Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5111 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5112 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5121 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5211 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5212 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5221 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2311 219 -0.1108 0.3877 19.00 9.000 191.0 18.10 / 15 Constant 16.44 2.372 Mean -0.8560E-01 0.6951E-02 Sigma 0.7171E-01 0.8581E-02

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3311 219 0.6544 1.738 0.000 49.00 170.0 17.59 / 14 Constant 17.88 2.428 Mean 0.3188 0.6842E-01 Sigma 0.7710 0.8622E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4311 219 0.1054 0.3787 7.000 14.00 198.0 14.61 / 10 Constant 19.87 2.804 Mean 0.7235E-01 0.6618E-02 Sigma 0.6124E-01 0.8167E-02

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5311 219 0.8151E-01 0.3552 1.000 5.000 213.0 5.820 / 5 Constant 30.24 4.685 Mean 0.4573E-01 0.5645E-02 Sigma 0.4197E-01 0.7562E-02

cm counts

Residuals on Drift Ch. - module 3

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2312 5 -0.6250E-01 0.1671 0.000 2.000 3.000 0.000 / 0 Constant 1.010 0.5774 Mean -0.2577E-01 35.92 Sigma 1.226 0.1365E+07

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3312 5 3.625 2.099 0.000 1.000 4.000 -9999. / -1 Constant 1.623 18.14 Mean 2.000 0.1081 Sigma 0.1270 1.466

cm counts

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4312 5 0.5417E-01 0.1448 2.000 0.000 3.000 -9999. / -1 Constant 1.295 14.48 Mean -0.2500E-01 0.1540 Sigma 0.1565 3.388

cm counts

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5312 5 -0.2500 0.5045 1.000 0.000 4.000 -9999. / -1 Constant 1.309 14.64 Mean -0.1250E-01 0.9848E-01 Sigma 0.1022 2.121

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5321 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5411 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5412 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2421 332 -0.7803E-01 0.2880 22.00 17.00 293.0 15.08 / 16 Constant 26.12 2.456 Mean -0.7642E-01 0.6011E-02 Sigma 0.8236E-01 0.5894E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3421 332 0.1512 1.525 6.000 2.000 324.0 20.97 / 17 Constant 30.89 2.429 Mean 0.1848 0.5671E-01 Sigma 0.9138 0.4979E-01

cm counts

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4421 332 0.6839E-01 0.3174 11.00 11.00 310.0 14.37 / 11 Constant 37.46 3.503 Mean 0.5372E-01 0.4141E-02 Sigma 0.5727E-01 0.4004E-02

cm counts

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5421 332 0.6460E-01 0.3109 11.00 12.00 309.0 7.547 / 5 Constant 38.25 3.516 Mean 0.6010E-01 0.1371E-01 Sigma 0.6002E-01 0.9377E-02

cm counts

Residuals on Drift Ch. - module 4

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2422 5 0.3750E-01 0.1750 0.000 3.000 2.000 -9999. / -1 Constant 1.282 14.32 Mean 0.3750E-01 0.2494 Sigma 0.2486 5.617

cm counts

0

0.5

1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3422 5 0.7750 6.396 0.000 0.000 5.000 -9999. / -1 Constant 1.284 14.28 Mean -0.7500 4.181 Sigma 2.301 51.53

cm counts

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4422 5 -0.2500E-01 0.1125 3.000 0.000 2.000 -9999. / -1 Constant 1.295 14.48 Mean -0.2500E-01 0.1540 Sigma 0.1565 3.388

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5422 5 -0.2500E-01 0.1125 3.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.7172E-02 Mean 0.6125E-01 2.781 Sigma 6.505 0.3655E+09

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5511 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5512 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5521 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5611 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5612 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5621 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5622 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2711 4 0.9583E-01 0.4249E-01 0.000 1.000 3.000 0.000 / 0 Constant 1.009 0.6908 Mean 0.5464E-01 1.603 Sigma 0.3861 4.820

cm counts

0 0.5 1 1.5 2

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3711 4 0.8125 1.339 0.000 0.000 4.000 0.000 / 0 Constant 7.558 27.84 Mean 13.95 21.75 Sigma 7.187 10.02

