Residuals on Straw Tubes (LOST)

0 2000

4000

6000

8000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 117812 -0.3425E-02 0.3618E-01 0.1056E+05

1152. 0.1061E+06 560.7 / 19 Constant 8183. 35.66 Mean 0.3291E-03 0.6515E-04 Sigma 0.1876E-01 0.6187E-04

cm counts

0 2000

4000

6000

8000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 117812 -0.3591E-02 0.3487E-01 0.1175E+05 849.0 0.1052E+06 566.7 / 19 Constant 8197. 35.74 Mean 0.2681E-03 0.6484E-04 Sigma 0.1868E-01 0.6144E-04

cm counts

0 2500

5000

7500

10000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 117812 -0.2743E-02 0.3185E-01

4446. 686.0 0.1127E+06 808.2 / 19 Constant 9279. 38.98 Mean 0.8328E-04 0.5843E-04 Sigma 0.1777E-01 0.5487E-04

cm counts

0 2500

5000

7500

10000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 117812 -0.2841E-02 0.3102E-01 5209. 378.0 0.1122E+06 833.3 / 19 Constant 9336. 39.21 Mean 0.1000E-03 0.5795E-04 Sigma 0.1766E-01 0.5431E-04

cm counts

Residuals on Straw Tubes (RIST)

0

2000

4000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 117812 -0.2565E-02 0.5477E-01 0.1486E+05

2134. 0.1008E+06 91.95 / 19 Constant 4713. 24.29 Mean 0.8866E-03 0.1316E-03 Sigma 0.2744E-01 0.1623E-03

cm counts

0

1000

2000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 71574 -0.3667E-02 0.5846E-01 0.1160E+05 1776.

0.5819E+05 26.47 / 19 Constant 2505. 17.37 Mean -0.2019E-03 0.2043E-03 Sigma 0.3000E-01 0.2714E-03

cm counts

0

2000

4000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 117812 -0.4047E-02 0.5470E-01 0.1190E+05

2171. 0.1037E+06 206.0 / 19 Constant 5102. 25.75 Mean 0.7307E-03 0.1169E-03 Sigma 0.2585E-01 0.1389E-03

cm counts

0

1000

2000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 62849 -0.5060E-02 0.5755E-01 0.1011E+05 1524.

0.5122E+05 55.99 / 19 Constant 2338. 17.05 Mean -0.4983E-05 0.1896E-03 Sigma 0.2776E-01 0.2358E-03

cm counts

Residuals on Straw Tubes (LEST)

0

2000

4000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 117812 -0.2948E-02 0.5487E-01 0.1430E+05

2021. 0.1015E+06 107.8 / 19 Constant 4739. 24.33 Mean 0.1476E-02 0.1320E-03 Sigma 0.2754E-01 0.1631E-03

cm counts

0

1000

2000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 64771 -0.3148E-02 0.5923E-01 0.1020E+05 1544.

0.5302E+05 52.51 / 19 Constant 2254. 16.53 Mean 0.2002E-02 0.2128E-03 Sigma 0.2965E-01 0.2794E-03

cm counts

0

2000

4000

6000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 117812 -0.3780E-02 0.5483E-01 0.1237E+05

1853. 0.1036E+06 181.1 / 19 Constant 5110. 25.72 Mean 0.4862E-03 0.1158E-03 Sigma 0.2569E-01 0.1360E-03

cm counts

0

500

1000

1500

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 117812 -0.3152E-02 0.5872E-01 4502.

0.7880E+05 0.3451E+05 28.31 / 19 Constant 1461. 13.29 Mean 0.1059E-02 0.2670E-03 Sigma 0.2993E-01 0.3544E-03

cm counts

Z Residuals on Straw Tubes

0

2000

4000

6000

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 117812 -0.1524 1.671 364.0 15.00 0.1174E+06 548.6 / 33 Constant 6172. 22.88 Mean -0.7696E-01 0.4678E-02 Sigma 1.481 0.3653E-02

cm counts

0

2000

4000

6000

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 117812 -0.2192 1.655 250.0 19.00 0.1175E+06 1020. / 33 Constant 6174. 22.72 Mean -0.1503 0.4749E-02 Sigma 1.478 0.3570E-02

cm counts

Residuals on Drift Chambers

0

500

1000

1500

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 32937 -0.3393E-01 0.3969 3144. 3175.

