Z fit vs. STB Residuals (LOST)

-0.2

-0.1

0

0.1

0.2

-130 0 130 0

50

100

150 ID 1111 ENTRIES 117812 0.00 0.115E+04 0.00 1.00 0.106E+06 1.00 0.00 0.106E+05 0.00

Z (cm) res. (cm)

-0.2

-0.1

0

0.1

0.2

-130 0 130 0.2 0.3 0.4 0.5 0.6 x 10^{-39}

ID 1121 ENTRIES 117812 0.00 849. 0.00 1.00 0.105E+06 1.00 0.00 0.118E+05 0.00

Z (cm) res. (cm)

-0.2

-0.1

0

0.1

0.2

-130 0 130 0

50

100

150

200 ID 1112 ENTRIES 117812 0.00 686. 0.00 0.00 0.113E+06 0.00 0.00 0.445E+04 0.00

Z (cm) res. (cm)

-0.2

-0.1

0

0.1

0.2

-130 0 130 0

50

100

150

200 ID 1122 ENTRIES 117812 0.00 378. 0.00 0.00 0.112E+06 0.00 0.00 0.521E+04 0.00

Z (cm) res. (cm)

Z fit vs. STB Residuals (RIST)

-0.2

-0.1

0

0.1

0.2

-130 0 130 0 25 50 75 100 ID 1211 ENTRIES 117812 0.00 0.213E+04 0.00 0.00 0.101E+06 0.00 1.00 0.149E+05 1.00

Z (cm) res. (cm)

-0.2

-0.1

0

0.1

0.2

-130 0 130

0.2

0.4

0.6

0.8 x 10^{-39}

ID 1221 ENTRIES 71574 0.00 0.178E+04 0.00 0.00 0.582E+05 0.00 1.00 0.116E+05 1.00

Z (cm) res. (cm)

-0.2

-0.1

0

0.1

0.2

-130 0 130 0 25 50 75 100 ID 1212 ENTRIES 117812 0.00 0.217E+04 0.00 0.00 0.104E+06 0.00 0.00 0.119E+05 0.00

Z (cm) res. (cm)

-0.2

-0.1

0

0.1

0.2

-130 0 130 0

20

40

60 ID 1222 ENTRIES 62849 0.00 0.152E+04 0.00 0.00 0.512E+05 0.00 0.00 0.101E+05 0.00

Z (cm) res. (cm)

Z fit vs. STB Residuals (LEST)

-0.2

-0.1

0

0.1

0.2

-130 0 130 0 25 50 75 100 ID 1311 ENTRIES 117812 0.00 0.202E+04 0.00 1.00 0.101E+06 0.00 0.00 0.143E+05 1.00

Z (cm) res. (cm)

-0.2

-0.1

0

0.1

0.2

-130 0 130

0.2 0.3 0.4 0.5 0.6 x 10^{-39}

ID 1321 ENTRIES 64771 0.00 0.154E+04 0.00 0.00 0.530E+05 0.00 1.00 0.102E+05 1.00

Z (cm) res. (cm)

-0.2

-0.1

0

0.1

0.2

-130 0 130 0 25 50 75 100 ID 1312 ENTRIES 117812 0.00 0.185E+04 0.00 0.00 0.104E+06 0.00 0.00 0.124E+05 0.00

Z (cm) res. (cm)

-0.2

-0.1

0

0.1

0.2

-130 0 130 0 10 20 30 40 ID 1322 ENTRIES 39972 0.00 960. 0.00 0.00 0.345E+05 0.00 0.00 0.450E+04 0.00

Z (cm) res. (cm)

Z fit vs. STB Z Residuals

-5

0

5

10

-130 0 130 0

50

100

150 ID 1401 ENTRIES 117812 0.00 15.0 0.00 1.00 0.117E+06 0.00 0.00 363. 1.00

Z (cm) res. (cm)

-5

0

5

10

-130 0 130 0

50

100

150 ID 1402 ENTRIES 117812 0.00 19.0 0.00 0.00 0.118E+06 0.00 0.00 250. 0.00

Z (cm) res. (cm)