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4711 4 0.7083E-01 0.4249E-01 0.000 1.000 3.000 0.000 / 0 Constant 1.009 0.6908 Mean 0.2964E-01 1.603 Sigma 0.3861 4.820

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5711 4 0.3188 0.4591 0.000 0.000 4.000 0.000 / 0 Constant 1.008 0.5774 Mean 0.4909E-01 3.563 Sigma 0.2464 0.2458E+08

cm counts

Residuals on Drift Ch. - module 7

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2712 288 0.8366E-01 0.2708 9.000 12.00 267.0 27.47 / 17 Constant 27.96 3.307 Mean 0.8447E-01 0.5058E-02 Sigma 0.6473E-01 0.6205E-02

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3712 288 -0.2170E-01 1.598 0.000 0.000 288.0 17.43 / 17 Constant 27.46 2.411 Mean 0.1313 0.5919E-01 Sigma 0.9048 0.5797E-01

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4712 288 0.6589E-01 0.2781 6.000 9.000 273.0 18.02 / 10 Constant 35.33 4.167 Mean 0.6897E-01 0.4085E-02 Sigma 0.5150E-01 0.5272E-02

cm counts

0

20

40

60

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5712 288 0.5986E-01 0.2674 3.000 1.000 284.0 14.84 / 5 Constant 52.30 6.601 Mean 0.4640E-01 0.3172E-02 Sigma 0.3510E-01 0.4678E-02

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5721 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5811 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5812 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5821 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2822 230 0.4227E-01 0.2879 8.000 7.000 215.0 15.06 / 17 Constant 19.36 2.000 Mean 0.4336E-01 0.6859E-02 Sigma 0.8513E-01 0.6111E-02

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3822 230 0.2826 1.824 0.000 0.000 230.0 22.18 / 17 Constant 15.26 1.606 Mean 0.1109 0.9990E-01 Sigma 1.176 0.1059

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4822 230 0.1933E-01 0.3171 1.000 2.000 227.0 5.969 / 11 Constant 26.49 2.777 Mean 0.3122E-01 0.5297E-02 Sigma 0.6614E-01 0.5282E-02

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5822 230 0.1922E-01 0.3176 1.000 2.000 227.0 1.246 / 5 Constant 28.07 2.853 Mean 0.3934E-01 0.1129E-01 Sigma 0.6607E-01 0.9717E-02

cm counts

Residuals on OSIM - module 1

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 68 -0.6354E-01

0.2665 2.000 1.000 65.00 11.59 / 12 Constant 3.232 0.9506 Mean -0.1646E-01 0.4706E-01 Sigma 0.1020 0.6585E-01

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 68 0.2213E-01 0.2416 4.000 3.000 61.00 5.553 / 12 Constant 3.640 0.8648 Mean -0.2362E-02 0.2106E-01 Sigma 0.9316E-01 0.2998E-01

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

131 68 -0.1706E-01 0.7797E-01

0.000 0.000 68.00 14.96 / 9 Constant 21.14 3.942 Mean -0.4015E-02 0.2678E-02 Sigma 0.1851E-01 0.2261E-02

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

141 68 -0.6169E-01 0.2591 2.000 1.000 65.00 2.025 / 3 Constant 63.81 164.3 Mean -0.8601 0.4512 Sigma 0.3639 0.1177

cm counts

Residuals on OSIM - module 1

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

132 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

142 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 2

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 399 -0.1672E-01

0.2485 2.000 1.000 396.0 38.54 / 14 Constant 33.00 3.965 Mean -0.3242E-01 0.4075E-02 Sigma 0.5834E-01 0.6363E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 399 0.3829E-02 0.2842 20.00 29.00 350.0 14.62 / 13 Constant 19.16 1.873 Mean -0.1261E-02 0.8238E-02 Sigma 0.9442E-01 0.1022E-01

