Residuals on Straw Tubes (LOST)

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 779 -0.1000E-01 0.2913E-01

52.00 2.000 725.0 24.58 / 19 Constant 55.45 2.787 Mean -0.8045E-02 0.8362E-03 Sigma 0.1898E-01 0.7069E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 779 -0.9867E-02 0.3024E-01 53.00 2.000 724.0 29.09 / 19 Constant 55.17 2.779 Mean -0.7658E-02 0.8255E-03 Sigma 0.1887E-01 0.6943E-03

cm counts

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 779 -0.6100E-02 0.2810E-01

20.00 1.000 758.0 14.63 / 19 Constant 65.60 3.248 Mean -0.2288E-02 0.6917E-03 Sigma 0.1739E-01 0.6138E-03

cm counts

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 779 -0.5333E-02 0.2746E-01 23.00 0.000 756.0 14.60 / 19 Constant 66.79 3.270 Mean -0.2448E-02 0.6747E-03 Sigma 0.1706E-01 0.5802E-03

cm counts

Residuals on Straw Tubes (RIST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 779 -0.9454E-02 0.4362E-01

63.00 6.000 710.0 20.72 / 19 Constant 41.91 2.358 Mean -0.6055E-02 0.1164E-02 Sigma 0.2207E-01 0.1097E-02

cm counts

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 484 -0.9128E-02 0.4234E-01 46.00 7.000 431.0 19.88 / 19 Constant 23.31 1.743 Mean -0.5312E-02 0.1685E-02 Sigma 0.2477E-01 0.1888E-02

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 779 -0.4370E-02 0.4913E-01

88.00 16.00 675.0 18.34 / 19 Constant 36.17 2.259 Mean 0.1900E-03 0.1274E-02 Sigma 0.2399E-01 0.1496E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 399 0.1166E-02 0.5574E-01 87.00 10.00 302.0 21.94 / 19 Constant 15.18 1.465 Mean -0.1732E-02 0.2035E-02 Sigma 0.2355E-01 0.2209E-02

cm counts

Residuals on Straw Tubes (LEST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 779 -0.9504E-02 0.4694E-01

60.00 9.000 710.0 25.65 / 19 Constant 39.78 2.392 Mean -0.2734E-02 0.1055E-02 Sigma 0.2118E-01 0.1079E-02

cm counts

0 5 10 15 20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 338 -0.1094E-01 0.5210E-01 41.00 4.000 293.0 16.53 / 19 Constant 13.37 1.339 Mean -0.1660E-02 0.2309E-02 Sigma 0.2590E-01 0.2871E-02

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 779 -0.4450E-02 0.4834E-01

77.00 18.00 684.0 10.30 / 19 Constant 40.26 2.373 Mean -0.1414E-02 0.1044E-02 Sigma 0.2116E-01 0.1035E-02

cm counts

0 2.5 5 7.5 10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 779 -0.5422E-02 0.6014E-01 20.00 593.0 166.0 18.55 / 19 Constant 4.889 0.7209 Mean 0.2522E-02 0.1124E-01 Sigma 0.4489E-01 0.2386E-01

cm counts

Z Residuals on Straw Tubes

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 779 0.1465E-01 1.510 1.000 0.000 778.0 53.83 / 31 Constant 40.91 1.918 Mean 0.6238E-01 0.5635E-01 Sigma 1.418 0.4516E-01

cm counts

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 779 -0.3396 1.529 1.000 0.000 778.0 32.28 / 33 Constant 40.96 1.867 Mean -0.3042 0.5772E-01 Sigma 1.440 0.4256E-01

cm counts

Residuals on Drift Chambers

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 218 -0.2351E-01 0.3715 33.00 17.00 168.0 13.78 / 11 Constant 17.19 2.459 Mean -0.6115E-01 0.7196E-02 Sigma 0.6187E-01 0.7883E-02

cm counts

0

5

10

15

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 218 0.4118 1.799 0.000 48.00 170.0 23.67 / 14 Constant 12.71 1.589 Mean 0.3538 0.1015 Sigma 0.9874 0.1060

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 218 0.5430E-01 0.4631 11.00 21.00 186.0 13.96 / 7 Constant 19.86 2.919 Mean 0.4944E-01 0.7696E-02 Sigma 0.5192E-01 0.8079E-02

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 218 0.5833E-01 0.4511 2.000 6.000 210.0 5.204 / 1 Constant 36.47 7.399 Mean 0.2117E-01 0.5340E-02 Sigma 0.2041E-01 0.6388E-02

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 273 0.7546E-01 0.3018 16.00 10.00 247.0 15.07 / 11 Constant 27.59 3.173 Mean 0.6813E-01 0.5324E-02 Sigma 0.6047E-01 0.6160E-02

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 273 0.2352E-01 1.600 0.000 2.000 271.0 25.95 / 14 Constant 30.89 2.978 Mean -0.1583E-01 0.5449E-01 Sigma 0.6977 0.4983E-01

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 273 0.5124E-01 0.3073 12.00 8.000 253.0 6.586 / 6 Constant 33.60 3.643 Mean 0.5359E-01 0.5271E-02 Sigma 0.4987E-01 0.5177E-02

cm counts

0

20

40

60

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 273 0.1333E-01 0.3378 0.000 1.000 272.0 0.6690E-01/ 1 Constant 6444. 6644. Mean 0.4037 0.1621E-01 Sigma 0.1197 0.1544E-01