Z fit (STB) vs. DCs Residuals

-1 -0.5 0 0.5 1

-130 0 130 0

20

40

ID 1511 ENTRIES 32937 0.00 0.318E+04 0.00 1.00 0.266E+05 0.00 0.00 0.314E+04 0.00

Z (cm) res. (cm)

-10 -5 0 5 10

-130 0 130

0.4

0.42

0.44

0.46 x 10^{-39}

ID 1611 ENTRIES 32937 1.00 0.135E+04 0.00 0.00 0.313E+05 0.00 0.00 290. 0.00

Z (cm) res. (cm)

-1 -0.5 0 0.5 1

-130 0 130 0

20

40

60

80 ID 2611 ENTRIES 32937 0.00 0.219E+04 0.00 1.00 0.285E+05 0.00 0.00 0.224E+04 0.00

Z (cm) res. (cm)

-1 -0.5 0 0.5 1

-130 0 130 0 25 50 75 100 ID 3611 ENTRIES 32937 0.00 934. 0.00 1.00 0.311E+05 0.00 0.00 883. 0.00

Z (cm) res. (cm)

Z fit (STB) vs. DCs Residuals

-1 -0.5 0 0.5 1

-130 0 130 0 10 20 30 40 50 ID 1512 ENTRIES 34505 0.00 0.297E+04 0.00 0.00 0.286E+05 0.00 0.00 0.298E+04 0.00

Z (cm) res. (cm)

-10 -5 0 5 10

-130 0 130

0.35 0.4 0.45 0.5 x 10^{-39}

ID 1612 ENTRIES 34505 0.00 202. 0.00 0.00 0.341E+05 0.00 0.00 189. 0.00

Z (cm) res. (cm)

-1 -0.5 0 0.5 1

-130 0 130 0

20

40

60 ID 2612 ENTRIES 34505 0.00 0.206E+04 0.00 0.00 0.302E+05 0.00 0.00 0.224E+04 0.00

Z (cm) res. (cm)

-1 -0.5 0 0.5 1

-130 0 130 0

50

100

ID 3612 ENTRIES 34505 0.00 868. 0.00 0.00 0.329E+05 0.00 0.00 729. 0.00

Z (cm) res. (cm)

Z fit (STB) vs. DCs Residuals

-1 -0.5 0 0.5 1

-130 0 130 0

20

40

ID 1521 ENTRIES 36650 0.00 0.367E+04 0.00 0.00 0.294E+05 0.00 0.00 0.360E+04 0.00

Z (cm) res. (cm)

-10 -5 0 5 10

-130 0 130 0.2

0.4

0.6 x 10^{-39}

ID 1621 ENTRIES 36650 0.00 403. 0.00 0.00 0.355E+05 0.00 0.00 708. 0.00

Z (cm) res. (cm)

-1 -0.5 0 0.5 1

-130 0 130 0 20 40 60 80 ID 2621 ENTRIES 36650 0.00 0.249E+04 0.00 0.00 0.315E+05 0.00 0.00 0.264E+04 0.00

Z (cm) res. (cm)

-1 -0.5 0 0.5 1

-130 0 130 0

50

100

150

200 ID 3621 ENTRIES 36650 0.00 0.121E+04 0.00 0.00 0.343E+05 0.00 0.00 0.117E+04 0.00

Z (cm) res. (cm)

Z fit (STB) vs. DCs Residuals

-1 -0.5 0 0.5 1

-130 0 130 0

20

40

60 ID 1522 ENTRIES 41041 0.00 0.316E+04 0.00 0.00 0.348E+05 0.00 0.00 0.311E+04 0.00

Z (cm) res. (cm)

-10 -5 0 5 10

-130 0 130

0.2

0.4

0.6

0.8 x 10^{-39}

ID 1622 ENTRIES 41041 0.00 474. 0.00 0.00 0.403E+05 0.00 0.00 298. 0.00

Z (cm) res. (cm)

-1 -0.5 0 0.5 1

-130 0 130 0 20 40 60 80 ID 2622 ENTRIES 41041 0.00 0.169E+04 0.00 0.00 0.372E+05 0.00 0.00 0.220E+04 0.00

Z (cm) res. (cm)