0.2662E+05 163.3 / 12 Constant 1696. 18.67 Mean -0.3071E-01 0.9712E-03 Sigma 0.1009 0.1094E-02

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 32937 -0.1050 2.127 290.0 1351.

0.3130E+05 299.4 / 15 Constant 2582. 21.98 Mean -0.1170 0.7115E-02 Sigma 1.044 0.7410E-02

cm counts

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 32937 0.2580E-01 0.3919 2240. 2191.

0.2851E+05 223.5 / 7 Constant 2381. 27.36 Mean 0.1647E-01 0.6888E-03 Sigma 0.6743E-01 0.7837E-03

cm counts

0

2000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 32937 0.1774E-01 0.3336 883.0 934.0 0.3112E+05 50.93 / 1 Constant 4907. 59.11 Mean 0.1379E-02 0.3126E-03 Sigma 0.2887E-01 0.3602E-03

cm counts

Residuals on Drift Chambers

0

500

1000

1500

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 34505 0.1305E-01 0.3735 2981. 2970.

0.2855E+05 39.54 / 12 Constant 1682. 17.50 Mean -0.1177E-01 0.1148E-02 Sigma 0.1178 0.1420E-02

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 34505 0.4928E-01 1.912 189.0 202.0 0.3411E+05 53.01 / 15 Constant 2813. 21.89 Mean 0.1071 0.7081E-02 Sigma 1.083 0.6986E-02

cm counts

0

1000

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 34505 0.1133E-01 0.3723 2236. 2063.

0.3021E+05 77.86 / 7 Constant 2270. 25.08 Mean -0.6912E-02 0.8505E-03 Sigma 0.8141E-01 0.1114E-02

cm counts

0

2000

4000

6000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 34505 0.2134E-01 0.3232 729.0 868.0 0.3291E+05 132.3 / 1 Constant 5188. 61.90 Mean 0.1064E-01 0.3588E-03 Sigma 0.3017E-01 0.4310E-03

cm counts

Residuals on Drift Chambers

0 500 1000

1500

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 36650 -0.1409E-01 0.3871 3603. 3670.

0.2938E+05 70.75 / 12 Constant 2003. 19.70 Mean -0.4419E-02 0.8706E-03 Sigma 0.1015 0.9462E-03

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 36650 -0.5209E-02 2.250 708.0 403.0 0.3554E+05 117.8 / 15 Constant 2647. 21.02 Mean 0.6587E-01 0.7906E-02 Sigma 1.169 0.8433E-02

cm counts

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 36650 0.1237E-01 0.4062 2636. 2486.

0.3153E+05 133.2 / 7 Constant 2759. 28.34 Mean -0.1724E-03 0.6467E-03 Sigma 0.7146E-01 0.7564E-03

cm counts

0 2500

5000

7500

10000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 36650 0.8553E-02 0.3179 1171. 1212.

0.3427E+05 347.2 / 1 Constant 0.1239E+05 106.8 Mean 0.2278E-02 0.1297E-03 Sigma 0.1710E-01 0.9068E-04

cm counts

Residuals on Drift Chambers

0

1000

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 41041 0.1976E-01 0.3769 3111. 3159.

0.3477E+05 26.11 / 12 Constant 2274. 20.32 Mean 0.1436E-02 0.9296E-03 Sigma 0.1112 0.1052E-02

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 41041 -0.1480 2.143 298.0 474.0 0.4027E+05 69.46 / 15 Constant 2734. 20.61 Mean -0.6645E-01 0.8910E-02 Sigma 1.301 0.1009E-01

cm counts

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 41041 0.1779E-01 0.3910 2200. 1691.

0.3715E+05 148.8 / 7 Constant 2990. 28.78 Mean 0.1936E-02 0.7478E-03 Sigma 0.8207E-01 0.9909E-03

cm counts

0

5000

10000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 41041 0.7711E-02 0.3216 769.0 777.0 0.3950E+05 11.29 / 1 Constant 0.1345E+05 108.8 Mean 0.2120E-02 0.1168E-03 Sigma 0.1772E-01 0.8808E-04

cm counts

Residuals on OSIM

0 1000

2000

3000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 72701 0.3686E-02

0.2998 1031. 1177.

