Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5111 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5112 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5121 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2122 46 0.7471E-01 0.4062 2.000 1.000 43.00 2.787 / 7 Constant 4.179 1.208 Mean 0.5928E-01 0.4183E-01 Sigma 0.8178E-01 0.5235E-01

cm counts

0 2 4 6 8 10

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3122 46 0.2065 1.935 0.000 0.000 46.00 9.814 / 10 Constant 3.029 0.7771 Mean 0.3912E-02 0.3553 Sigma 1.219 0.4580

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4122 46 -0.4891E-02 0.1150E-01 0.000 0.000 46.00 -9999. / -1 Constant 40.25 75.44 Mean -0.4553E-02 0.1734E-01 Sigma 0.1173E-01 0.2231E-01

cm counts

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5122 46 0.7471E-01 0.4062 2.000 1.000 43.00 0.2551 / 2 Constant 156.0 489.1 Mean 1.177 0.3661 Sigma 0.4152 0.1892

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5211 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5212 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5221 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5311 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5312 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5321 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2411 37 -0.5720E-01 0.2114 2.000 2.000 33.00 5.022 / 6 Constant 5.655 1.640 Mean -0.9216E-01 0.1367E-01 Sigma 0.5129E-01 0.1469E-01

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3411 37 0.2353 1.972 1.000 2.000 34.00 5.536 / 9 Constant 2.931 0.8656 Mean 0.4548 0.5292 Sigma 1.387 0.8520

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4411 37 0.2196E-01 0.1786 0.000 0.000 37.00 5.851 / 5 Constant 19.61 4.752 Mean 0.1662E-01 0.2733E-02 Sigma 0.1376E-01 0.2291E-02

cm counts

0 2 4 6 8

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5411 37 0.5492E-01 0.2080 2.000 2.000 33.00 1.498 / 1 Constant 8.810 9.194 Mean 0.1033 0.1428 Sigma 0.4823E-01 0.6867E-01

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5412 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5421 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5511 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5512 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2521 36 -0.7222E-01 0.2680 0.000 0.000 36.00 2.476 / 9 Constant 4.308 1.118 Mean -0.8099E-01 0.1852E-01 Sigma 0.8628E-01 0.2038E-01

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3521 36 1.028 1.104 0.000 0.000 36.00 2.790 / 7 Constant 4.015 1.008 Mean 0.9436 0.3532 Sigma 0.9671 0.4387

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4521 36 -0.8333E-02 0.9317E-02 0.000 0.000 36.00 -9999. / -1 Constant 38.00 83.44 Mean -0.5911E-02 0.1967E-01 Sigma 0.9583E-02 0.1594E-01

cm counts

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5521 36 0.7222E-01 0.2680 0.000 0.000 36.00 1.271 / 3 Constant 4.504 1.412 Mean 0.5916E-01 0.4711E-01 Sigma 0.6144E-01 0.4731E-01

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5611 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5612 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5621 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5622 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5711 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5712 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5721 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5811 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

0 2 4 6 8

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2812 33 0.4609E-01 0.1080 0.000 1.000 32.00 7.232 / 5 Constant 5.802 2.364 Mean 0.7076E-01 0.5006E-01 Sigma 0.4221E-01 0.6547E-01

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3812 33 0.4962 1.650 0.000 0.000 33.00 7.897 / 10 Constant 1.800 0.5879 Mean 0.4668E-01 0.8161 Sigma 1.898 1.506

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4812 33 0.1932E-01 0.6806E-01 0.000 0.000 33.00 2.000 / 1 Constant 26.02 5.099 Mean 0.1249E-01 0.2733E-02 Sigma 0.1103E-01 0.1214E-02

cm counts

0 2 4 6 8

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5812 33 0.4531E-01 0.1067 0.000 1.000 32.00 0.7506 / 2 Constant 29.78 92.99 Mean 0.7923 0.5103 Sigma 0.3769 0.4336

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5821 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5822 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 1

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 41 -0.6366E-01

0.1713 0.000 0.000 41.00 13.35 / 9 Constant 2.391 0.8056 Mean -0.5955E-03 0.6413E-01 Sigma 0.1205 0.4050

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 41 0.8421E-02 0.3014 1.000 2.000 38.00 6.548 / 7 Constant 2.213 1.576 Mean 0.2002E-01 0.6817E-01 Sigma 0.1446 0.1781