-1 -0.5 0 0.5 1

-130 0 130 0 50 100 150 200 ID 3622 ENTRIES 41041 0.00 777. 0.00 0.00 0.395E+05 0.00 0.00 769. 0.00

Z (cm) res. (cm)

Z fit (STB) vs. OSIM Residuals

-1

-0.5

0

0.5

1

-130 0 130 0

25

50

75

100 ID 1051 ENTRIES 72701 0.00 0.118E+04 0.00 0.00 0.705E+05 0.00 0.00 0.103E+04 0.00

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-130 0 130

0.2 0.3 0.4 0.5 0.6 x 10^{-39}

ID 1061 ENTRIES 72701 0.00 0.505E+04 0.00 0.00 0.620E+05 0.00 0.00 0.567E+04 0.00

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-130 0 130 0

50

100

150 ID 1071 ENTRIES 72701 0.00 553. 0.00 0.00 0.717E+05 0.00 0.00 448. 0.00

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-130 0 130 0

100

200

300 ID 1081 ENTRIES 72701 0.00 423. 0.00 0.00 0.720E+05 0.00 0.00 283. 0.00

Z (cm) res. (cm)

Z fit (STB) vs. OSIM Residuals

-1

-0.5

0

0.5

1

-130 0 130 0 25 50 75 100 ID 1052 ENTRIES 73527 0.00 0.111E+04 0.00 0.00 0.713E+05 0.00 0.00 0.113E+04 0.00

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-130 0 130

0.35

0.4

0.45

0.5 x 10^{-39}

ID 1062 ENTRIES 73527 0.00 0.533E+04 0.00 0.00 0.620E+05 0.00 0.00 0.619E+04 0.00

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-130 0 130 0

50

100

150 ID 1072 ENTRIES 73527 0.00 464. 0.00 0.00 0.725E+05 0.00 0.00 528. 0.00

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-130 0 130 0

100

200

ID 1082 ENTRIES 73527 0.00 464. 0.00 0.00 0.727E+05 0.00 0.00 331. 0.00

Z (cm) res. (cm)

Z fit (STB) vs. ISIM Residuals

-1

-0.5

0

0.5

1

-130 0 130 0

25

50

75

100 ID 1031 ENTRIES 78830 0.00 0.216E+04 0.00 0.00 0.745E+05 0.00 0.00 0.217E+04 0.00

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-130 0 130

0.375 0.4 0.425

0.45

0.475 x 10^{-39}

ID 1041 ENTRIES 78830 0.00 0.571E+04 0.00 0.00 0.666E+05 0.00 0.00 0.647E+04 0.00

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-130 0 130 0

50

100

150 ID 1011 ENTRIES 78830 0.00 0.104E+04 0.00 0.00 0.769E+05 0.00 0.00 929. 0.00

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-130 0 130 0

50

100

150

200 ID 1021 ENTRIES 78830 0.00 0.130E+04 0.00 0.00 0.766E+05 0.00 0.00 976. 0.00

Z (cm) res. (cm)

Z fit (STB) vs. ISIM Residuals

-1

-0.5

0

0.5

1

-130 0 130 0

50

100 ID 1032 ENTRIES 80778 0.00 0.252E+04 0.00 0.00 0.757E+05 0.00 0.00 0.252E+04 0.00

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-130 0 130

0.3

0.4

0.5

0.6 x 10^{-39}

ID 1042 ENTRIES 80778 0.00 0.608E+04 0.00 0.00 0.675E+05 0.00 0.00 0.718E+04 0.00

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-130 0 130 0

50

100

150 ID 1012 ENTRIES 80778 0.00 0.117E+04 0.00 0.00 0.785E+05 0.00 0.00 0.110E+04 0.00

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-130 0 130 0

50

100

150

200 ID 1022 ENTRIES 80778 0.00 0.150E+04 0.00 0.00 0.779E+05 0.00 0.00 0.135E+04 0.00

Z (cm) res. (cm)