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 295 -0.1185 0.3217 29.00 31.00 235.0 13.06 / 11 Constant 21.26 2.391 Mean -0.8319E-01 0.8301E-02 Sigma 0.7607E-01 0.8265E-02

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 295 -0.4078 1.958 7.000 6.000 282.0 16.90 / 15 Constant 21.44 2.008 Mean -0.3843 0.9651E-01 Sigma 1.133 0.1049

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 295 0.6494E-01 0.3826 18.00 21.00 256.0 8.840 / 6 Constant 30.32 3.372 Mean 0.6193E-01 0.9578E-02 Sigma 0.5654E-01 0.8402E-02

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 295 0.6475E-01 0.3833 18.00 21.00 256.0 0.8157E-03/ 1 Constant 89.93 84.57 Mean 0.1344 0.7553E-01 Sigma 0.7157E-01 0.2257E-01

cm counts

Residuals on Drift Chambers

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 245 0.9034E-01 0.4612 15.00 19.00 211.0 13.27 / 12 Constant 13.67 1.540 Mean 0.4038E-01 0.1210E-01 Sigma 0.1022 0.1104E-01

cm counts

0

5

10

15

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 245 0.3268E-01 1.916 1.000 3.000 241.0 24.71 / 15 Constant 14.23 1.378 Mean -0.1452 0.1257 Sigma 1.284 0.1153

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 245 0.5684E-01 0.4495 6.000 5.000 234.0 14.46 / 7 Constant 19.44 2.264 Mean 0.3161E-01 0.8526E-02 Sigma 0.7091E-01 0.8487E-02

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 245 0.5684E-01 0.4500 6.000 5.000 234.0 6.448 / 1 Constant 96.35 151.5 Mean 1.633 0.2392 Sigma 0.8706 0.4048

cm counts

Residuals on OSIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 589 0.4579E-01

0.2519 1.000 3.000 585.0 32.65 / 11 Constant 50.47 4.132 Mean 0.4247E-01 0.3686E-02 Sigma 0.6206E-01 0.4980E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 589 -0.3053E-01 0.3217 30.00 35.00 524.0 12.19 / 11 Constant 31.46 2.773 Mean -0.8676E-02 0.5006E-02 Sigma 0.7089E-01 0.5942E-02

cm counts

0 25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 589 0.4321E-01

0.1970 0.000 3.000 586.0 19.32 / 5 Constant 69.84 5.482 Mean 0.3447E-01 0.4898E-02 Sigma 0.4634E-01 0.5273E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 589 0.1517E-01 0.1568 1.000 0.000 588.0 6.718 / 1 Constant 140.0 11.55 Mean 0.1023E-01 0.1329E-02 Sigma 0.1952E-01 0.1621E-02

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 555 -0.3113E-01

0.2339 2.000 3.000 550.0 50.02 / 11 Constant 50.86 4.742 Mean -0.2945E-01 0.3146E-02 Sigma 0.5415E-01 0.4671E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 555 0.3238E-02 0.3145 25.00 42.00 488.0 15.38 / 11 Constant 27.21 2.500 Mean -0.2295E-01 0.6858E-02 Sigma 0.8187E-01 0.8798E-02

cm counts

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 555 0.2421E-01

0.2054 2.000 0.000 553.0 9.006 / 5 Constant 66.44 5.256 Mean 0.2518E-01 0.3528E-02 Sigma 0.4356E-01 0.4000E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 555 0.1763E-01 0.1235 0.000 2.000 553.0 0.8252 / 1 Constant 124.9 9.398 Mean 0.2795E-02 0.1572E-02 Sigma 0.2269E-01 0.1749E-02

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 629 -0.3668E-01

0.2600 4.000 2.000 623.0 21.26 / 9 Constant 55.91 4.080 Mean -0.3205E-01 0.3535E-02 Sigma 0.5799E-01 0.4052E-02

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 629 -0.1709E-01 0.3207 38.00 38.00 553.0 9.591 / 11 Constant 32.25 2.677 Mean -0.4435E-02 0.5283E-02 Sigma 0.7535E-01 0.6155E-02

cm counts

0 25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 629 0.3518E-01

0.2160 1.000 2.000 626.0 20.49 / 5 Constant 76.57 6.220 Mean 0.2424E-01 0.2814E-02 Sigma 0.4139E-01 0.3769E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 629 0.5032E-02 0.1642 1.000 0.000 628.0 19.83 / 4 Constant 95.36 6.961 Mean 0.1317E-01 0.2014E-02 Sigma 0.3535E-01 0.2468E-02

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 605 0.2282E-01

0.2592 8.000 4.000 593.0 28.96 / 9 Constant 48.09 3.858 Mean 0.1420E-01 0.3860E-02 Sigma 0.6178E-01 0.4951E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 605 -0.5524E-03 0.3033 31.00 49.00 525.0 8.354 / 11 Constant 33.52 2.861 Mean -0.1013E-01 0.4749E-02 Sigma 0.6947E-01 0.5457E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 605 0.2102E-01

0.2188 7.000 1.000 597.0 7.884 / 5 Constant 71.44 5.308 Mean 0.1441E-01 0.2645E-02 Sigma 0.4086E-01 0.2872E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 605 0.2373E-01 0.1682 0.000 2.000 603.0 20.63 / 4 Constant 99.26 7.449 Mean 0.2120E-02 0.1794E-02 Sigma 0.3197E-01 0.2131E-02

cm counts