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

131 41 -0.1488E-01 0.3820E-01

0.000 0.000 41.00 5.987 / 5 Constant 25.35 5.501 Mean -0.5098E-02 0.1938E-02 Sigma 0.1107E-01 0.1677E-02

cm counts

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

141 41 -0.6171E-01 0.1679 0.000 0.000 41.00 3.461 / 3 Constant 9.065 3.497 Mean -0.1420E-01 0.7284E-02 Sigma 0.1815E-01 0.7693E-02

cm counts

Residuals on OSIM - module 1

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

132 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

142 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 2

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 14 0.7615E-01

0.1689 1.000 0.000 13.00 1.611 / 2 Constant 5.529 13.69 Mean 0.6831 1.170 Sigma 0.4460 0.5624

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 14 0.4714E-01 0.2060 0.000 0.000 14.00 0.3614 / 4 Constant 3.465 16.10 Mean 1.317 2.181 Sigma 0.8709 1.997

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

231 14 -0.5714E-02

0.2553 0.000 0.000 14.00 0.1171 / 2 Constant 2.727 1.515 Mean -0.4081E-01 0.4793E-01 Sigma 0.9015E-01 0.6089E-01

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

241 14 -0.7143E-02 0.2228 0.000 0.000 14.00 -9999. / -1 Constant 5.744 32.93 Mean 0.1453E-02 0.1756E-01 Sigma 0.1005E-01 0.5940E-01

cm counts

Residuals on OSIM - module 2

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

232 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

242 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

331 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

341 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

332 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

342 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

431 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

441 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

432 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

442 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

531 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

541 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 11 -0.1380 0.1753 1.000 0.000 10.00 0.7343 / 2 Constant 2.382 1.786 Mean -0.1321E-01 0.3811E-01 Sigma 0.7876E-01 0.4983E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 11 0.9800E-01 0.1398 1.000 0.000 10.00 0.4335 / 3 Constant 1.142 0.8873 Mean 0.2914E-01 0.5353 Sigma 0.3043 1.422

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

532 11 -0.1173 0.2098 0.000 0.000 11.00 2.895 / 2 Constant 1.446 0.9453 Mean -0.6651E-01 0.9331E-01 Sigma 0.1175 0.1671

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

542 11 0.1280 0.1696 0.000 1.000 10.00 -0.2000E+05/ -2 Constant 4.000 0.1043E-01 Mean 0.3505E-01 1.074 Sigma 6.505 0.5843E+08

cm counts

Residuals on OSIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

631 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

641 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 38 -0.7316E-01

0.2245 0.000 0.000 38.00 2.289 / 7 Constant 4.918 1.171 Mean -0.1463 0.2346E-01 Sigma 0.6049E-01 0.2175E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 38 -0.1813E-01 0.2572 2.000 4.000 32.00 4.966 / 8 Constant 2.678 1.527 Mean 0.1346E-01 0.3152E-01 Sigma 0.8367E-01 0.5672E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

632 38 0.1947E-01 0.4915E-01

0.000 0.000 38.00 6.589 / 6 Constant 11.20 3.739 Mean 0.3139E-01 0.5512E-02 Sigma 0.2433E-01 0.7152E-02

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

642 38 0.7421E-01 0.2209 0.000 0.000 38.00 -9999. / -1 Constant 2.108 8.628 Mean 0.1351E-01 0.4930 Sigma 0.5193E-01 0.5419

cm counts

Residuals on OSIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

731 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

741 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 7

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 13 -0.7693E-03

0.2820 0.000 0.000 13.00 0.1841 / 1 Constant 5.353 12.60 Mean -0.1168 0.2631E-01 Sigma 0.5850E-01 0.2566E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 13 0.5909E-01 0.4017 0.000 2.000 11.00 0.1814 / 3 Constant 35.60 148.0 Mean 2.147 0.7845 Sigma 0.8313 0.6792

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

732 13 -0.2308E-02

0.2120 0.000 0.000 13.00 1.426 / 3 Constant 1.357 0.5994 Mean 0.1117 0.7310 Sigma 0.3195 1.106

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

742 13 0.8462E-02 0.1830 0.000 0.000 13.00 -0.2000E+05/ -2 Constant 1.000 0.6191E-03 Mean 0.7084E-02 0.7293 Sigma 10.18 0.2456E+07

cm counts

Residuals on OSIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

831 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

841 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

832 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

842 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

911 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

921 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

931 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

941 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

912 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

922 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

932 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

942 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 10

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1011 7 -0.7000E-01

0.2775 0.000 0.000 7.000 0.000 / 0 Constant 1.009 0.5774 Mean 0.5927E-01 2.850 Sigma 0.1971 0.4914E+07