Z fit (DCs) vs. DCs Residuals

-1 -0.5 0 0.5 1

-62.5 0 62.5 0

20

40

ID 1711 ENTRIES 32937 6.00 0.316E+04 5.00 3.00 0.266E+05 1.00 5.00 0.313E+04 7.00

Z (cm) res. (cm)

-10 -5 0 5 10

-62.5 0 62.5

0.2

0.4

0.6 x 10^{-39}

ID 1811 ENTRIES 32937 14.0 0.134E+04 0.00 0.00 0.313E+05 0.00 0.00 277. 13.0

Z (cm) res. (cm)

-1 -0.5 0 0.5 1

-62.5 0 62.5 0

20

40

60

80 ID 2811 ENTRIES 32937 3.00 0.218E+04 6.00 5.00 0.285E+05 3.00 6.00 0.223E+04 4.00

Z (cm) res. (cm)

-1 -0.5 0 0.5 1

-62.5 0 62.5 0

50

100

ID 3811 ENTRIES 32937 3.00 927. 4.00 8.00 0.311E+05 9.00 3.00 880. 0.00

Z (cm) res. (cm)

Z fit (DCs) vs. DCs Residuals

-1 -0.5 0 0.5 1

-62.5 0 62.5 0 10 20 30 40 50 ID 1712 ENTRIES 34505 0.00 0.297E+04 2.00 0.00 0.286E+05 1.00 1.00 0.298E+04 0.00

Z (cm) res. (cm)

-10 -5 0 5 10

-62.5 0 62.5

0.2

0.4

0.6 x 10^{-39}

ID 1812 ENTRIES 34505 1.00 201. 0.00 0.00 0.341E+05 0.00 0.00 186. 3.00

Z (cm) res. (cm)

-1 -0.5 0 0.5 1

-62.5 0 62.5 0

20

40

60 ID 2812 ENTRIES 34505 0.00 0.206E+04 2.00 0.00 0.302E+05 1.00 1.00 0.224E+04 0.00

Z (cm) res. (cm)

-1 -0.5 0 0.5 1

-62.5 0 62.5 0

50

100

150 ID 3812 ENTRIES 34505 1.00 865. 2.00 0.00 0.329E+05 1.00 0.00 729. 0.00

Z (cm) res. (cm)

Z fit (DCs) vs. DCs Residuals

-1 -0.5 0 0.5 1

-95 0 95 0

20

40

60 ID 1721 ENTRIES 36650 0.00 0.367E+04 2.00 1.00 0.294E+05 2.00 0.00 0.360E+04 2.00

Z (cm) res. (cm)

-10 -5 0 5 10

-95 0 95

0.35 0.4 0.45 0.5 x 10^{-39}

ID 1821 ENTRIES 36650 1.00 402. 0.00 0.00 0.355E+05 0.00 0.00 702. 6.00

Z (cm) res. (cm)

-1 -0.5 0 0.5 1

-95 0 95 0

20

40

60

ID 2821 ENTRIES 36650 0.00 0.248E+04 2.00 1.00 0.315E+05 2.00 0.00 0.263E+04 2.00

Z (cm) res. (cm)

-1 -0.5 0 0.5 1

-95 0 95 0

50

100

150

200 ID 3821 ENTRIES 36650 0.00 0.121E+04 0.00 1.00 0.343E+05 5.00 0.00 0.117E+04 1.00

Z (cm) res. (cm)

Z fit (DCs) vs. DCs Residuals

-1 -0.5 0 0.5 1

-95 0 95 0

20

40

60 ID 1722 ENTRIES 41041 0.00 0.316E+04 0.00 0.00 0.348E+05 1.00 0.00 0.311E+04 1.00

Z (cm) res. (cm)

-10 -5 0 5 10

-95 0 95 0.4

0.42

0.44 x 10^{-39}

ID 1822 ENTRIES 41041 0.00 474. 0.00 0.00 0.403E+05 0.00 0.00 296. 2.00

Z (cm) res. (cm)