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

231 399 -0.1581E-01

0.1999 0.000 0.000 399.0 43.55 / 15 Constant 41.06 4.789 Mean -0.2659E-01 0.3196E-02 Sigma 0.5026E-01 0.5042E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

241 399 -0.1336E-01 0.1738 0.000 0.000 399.0 8.066 / 3 Constant 59.05 6.095 Mean -0.2013E-01 0.3088E-02 Sigma 0.3193E-01 0.3872E-02

cm counts

Residuals on OSIM - module 2

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 2 -0.3500 0.3000 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.5000E-01 337.1 Sigma 21.50 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 2 0.000 0.000 1.000 0.000 1.000

cm counts

0

500

1000

1500

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

232 2 -0.2600 0.2300 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 0.1025E+18 0.1117E+19 Mean -1.444 0.2528 Sigma 0.1598 0.8623E-02

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

242 2 -0.2300 0.2000 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.3647E-02 Mean -0.3788E-01 1.195 Sigma 4.595 0.6278E+08

cm counts

Residuals on OSIM - module 3

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 206 0.3273E-01

0.2698 0.000 1.000 205.0 30.30 / 14 Constant 14.90 2.480 Mean -0.3428E-01 0.7222E-02 Sigma 0.5885E-01 0.8760E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 206 -0.2597E-02 0.2630 11.00 14.00 181.0 14.20 / 12 Constant 10.23 1.469 Mean 0.6393E-02 0.1061E-01 Sigma 0.8485E-01 0.1337E-01

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

331 206 0.3293E-01

0.2687 0.000 1.000 205.0 34.81 / 15 Constant 13.26 2.271 Mean -0.2555E-01 0.9022E-02 Sigma 0.6710E-01 0.1003E-01

cm counts

0 25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

341 206 0.9709E-03 0.2426E-01 0.000 0.000 206.0 23.38 / 3 Constant 115.4 12.67 Mean -0.5027E-02 0.9928E-03 Sigma 0.1208E-01 0.9829E-03

cm counts

Residuals on OSIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

332 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

342 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

431 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

441 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

432 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

442 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

531 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

541 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

532 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

542 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

631 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

641 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 32 -0.2780 0.2988 2.000 0.000 30.00 3.464 / 7 Constant 2.987 7.111 Mean 0.4967 1.738 Sigma 0.5209 0.8092

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 32 0.5000E-01 0.2264 1.000 4.000 27.00 1.580 / 8 Constant 1.224 0.4575 Mean -0.3934E-02 0.1437 Sigma 0.1933 0.3121

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

632 32 0.7437E-01 0.9202E-01

0.000 0.000 32.00 5.147 / 4 Constant 6.174 1.742 Mean 0.3525E-01 0.7050E-02 Sigma 0.2772E-01 0.6298E-02

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

642 32 0.2740 0.2942 0.000 2.000 30.00 0.2213 / 1 Constant 1.821 2.376 Mean 0.8238E-02 0.2455E-01 Sigma 0.4401E-01 0.5917E-01

cm counts

Residuals on OSIM - module 7

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 2 -0.4000E-01 0.9000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.295 14.48 Mean -0.4000E-01 0.1232 Sigma 0.1252 2.710

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 2 0.000 0.000 0.000 1.000 1.000

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

731 2 0.4000E-01 0.7000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.303 14.58 Mean 0.4000E-01 0.9345E-01 Sigma 0.9615E-01 2.029

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

741 2 0.2000E-01 0.5000E-01 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.3647E-02 Mean -0.3788E-01 1.195 Sigma 4.595 0.6278E+08

cm counts

Residuals on OSIM - module 7

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 384 -0.8686E-01

0.2493 2.000 0.000 382.0 48.99 / 14 Constant 31.32 4.477 Mean -0.1022 0.4027E-02 Sigma 0.5727E-01 0.7741E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 384 -0.1208E-01 0.2778 21.00 27.00 336.0 16.56 / 13 Constant 18.41 1.818 Mean -0.1230E-01 0.8072E-02 Sigma 0.9136E-01 0.9327E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