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1021 7 0.1900 0.4824 0.000 1.000 6.000 0.000 / 0 Constant 1.008 0.5774 Mean 0.1054E-01 4.642 Sigma 0.3881 0.2636E+08

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1031 7 0.2429E-01

0.1068 0.000 0.000 7.000 0.3997 / 2 Constant 1.258 1.985 Mean 0.1481E-01 0.1384 Sigma 0.1372 0.3595

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1041 7 -0.5857E-01 0.2642 0.000 0.000 7.000 -0.2000E+05/ -2 Constant 1.000 0.5204E-02 Mean 0.3593E-01 2.475 Sigma 6.233 0.5161E+08

cm counts

Residuals on OSIM - module 10

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1012 1 0.3000E-01 0.1936E-09

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 0.3000E-01 337.1 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1022 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1032 1 -0.1000E-01 0.2137E-10

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.1000E-01 337.1 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1042 1 0.3000E-01 0.1936E-09 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.4967E-03 Mean 0.3775E-01 0.6635 Sigma 21.17 0.1715E+07

cm counts

Residuals on ISIM - module 1

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1111 44 0.2545E-01

0.1893 0.000 0.000 44.00 10.97 / 9 Constant 3.989 1.151 Mean -0.3555E-02 0.1641E-01 Sigma 0.6702E-01 0.2262E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1121 44 0.9487E-02 0.2929 1.000 4.000 39.00 5.739 / 9 Constant 3.222 1.206 Mean -0.2365E-01 0.2683E-01 Sigma 0.7711E-01 0.4548E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1131 44 -0.1273E-01 0.7753E-01

0.000 0.000 44.00 7.601 / 7 Constant 14.29 4.028 Mean -0.1251E-02 0.3249E-02 Sigma 0.1808E-01 0.4310E-02

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1141 44 -0.2409E-01 0.1729 0.000 0.000 44.00 11.75 / 6 Constant 11.58 3.461 Mean 0.2616E-02 0.4461E-02 Sigma 0.1605E-01 0.3827E-02

cm counts

Residuals on ISIM - module 1

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1112 1 0.3000E-01 0.1936E-09

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.4967E-03 Mean 0.3775E-01 0.6635 Sigma 21.17 0.1715E+07

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1122 1 0.1000E-01 0.3692E-10 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 0.1000E-01 337.1 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1132 1 -0.1000E-01 0.2137E-10

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.1000E-01 337.1 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1142 1 -0.3000E-01 0.1062E-09 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.3647E-02 Mean -0.3788E-01 1.195 Sigma 4.595 0.6278E+08

cm counts

Residuals on ISIM - module 2

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1211 9 -0.1475 0.2578 0.000 1.000 8.000 0.2043E-02/ 2 Constant 1.055 1.079 Mean 0.8266E-01 0.5361 Sigma 0.3193 1.932

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1221 9 0.9222E-01 0.2367 0.000 0.000 9.000 0.000 / 0 Constant 1.019 0.8190 Mean 0.1672E-01 1.480 Sigma 0.4452 8.100

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1231 9 0.1400 0.2385 1.000 0.000 8.000 0.5069E-04/ 1 Constant 1.003 0.9204 Mean 0.2000E-01 1.275 Sigma 0.2482 9.910

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1241 9 -0.1222E-01 0.1949 0.000 0.000 9.000 0.9766 / 1 Constant 1.546 0.9421 Mean 0.8715E-02 0.5469E-01 Sigma 0.7377E-01 0.8164E-01

cm counts

Residuals on ISIM - module 2

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1232 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1242 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1331 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1341 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1332 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1342 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 4

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1411 2 0.2400 0.1900 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.5204E-02 Mean 0.3593E-01 2.475 Sigma 6.233 0.5161E+08

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1421 2 0.3000E-01 0.4000E-01 0.000 0.000 2.000 -9999. / -1 Constant 1.328 13.91 Mean 0.3000E-01 0.4991E-01 Sigma 0.5313E-01 1.048

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1431 2 -0.7000E-01 0.6000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.309 14.64 Mean -0.7000E-01 0.7878E-01 Sigma 0.8174E-01 1.697

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1441 2 0.2300 0.1800 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.5204E-02 Mean 0.3593E-01 2.475 Sigma 6.233 0.5161E+08

cm counts

Residuals on ISIM - module 4

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1412 11 0.1445 0.1845 0.000 0.000 11.00 0.6476 / 3 Constant 1.371 0.6532 Mean 0.5253E-01 0.1262 Sigma 0.1236 0.2167

