Residuals on Straw Tubes (LOST)

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 811 -0.3665E-02 0.3305E-01

58.00 6.000 747.0 26.11 / 19 Constant 57.48 3.175 Mean 0.3415E-03 0.7680E-03 Sigma 0.1843E-01 0.8097E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 811 -0.4053E-02 0.3312E-01 59.00 4.000 748.0 33.38 / 19 Constant 57.11 3.235 Mean 0.3926E-03 0.7805E-03 Sigma 0.1860E-01 0.8635E-03

cm counts

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 811 -0.3246E-02 0.2752E-01

29.00 2.000 780.0 25.55 / 19 Constant 70.56 3.569 Mean -0.8939E-04 0.6328E-03 Sigma 0.1591E-01 0.5620E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 811 -0.3378E-02 0.2815E-01 27.00 3.000 781.0 22.27 / 19 Constant 70.40 3.540 Mean 0.5662E-03 0.6227E-03 Sigma 0.1605E-01 0.5633E-03

cm counts

Residuals on Straw Tubes (RIST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 811 -0.1932E-02 0.4381E-01

81.00 19.00 711.0 18.00 / 19 Constant 40.95 2.282 Mean -0.6255E-03 0.1145E-02 Sigma 0.2303E-01 0.1133E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 542 -0.1002E-03 0.5175E-01 68.00 15.00 459.0 21.94 / 19 Constant 19.83 1.462 Mean -0.1880E-02 0.2620E-02 Sigma 0.3216E-01 0.3363E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 811 -0.2021E-02 0.3936E-01

48.00 6.000 757.0 21.42 / 19 Constant 47.51 2.562 Mean 0.2378E-02 0.1009E-02 Sigma 0.2195E-01 0.1031E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 406 -0.2170E-02 0.4536E-01 26.00 3.000 377.0 19.06 / 19 Constant 23.11 1.861 Mean -0.5061E-03 0.1376E-02 Sigma 0.2089E-01 0.1432E-02

cm counts

Residuals on Straw Tubes (LEST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 811 -0.4678E-02 0.4679E-01

87.00 7.000 717.0 14.22 / 19 Constant 38.72 2.242 Mean -0.5474E-03 0.1317E-02 Sigma 0.2543E-01 0.1537E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 462 -0.1473E-02 0.5333E-01 58.00 9.000 395.0 19.65 / 19 Constant 18.84 1.598 Mean 0.4095E-02 0.2042E-02 Sigma 0.2563E-01 0.2419E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 811 -0.4151E-02 0.4459E-01

50.00 8.000 753.0 20.43 / 19 Constant 45.11 2.443 Mean 0.6577E-04 0.1060E-02 Sigma 0.2242E-01 0.1056E-02

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 811 0.1493E-03 0.4879E-01 15.00 729.0 67.00 10.08 / 17 Constant 2.672 0.5871 Mean 0.1315E-02 0.1315E-01 Sigma 0.3846E-01 0.2189E-01

cm counts

Z Residuals on Straw Tubes

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 811 -0.2254 1.640 1.000 0.000 810.0 43.39 / 32 Constant 42.91 1.915 Mean -0.1055 0.5361E-01 Sigma 1.394 0.3866E-01

cm counts

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 811 -0.5728E-01 1.447 1.000 0.000 810.0 39.67 / 31 Constant 43.68 1.977 Mean -0.6858E-01 0.5516E-01 Sigma 1.422 0.4359E-01

cm counts

Residuals on Drift Chambers

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 338 -0.3644E-01 0.3153 37.00 19.00 282.0 17.21 / 12 Constant 26.03 2.583 Mean -0.2491E-02 0.5738E-02 Sigma 0.7437E-01 0.5573E-02

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 338 0.4157 1.709 3.000 3.000 332.0 16.01 / 15 Constant 29.56 2.521 Mean 0.1956 0.6072E-01 Sigma 0.9076 0.6012E-01

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 338 0.3502E-01 0.3095 19.00 37.00 282.0 8.404 / 7 Constant 28.69 2.920 Mean 0.3493E-02 0.5626E-02 Sigma 0.6429E-01 0.5887E-02

cm counts

0

25

50

75

100

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 338 -0.2596E-01 0.1765 0.000 0.000 338.0 1.832 / 1 Constant 115.6 9.970 Mean -0.9656E-03 0.1352E-02 Sigma 0.1873E-01 0.1042E-02

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 317 -0.3333E-01 0.2765 20.00 9.000 288.0 11.51 / 12 Constant 26.14 2.726 Mean -0.3077E-01 0.5686E-02 Sigma 0.7448E-01 0.6210E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 317 0.5411 1.625 1.000 0.000 316.0 12.12 / 15 Constant 28.35 2.224 Mean 0.4464 0.7137E-01 Sigma 0.9806 0.6008E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 317 -0.2118E-01 0.2728 20.00 9.000 288.0 2.360 / 7 Constant 29.00 2.986 Mean -0.3011E-01 0.6264E-02 Sigma 0.6478E-01 0.6571E-02

cm counts

0

50

100

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 317 0.1636E-01 0.1214 0.000 0.000 317.0 13.84 / 1 Constant 100.3 10.95 Mean 0.4397E-02 0.1852E-02 Sigma 0.2167E-01 0.2064E-02

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 343 0.2793E-01 0.3209 17.00 36.00 290.0 7.887 / 12 Constant 28.47 2.465 Mean -0.8798E-02 0.5636E-02 Sigma 0.7880E-01 0.4868E-02

