918E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 433 -0.3859E-01 0.3204 18.00 19.00 396.0 10.22 / 11 Constant 21.76 1.960 Mean -0.2925E-01 0.9188E-02 Sigma 0.9095E-01 0.1003E-01

cm counts

0

25

50

75

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 433 0.1721E-02

0.1572 0.000 3.000 430.0 18.85 / 5 Constant 73.91 6.584 Mean -0.2799E-02 0.1963E-02 Sigma 0.3201E-01 0.2360E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 433 -0.2430E-02 0.2079 2.000 3.000 428.0 9.514 / 4 Constant 55.29 5.420 Mean 0.5986E-02 0.2635E-02 Sigma 0.3512E-01 0.3350E-02

cm counts