732 384 0.7151E-01

0.1980 0.000 0.000 384.0 48.38 / 14 Constant 31.04 3.508 Mean 0.7290E-01 0.4985E-02 Sigma 0.6844E-01 0.8198E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

742 384 0.6021E-01 0.1765 0.000 0.000 384.0 6.063 / 3 Constant 0.7344E+08 1.000 Mean 1.576 0.3405E+08 Sigma 0.2855 0.3405E+08

cm counts

Residuals on OSIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

831 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

841 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 8

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 206 -0.5913E-01

0.2471 0.000 0.000 206.0 16.00 / 14 Constant 14.25 1.813 Mean -0.1014 0.7517E-02 Sigma 0.7697E-01 0.8828E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 206 0.1389E-01 0.2873 6.000 10.00 190.0 17.72 / 13 Constant 11.77 1.529 Mean -0.9384E-02 0.7874E-02 Sigma 0.7110E-01 0.7052E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

832 206 0.5893E-01

0.2465 0.000 0.000 206.0 22.08 / 15 Constant 14.31 1.687 Mean 0.1137 0.1875E-01 Sigma 0.8768E-01 0.1537E-01

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

842 206 0.5825E-02 0.2745E-01 0.000 0.000 206.0 6.677 / 3 Constant 71.43 6.856 Mean 0.8796E-02 0.1642E-02 Sigma 0.2177E-01 0.1475E-02

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

911 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

921 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

931 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

941 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

912 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

922 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

932 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

942 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 10

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1011 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1021 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1031 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1041 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 10

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1012 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1022 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1032 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1042 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 1

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1111 227 0.2525E-01

0.2570 2.000 2.000 223.0 20.52 / 14 Constant 13.72 1.903 Mean 0.8177E-02 0.1064E-01 Sigma 0.8865E-01 0.1488E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1121 227 -0.3430E-02 0.2792 7.000 13.00 207.0 10.81 / 13 Constant 12.41 1.562 Mean -0.7876E-02 0.9430E-02 Sigma 0.8789E-01 0.1143E-01

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1131 227 -0.1009E-01

0.1211 0.000 0.000 227.0 17.93 / 11 Constant 32.60 3.907 Mean -0.1597E-02 0.3222E-02 Sigma 0.4166E-01 0.3881E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1141 227 -0.2670E-01 0.2439 1.000 2.000 224.0 12.78 / 9 Constant 16.62 2.223 Mean -0.4619E-02 0.7889E-02 Sigma 0.6762E-01 0.1017E-01

cm counts

Residuals on ISIM - module 1

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1112 12 -0.2167E-01

0.1609 0.000 0.000 12.00 0.4994 / 4 Constant 1.567 0.8930 Mean -0.3310E-01 0.4120E-01 Sigma 0.8027E-01 0.8070E-01

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1122 12 0.1250 0.2847 0.000 0.000 12.00 1.280 / 2 Constant 1.564 0.7743 Mean 0.3454E-01 0.4527E-01 Sigma 0.6018E-01 0.7130E-01

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1132 12 0.1000E-01 0.6733E-01

0.000 0.000 12.00 1.372 / 3 Constant 2.326 1.326 Mean -0.2983E-01 0.1730 Sigma 0.9167E-01 0.1354

cm counts

0

1

2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1142 12 0.1667E-01 0.1464 0.000 0.000 12.00 0.1462 / 3 Constant 2.286 1.286 Mean 0.4940E-02 0.2392E-01 Sigma 0.5953E-01 0.3399E-01

cm counts

Residuals on ISIM - module 2

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1211 406 0.1010E-01

0.2361 1.000 2.000 403.0 41.87 / 15 Constant 34.53 3.563 Mean 0.1645E-01 0.4179E-02 Sigma 0.5784E-01 0.4979E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1221 406 0.9243E-03 0.2814 25.00 24.00 357.0 15.74 / 13 Constant 18.99 1.796 Mean 0.4287E-02 0.8441E-02 Sigma 0.9569E-01 0.9758E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1231 406 -0.6733E-02

