Residuals on Drift Chambers

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

501 67442 -0.9616E-02 0.3857 6125. 6145.

0.5517E+05 130.2 / 12 Constant 3364. 25.47 Mean -0.2159E-01 0.7433E-03 Sigma 0.1097 0.8874E-03

cm counts

0

2000

4000

6000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

601 67442 -0.2453E-01 2.019 479.0 1553.

0.6541E+05 249.4 / 15 Constant 5367. 30.76 Mean 0.1108E-02 0.5055E-02 Sigma 1.072 0.5116E-02

cm counts

0

2000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

701 67442 0.1836E-01 0.3820 4476. 4254.

0.5871E+05 206.3 / 7 Constant 4590. 36.51 Mean 0.5675E-02 0.5407E-03 Sigma 0.7517E-01 0.6687E-03

cm counts

0 2500

5000

7500

10000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

801 67442 0.1959E-01 0.3283 1612. 1802.

0.6403E+05 7.724 / 1 Constant 0.1006E+05 84.18 Mean 0.5970E-02 0.2357E-03 Sigma 0.2977E-01 0.2754E-03

cm counts

Residuals on Drift Chambers

0 1000

2000

3000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

502 77691 0.4259E-02 0.3820 6714. 6829.

0.6415E+05 47.13 / 12 Constant 4275. 28.27 Mean -0.1402E-02 0.6364E-03 Sigma 0.1067 0.7095E-03

cm counts

0

2000

4000

6000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

602 77691 -0.8107E-01 2.195 1006. 877.0 0.7581E+05 173.1 / 15 Constant 5368. 29.36 Mean 0.2875E-03 0.5944E-02 Sigma 1.237 0.6545E-02

cm counts

0

2000

4000

6000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

702 77691 0.1530E-01 0.3981 4836. 4177.

0.6868E+05 259.2 / 7 Constant 5744. 40.35 Mean 0.9071E-03 0.4927E-03 Sigma 0.7685E-01 0.6153E-03

cm counts

0 5000

10000

15000

20000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

802 77691 0.8102E-02 0.3199 1940. 1989.

0.7376E+05 223.8 / 1 Constant 0.2584E+05 151.4 Mean 0.2191E-02 0.8555E-04 Sigma 0.1748E-01 0.6244E-04

cm counts

Residuals on OSIM

0 2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

53 146228 0.5731E-03

0.3005 2162. 2287.

0.1418E+06 242.7 / 11 Constant 8193. 40.60 Mean -0.1314E-03 0.3911E-03 Sigma 0.8624E-01 0.4867E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

63 146228 -0.5034E-02 0.3425 0.1185E+05 0.1038E+05 0.1240E+06 163.3 / 11 Constant 5743. 33.28 Mean -0.3065E-03 0.5780E-03 Sigma 0.1003 0.8320E-03

cm counts

0

5000

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

73 146228 0.2308E-02

0.2510 976.0 1017.

0.1442E+06 165.4 / 5 Constant 0.1277E+05 66.65 Mean 0.8979E-03 0.2509E-03 Sigma 0.5142E-01 0.3261E-03

cm counts

0

10000

20000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

83 146228 0.1208E-01 0.2005 614.0 887.0 0.1447E+06 0.1119 / 1 Constant 0.2546E+05 133.9 Mean 0.3025E-02 0.1153E-03 Sigma 0.2381E-01 0.1366E-03

cm counts

Residuals on ISIM

0 2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

33 159608 0.1852E-02

0.3188 4689. 4675.

0.1502E+06 288.4 / 9 Constant 8476. 44.41 Mean 0.1523E-02 0.3903E-03 Sigma 0.7904E-01 0.5239E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

43 159608 -0.4463E-02 0.3515 0.1365E+05 0.1179E+05 0.1342E+06 203.2 / 11 Constant 6044. 34.24 Mean -0.5041E-03 0.5618E-03 Sigma 0.1001 0.8109E-03

cm counts

0

5000

10000

15000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

13 159609 0.5188E-02

0.2633 2028. 2210.

0.1554E+06 387.0 / 5 Constant 0.1333E+05 69.27 Mean 0.2139E-02 0.2352E-03 Sigma 0.4980E-01 0.3035E-03

cm counts

0

5000

10000

15000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

23 159608 0.7426E-02 0.2310 2322. 2798.

0.1545E+06 740.2 / 4 Constant 0.1564E+05 81.11 Mean 0.5613E-02 0.2015E-03 Sigma 0.4317E-01 0.2621E-03

cm counts

Residuals on Φ angle

0

2000

4000

6000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10013 71131 -0.9770E-02

1.674 2093. 1807.

0.6723E+05 102.3 / 6 Constant 5982. 43.77 Mean -0.5432E-01 0.1697E-02 Sigma 0.2613 0.2007E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

5000

10000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10023 82271 0.1120E-01 1.192 603.0 457.0 0.8121E+05 25.44 / 3 Constant 0.1252E+05 78.28 Mean -0.1175E-02 0.8304E-03 Sigma 0.1551 0.8603E-03

Φ_{det}-Φ_{fit} (deg.)

counts

0

2000

4000

6000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10033 153315 0.1569E-02

1.691 6029. 5647.

0.1416E+06 189.6 / 15 Constant 6358. 31.23 Mean 0.1802E-02 0.2619E-02 Sigma 0.5708 0.3312E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

2000

4000

6000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10043 167394 0.1519E-01 1.867 0.1356E+05 0.1347E+05 0.1404E+06 134.4 / 15 Constant 5239. 27.93 Mean 0.1328E-01 0.3367E-02 Sigma 0.6364 0.4732E-02

Φ_{det}-Φ_{fit} (deg.)

counts