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 343 -0.2924 1.660 2.000 2.000 339.0 9.317 / 15 Constant 34.49 2.647 Mean -0.4050 0.5307E-01 Sigma 0.8541 0.4693E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 343 -0.2845E-01 0.3209 35.00 18.00 290.0 4.453 / 7 Constant 28.47 2.674 Mean 0.9852E-02 0.7498E-02 Sigma 0.7966E-01 0.8670E-02

cm counts

0

50

100

150

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 343 -0.3280E-03 0.1250E-01 0.000 0.000 343.0 -9999. / -1 Constant 278.5 237.4 Mean -0.3384E-03 0.9139E-03 Sigma 0.1270E-01 0.1117E-01

cm counts

Residuals on Drift Chambers

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 396 -0.4246E-01 0.2643 33.00 20.00 343.0 18.68 / 12 Constant 34.16 2.904 Mean -0.3246E-01 0.5295E-02 Sigma 0.7677E-01 0.5060E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 396 0.8629 1.911 4.000 1.000 391.0 18.10 / 13 Constant 38.48 2.803 Mean 0.7172 0.5693E-01 Sigma 0.8585 0.5025E-01

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 396 -0.3728E-01 0.2651 33.00 20.00 343.0 7.240 / 7 Constant 37.89 3.277 Mean -0.2287E-01 0.5701E-02 Sigma 0.6333E-01 0.5016E-02

cm counts

0 50 100 150 200

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 396 -0.1199E-02 0.1244E-01 0.000 0.000 396.0 -9999. / -1 Constant 323.0 251.8 Mean -0.1230E-02 0.2071E-02 Sigma 0.1264E-01 0.1016E-01

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 632 -0.1492E-01

0.2704 9.000 9.000 614.0 21.70 / 11 Constant 44.56 3.319 Mean -0.2593E-01 0.4613E-02 Sigma 0.7069E-01 0.5250E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 632 0.2763E-01 0.2982 35.00 41.00 556.0 21.26 / 11 Constant 28.69 2.453 Mean -0.3537E-03 0.7533E-02 Sigma 0.9374E-01 0.1088E-01

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 632 -0.1091E-01

0.2596 9.000 5.000 618.0 8.914 / 5 Constant 53.97 4.386 Mean -0.1729E-01 0.4321E-02 Sigma 0.5095E-01 0.5334E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 632 -0.8508E-02 0.1176 0.000 2.000 630.0 7.659 / 1 Constant 183.8 12.04 Mean 0.8372E-03 0.1010E-02 Sigma 0.1793E-01 0.8889E-03

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 621 -0.1060E-02

0.2621 8.000 9.000 604.0 21.41 / 11 Constant 42.04 3.094 Mean 0.8812E-02 0.4611E-02 Sigma 0.7482E-01 0.5440E-02

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 621 0.4205E-03 0.2915 36.00 38.00 547.0 21.53 / 11 Constant 30.13 2.554 Mean -0.1682E-01 0.8296E-02 Sigma 0.9988E-01 0.1308E-01

cm counts

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 621 -0.3180E-02

0.2474 6.000 8.000 607.0 24.44 / 5 Constant 48.76 4.329 Mean -0.1052E-01 0.5372E-02 Sigma 0.5619E-01 0.7875E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 621 0.4355E-02 0.1368 0.000 1.000 620.0 1.674 / 1 Constant 158.2 10.81 Mean -0.2784E-02 0.1278E-02 Sigma 0.2171E-01 0.1433E-02

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 664 0.1429E-01

0.2769 14.00 12.00 638.0 15.03 / 9 Constant 44.18 3.257 Mean 0.2351E-01 0.5597E-02 Sigma 0.7136E-01 0.6215E-02

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 664 0.3098E-01 0.3098 30.00 41.00 593.0 14.01 / 11 Constant 30.28 2.411 Mean 0.5310E-03 0.7481E-02 Sigma 0.9496E-01 0.1004E-01

cm counts

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 664 -0.1114E-01

0.2513 9.000 5.000 650.0 21.15 / 5 Constant 56.92 5.003 Mean -0.1360E-01 0.3359E-02 Sigma 0.4558E-01 0.4608E-02

cm counts

0 20 40 60 80 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 664 0.2489E-02 0.1717 6.000 3.000 655.0 8.911 / 4 Constant 87.13 6.139 Mean 0.5524E-02 0.2449E-02 Sigma 0.3922E-01 0.2873E-02

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 647 0.2006E-02

0.2872 10.00 9.000 628.0 29.46 / 9 Constant 36.95 3.067 Mean -0.5714E-02 0.6616E-02 Sigma 0.8211E-01 0.9885E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 647 0.2811E-01 0.3180 37.00 48.00 562.0 15.83 / 11 Constant 31.01 2.658 Mean -0.5430E-02 0.6944E-02 Sigma 0.9116E-01 0.1051E-01

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 647 0.5031E-02

0.2577 4.000 7.000 636.0 15.08 / 5 Constant 52.29 4.341 Mean -0.1520E-02 0.3784E-02 Sigma 0.4956E-01 0.4878E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 647 0.1975E-02 0.1712 1.000 3.000 643.0 20.93 / 4 Constant 85.36 6.749 Mean -0.3228E-02 0.2446E-02 Sigma 0.3779E-01 0.3300E-02

cm counts