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1422 11 0.9000E-01 0.1905 0.000 0.000 11.00 0.7407E-04/ 2 Constant 1.004 0.5963 Mean 0.2804E-01 2.612 Sigma 0.5816 19.36

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1432 11 -0.5182E-01 0.6293E-01

0.000 0.000 11.00 0.7795 / 1 Constant 3.833 2.176 Mean -0.4628E-01 0.1546E-01 Sigma 0.3833E-01 0.2900E-01

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1442 11 0.1318 0.1707 0.000 0.000 11.00 1.193 / 3 Constant 1.225 0.6800 Mean 0.2985E-01 0.1527 Sigma 0.1330 0.3666

cm counts

Residuals on ISIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1511 1 0.000 0.000 0.000 1.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1521 1 0.000 0.000 0.000 1.000 0.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1531 1 0.000 0.000 0.000 0.000 1.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1541 1 0.000 0.000 0.000 1.000 0.000

cm counts

Residuals on ISIM - module 5

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1512 44 0.5093E-01

0.1704 0.000 1.000 43.00 12.85 / 9 Constant 2.642 0.7901 Mean 0.6881E-01 0.4394E-01 Sigma 0.1043 0.8006E-01

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1522 44 -0.2189E-01 0.2624 2.000 5.000 37.00 7.966 / 11 Constant 2.088 0.7815 Mean -0.3924E-02 0.3850E-01 Sigma 0.9399E-01 0.7155E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1532 44 0.3091E-01 0.8872E-01

0.000 0.000 44.00 6.643 / 6 Constant 10.24 2.925 Mean 0.4731E-01 0.9405E-02 Sigma 0.2854E-01 0.9327E-02

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1542 44 0.6727E-01 0.2060 0.000 0.000 44.00 3.346 / 6 Constant 0.3031E+09 0.6589E+09 Mean 3.013 0.6463E-01 Sigma 0.4889 0.3707E-01

cm counts

Residuals on ISIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1631 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1641 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 6

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1612 10 -0.2778E-01

0.3088 1.000 0.000 9.000 0.000 / 0 Constant 1.500 1.204 Mean 0.1822 1.240 Sigma 1.296 1.414

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1622 10 0.7750E-01 0.3712 0.000 2.000 8.000 0.000 / 0 Constant 9.393 56.02 Mean 2.745 1.181 Sigma 1.430 2.459

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1632 10 0.000 0.000 1.000 0.000 9.000

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1642 10 -0.4800E-01 0.1674 0.000 0.000 10.00 1.991 / 1 Constant 1.362 2.327 Mean 0.4168E-01 0.6734 Sigma 0.1882 1.060

cm counts

Residuals on ISIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1731 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1741 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1732 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1742 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 8

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1811 11 0.3727E-01

0.2216 0.000 0.000 11.00 0.9228 / 1 Constant 3.927 2.354 Mean -0.5319E-01 0.6063E-02 Sigma 0.1473E-01 0.7866E-02

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1821 11 0.3400E-01 0.3279 0.000 1.000 10.00 0.8919E-04/ 4 Constant 1.004 0.3780 Mean 0.2146E-01 14.59 Sigma 0.8016 0.2248E+08

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1831 11 0.1364E-01 0.7327E-01

0.000 0.000 11.00 0.1696 / 1 Constant 12.10 11.76 Mean 0.3258E-01 0.1337E-01 Sigma 0.3472E-01 0.1114E-01

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1841 11 -0.3545E-01 0.2072 0.000 0.000 11.00 0.3084E-01/ 1 Constant 2.809 1.386 Mean 0.4902E-01 0.1484E-01 Sigma 0.2641E-01 0.1794E-01

cm counts

Residuals on ISIM - module 8

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1812 2 -0.1100 0.8687E-09

0.000 0.000 2.000 -0.2000E+05/ -2 Constant 2.000 0.1819E-01 Mean -0.1430 2.641 Sigma 4.773 0.1539E+09

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1822 2 0.000 0.000 0.000 0.000 2.000

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1832 2 -0.3000E-01 0.1062E-09

0.000 0.000 2.000 -0.2000E+05/ -2 Constant 2.000 1.414 Mean -0.3000E-01 244.0 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1842 2 0.1000E+00 0.1000E-01 0.000 0.000 2.000 -9999. / -1 Constant 1.623 18.14 Mean 0.1000E+00 0.7849E-02 Sigma 0.1016E-01 0.1173

cm counts