0.2252 2.000 0.000 404.0 27.07 / 11 Constant 37.70 3.581 Mean -0.1371E-01 0.3578E-02 Sigma 0.5255E-01 0.3999E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1241 406 -0.4581E-02 0.8904E-01 0.000 0.000 406.0 74.60 / 9 Constant 61.16 8.816 Mean -0.5678E-02 0.2208E-02 Sigma 0.3622E-01 0.4783E-02

cm counts

Residuals on ISIM - module 2

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1212 7 -0.7571E-01

0.2456 0.000 0.000 7.000 0.9087E-04/ 1 Constant 1.007 0.5000 Mean -0.2409E-02 12.22 Sigma 0.7289 0.2627E+08

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1222 7 -0.1433 0.3551 1.000 0.000 6.000 -9999. / -1 Constant 1.287 14.37 Mean -0.1000E-01 0.1687 Sigma 0.1692 3.767

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1232 7 0.7571E-01

0.2314 0.000 0.000 7.000 0.2503E-04/ 1 Constant 1.004 0.1104 Mean 0.1234E-01 8.943 Sigma 0.8828 176.9

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1242 7 0.2429E-01 0.8600E-01 0.000 0.000 7.000 0.2871 / 1 Constant 1.445 1.024 Mean -0.3613E-01 0.5225E-01 Sigma 0.6700E-01 0.9274E-01

cm counts

Residuals on ISIM - module 3

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1311 101 -0.4553E-01

0.3107 7.000 0.000 94.00 18.04 / 13 Constant 2.974 0.6424 Mean -0.8068E-02 0.5921E-01 Sigma 0.1543 0.3373

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1321 101 0.1818E-01 0.2607 4.000 9.000 88.00 11.25 / 13 Constant 4.349 1.041 Mean 0.2103E-01 0.1872E-01 Sigma 0.8643E-01 0.2558E-01

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1331 101 0.5958E-01

0.3061 0.000 5.000 96.00 17.28 / 11 Constant 4.098 2.329 Mean -0.2421E-01 0.2025E-01 Sigma 0.8494E-01 0.4697E-01

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1341 101 -0.5950E-01 0.1879 0.000 0.000 101.0 11.60 / 9 Constant 9.571 1.766 Mean -0.4270E-02 0.8445E-02 Sigma 0.5136E-01 0.8074E-02

cm counts

Residuals on ISIM - module 3

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1312 3 -0.2500 0.3581 0.000 0.000 3.000 -9999. / -1 Constant 1.303 14.58 Mean -0.2153E-07 0.9329E-01 Sigma 0.9615E-01 2.029

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1322 3 0.7667E-01 0.1050 0.000 0.000 3.000 -9999. / -1 Constant 1.292 14.44 Mean 0.3000E-01 0.1382 Sigma 0.1398 3.058

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1332 3 0.2300 0.3303 0.000 0.000 3.000 -9999. / -1 Constant 1.303 14.58 Mean -0.1121E-07 0.9329E-01 Sigma 0.9615E-01 2.029

cm counts

0

0.5

1

1.5

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1342 3 -0.9667E-01 0.1517 0.000 0.000 3.000 -9999. / -1 Constant 1.386 15.47 Mean 0.1000E-01 0.3387E-01 Sigma 0.2474E-01 0.4229

cm counts

Residuals on ISIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1431 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1441 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1412 1 0.000 0.000 0.000 1.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1422 1 0.000 0.000 0.000 1.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1432 1 0.000 0.000 1.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1442 1 0.000 0.000 0.000 1.000 0.000

cm counts

Residuals on ISIM - module 5

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1511 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1521 1 -0.1000E-01 0.2137E-10 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.1000E-01 337.1 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1531 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1541 1 0.000 0.000 0.000 0.000 1.000

cm counts

Residuals on ISIM - module 5

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1512 151 0.1190 0.2564 0.000 2.000 149.0 6.465 / 14 Constant 10.17 1.330 Mean 0.4797E-01 0.9413E-02 Sigma 0.8060E-01 0.8506E-02