0.7049E+05 120.4 / 11 Constant 3916. 27.37 Mean 0.1048E-02 0.6155E-03 Sigma 0.9163E-01 0.7842E-03

cm counts

0

1000

2000

3000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 72701 0.2927E-02 0.3409 5666. 5052.

0.6198E+05 123.5 / 11 Constant 2927. 23.85 Mean 0.1013E-01 0.7948E-03 Sigma 0.9806E-01 0.1111E-02

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 72701 0.3536E-02

0.2492 448.0 553.0 0.7170E+05 25.11 / 5 Constant 6175. 45.35 Mean 0.7505E-03 0.3888E-03 Sigma 0.5421E-01 0.5167E-03

cm counts

0

5000

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 72701 0.2174E-01 0.2014 283.0 423.0 0.7200E+05 0.6864 / 1 Constant 0.1354E+05 98.58 Mean 0.4446E-02 0.1430E-03 Sigma 0.2167E-01 0.1510E-03

cm counts

Residuals on OSIM

0

2000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 73527 -0.2505E-02

0.3011 1131. 1110.

0.7129E+05 283.2 / 11 Constant 4265. 30.07 Mean -0.1011E-02 0.5049E-03 Sigma 0.8162E-01 0.6176E-03

cm counts

0

1000

2000

3000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 73527 -0.1299E-01 0.3439 6188. 5333.

0.6201E+05 97.38 / 11 Constant 2844. 23.39 Mean -0.1141E-01 0.8570E-03 Sigma 0.1014 0.1227E-02

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 73527 0.1094E-02

0.2528 528.0 464.0 0.7254E+05 248.7 / 5 Constant 6575. 48.96 Mean 0.1064E-02 0.3272E-03 Sigma 0.4898E-01 0.4191E-03

cm counts

0

5000

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 73527 0.2513E-02 0.1992 331.0 464.0 0.7273E+05 1.144 / 1 Constant 0.1204E+05 91.42 Mean 0.1247E-02 0.1887E-03 Sigma 0.2627E-01 0.2529E-03

cm counts

Residuals on ISIM

0 1000

2000

3000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 78830 -0.1765E-02

0.3177 2174. 2158.

0.7450E+05 58.15 / 9 Constant 4132. 30.40 Mean -0.4721E-03 0.5860E-03 Sigma 0.8172E-01 0.7884E-03

cm counts

0

1000

2000

3000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 78830 0.1199E-02 0.3501 6474. 5711.

0.6664E+05 131.9 / 11 Constant 3041. 24.30 Mean 0.5966E-02 0.7858E-03 Sigma 0.9925E-01 0.1121E-02

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 78831 0.6135E-02

0.2605 930.0 1042.

0.7686E+05 101.5 / 5 Constant 6478. 47.50 Mean 0.4903E-03 0.3546E-03 Sigma 0.5167E-01 0.4642E-03

cm counts

0 2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 78830 0.2026E-01 0.2300 976.0 1301.

0.7655E+05 251.9 / 4 Constant 7691. 56.21 Mean 0.1012E-01 0.2945E-03 Sigma 0.4416E-01 0.3866E-03

cm counts

Residuals on ISIM

0

2000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 80778 0.5409E-02

0.3198 2515. 2517.

0.7575E+05 348.6 / 9 Constant 4333. 32.43 Mean 0.3443E-02 0.5233E-03 Sigma 0.7662E-01 0.7042E-03

cm counts

0

1000

2000

3000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 80778 -0.1005E-01 0.3527 7177. 6075.

0.6753E+05 113.4 / 11 Constant 3010. 24.16 Mean -0.7097E-02 0.8105E-03 Sigma 0.1005 0.1168E-02

cm counts

0

2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 80778 0.4261E-02

0.2661 1098. 1168.

0.7851E+05 379.3 / 5 Constant 6847. 50.59 Mean 0.3691E-02 0.3137E-03 Sigma 0.4807E-01 0.4016E-03

cm counts

0 2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 80778 -0.5183E-02 0.2314 1346. 1497.

0.7794E+05 580.3 / 4 Constant 8028. 59.30 Mean 0.1419E-02 0.2748E-03 Sigma 0.4169E-01 0.3517E-03

cm counts