-1 -0.5 0 0.5 1

-95 0 95 0 20 40 60 80 ID 2822 ENTRIES 41041 0.00 0.169E+04 1.00 0.00 0.371E+05 1.00 0.00 0.220E+04 0.00

Z (cm) res. (cm)

-1 -0.5 0 0.5 1

-95 0 95 0 50 100 150 200 ID 3822 ENTRIES 41041 0.00 777. 0.00 0.00 0.395E+05 1.00 0.00 768. 1.00

Z (cm) res. (cm)

Z fit (OSIM) vs. OSIM Residuals

-1

-0.5

0

0.5

1

-15 0 15 0 20 40 60 80 ID 951 ENTRIES 72701 6.00 0.116E+04 7.00 45.0 0.704E+05 52.0 3.00 0.102E+04 4.00

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-15 0 15 0.3

0.4

0.5

0.6 x 10^{-39}

ID 961 ENTRIES 72701 54.0 0.500E+04 0.00 0.00 0.620E+05 0.00 0.00 0.560E+04 63.0

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-15 0 15 0

50

100

ID 971 ENTRIES 72701 4.00 544. 5.00 49.0 0.716E+05 56.0 1.00 445. 2.00

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-15 0 15 0

100

200

ID 981 ENTRIES 72701 2.00 419. 2.00 51.0 0.719E+05 60.0 1.00 281. 1.00

Z (cm) res. (cm)

Z fit (OSIM) vs. OSIM Residuals

-1

-0.5

0

0.5

1

-15 0 15 0

25

50

75

100 ID 952 ENTRIES 73527 2.00 0.110E+04 4.00 26.0 0.712E+05 29.0 4.00 0.112E+04 8.00

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-15 0 15

0.2

0.4

0.6 x 10^{-39}

ID 962 ENTRIES 73527 32.0 0.530E+04 0.00 0.00 0.620E+05 0.00 0.00 0.615E+04 41.0

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-15 0 15 0

50

100

150 ID 972 ENTRIES 73527 0.00 461. 3.00 31.0 0.725E+05 36.0 1.00 525. 2.00

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-15 0 15 0

100

200

300 ID 982 ENTRIES 73527 5.00 455. 4.00 27.0 0.727E+05 35.0 0.00 329. 2.00

Z (cm) res. (cm)

Z fit (ISIM) vs. ISIM Residuals

-1

-0.5

0

0.5

1

-15 0 15 0 20 40 60 80 100 ID 931 ENTRIES 78830 17.0 0.212E+04 22.0 47.0 0.744E+05 64.0 14.0 0.214E+04 20.0

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-15 0 15

0.2

0.4

0.6 x 10^{-39}

ID 941 ENTRIES 78830 78.0 0.563E+04 0.00 0.00 0.666E+05 0.00 0.00 0.637E+04 106.

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-15 0 15 0

50

100

ID 911 ENTRIES 78830 14.0 0.101E+04 18.0 50.0 0.767E+05 76.0 14.0 903. 12.0

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-15 0 15 0

50

100

150

200 ID 921 ENTRIES 78830 10.0 0.127E+04 18.0 54.0 0.764E+05 71.0 14.0 945. 17.0

Z (cm) res. (cm)

Z fit (ISIM) vs. ISIM Residuals

-1

-0.5

0

0.5

1

-15 0 15 0 25 50 75 100 ID 932 ENTRIES 80778 19.0 0.248E+04 20.0 39.0 0.757E+05 48.0 25.0 0.246E+04 26.0

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-15 0 15

0.35 0.4 0.45 0.5 x 10^{-39}

ID 942 ENTRIES 80778 83.0 0.599E+04 0.00 0.00 0.675E+05 0.00 0.00 0.708E+04 94.0

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-15 0 15 0

50

100

150 ID 912 ENTRIES 80778 21.0 0.113E+04 18.0 44.0 0.784E+05 58.0 18.0 0.106E+04 18.0

Z (cm) res. (cm)

-1

-0.5

0

0.5

1

-15 0 15 0

50

100

150

ID 922 ENTRIES 80778 14.0 0.146E+04 24.0 44.0 0.778E+05 60.0 25.0 0.131E+04 10.0

Z (cm) res. (cm)