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1522 151 0.2060E-01 0.2990 8.000 9.000 134.0 5.077 / 13 Constant 8.167 1.241 Mean 0.5411E-02 0.1082E-01 Sigma 0.8100E-01 0.1112E-01

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1532 151 0.5318E-01

0.1136 0.000 0.000 151.0 13.23 / 11 Constant 22.50 3.499 Mean 0.2475E-01 0.4194E-02 Sigma 0.3790E-01 0.4635E-02

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1542 151 0.1092 0.2356 0.000 2.000 149.0 6.600 / 9 Constant 11.52 1.706 Mean 0.4977E-01 0.1217E-01 Sigma 0.6385E-01 0.1139E-01

cm counts

Residuals on ISIM - module 6

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1611 2 0.3800 0.3300 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.5204E-02 Mean 0.3593E-01 2.475 Sigma 6.233 0.5161E+08

cm counts

0 2500

5000

7500

10000 x 10^6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1621 2 -0.1100 0.8687E-09 1.000 0.000 1.000 -0.2000E+05/ -2 Constant 0.1014E+11 0.1353E+12 Mean -0.1100 0.7380E-03 Sigma 0.8490E-09 0.2346E-20

cm counts

0 500 1000

1500

2000 x 10^4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1631 2 0.3600 0.3100 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 0.2238E+08 0.2939E-10 Mean 0.5000E-01 0.6344E-09 Sigma 0.1210E-08 8.336

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1641 2 0.1400 0.1100 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.4967E-03 Mean 0.3775E-01 0.6635 Sigma 21.17 0.1715E+07

cm counts

Residuals on ISIM - module 6

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1612 438 0.6705E-01

0.2320 1.000 3.000 434.0 53.02 / 15 Constant 30.71 2.962 Mean 0.7659E-01 0.4552E-02 Sigma 0.7023E-01 0.5714E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1622 438 -0.1575E-01 0.2829 20.00 25.00 393.0 10.63 / 13 Constant 21.65 1.931 Mean -0.1391E-01 0.8494E-02 Sigma 0.9765E-01 0.9999E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1632 438 0.6007E-01

0.2222 0.000 3.000 435.0 46.72 / 11 Constant 31.68 4.067 Mean 0.7367E-01 0.9859E-02 Sigma 0.7364E-01 0.1445E-01

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1642 438 0.2553E-01 0.9033E-01 0.000 0.000 438.0 79.51 / 9 Constant 72.01 9.136 Mean 0.2568E-01 0.2421E-02 Sigma 0.3314E-01 0.3823E-02

cm counts

Residuals on ISIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1731 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1741 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 7

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1712 68 0.7097E-02

0.3335 6.000 0.000 62.00 7.323 / 14 Constant 2.857 0.8185 Mean 0.1013 0.3863E-01 Sigma 0.1096 0.5683E-01

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1722 68 0.5847E-01 0.2775 4.000 5.000 59.00 5.080 / 13 Constant 2.478 0.6197 Mean -0.9554E-02 0.3560E-01 Sigma 0.1157 0.5481E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1732 68 -0.6825E-02

0.3230 5.000 0.000 63.00 3.889 / 8 Constant 9769. 0.2024E+05 Mean 2.943 0.1419 Sigma 0.7166 0.1176

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1742 68 0.4794E-01 0.2136 0.000 0.000 68.00 10.39 / 7 Constant 7.164 1.866 Mean -0.5236E-01 0.7758E-02 Sigma 0.3900E-01 0.1080E-01

cm counts

Residuals on ISIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1831 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1841 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1832 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1842 0 0.000 0.000 0.000 0.000 0.000

cm counts