Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5111 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5112 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5121 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2211 338 -0.4486E-01 0.3150 37.00 19.00 282.0 15.82 / 17 Constant 25.91 2.640 Mean -0.1226E-01 0.5527E-02 Sigma 0.7753E-01 0.5795E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3211 338 0.4096 1.709 3.000 3.000 332.0 21.11 / 17 Constant 28.39 2.440 Mean 0.2148 0.6295E-01 Sigma 0.9468 0.6197E-01

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4211 338 0.3918E-01 0.3173 18.00 37.00 283.0 12.05 / 11 Constant 28.10 2.845 Mean 0.1034E-01 0.5294E-02 Sigma 0.7010E-01 0.5545E-02

cm counts

0 25 50 75 100

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5211 338 -0.2840E-01 0.1774 0.000 0.000 338.0 30.52 / 5 Constant 119.5 10.55 Mean -0.3675E-02 0.1241E-02 Sigma 0.1832E-01 0.1048E-02

cm counts

Residuals on Drift Ch. - module 2

0 0.5 1 1.5 2

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2212 3 0.000 0.000 0.000 0.000 3.000

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3212 3 -0.4167E-01 1.124 0.000 0.000 3.000 0.000 / 0 Constant 1.011 1.306 Mean -3.639 192.8 Sigma 26.07 758.3

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4212 3 0.000 0.000 0.000 0.000 3.000

cm counts

0

2000

4000

6000 x 10^4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5212 3 -0.1125 0.7071E-01 0.000 0.000 3.000 -0.2000E+05/ -2 Constant 0.5726E+08 2.000 Mean -0.6250E-01 1.414 Sigma 0.3483E-09 1.414

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5221 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5311 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5312 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2321 340 0.2604E-01 0.3219 17.00 35.00 288.0 11.58 / 17 Constant 27.78 2.367 Mean -0.1021E-01 0.5473E-02 Sigma 0.8110E-01 0.4416E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3321 340 -0.3207 1.564 2.000 2.000 336.0 13.45 / 17 Constant 32.75 2.643 Mean -0.3943 0.5480E-01 Sigma 0.9034 0.5429E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4321 340 -0.2604E-01 0.3219 35.00 17.00 288.0 5.639 / 11 Constant 28.48 2.453 Mean 0.1010E-01 0.5770E-02 Sigma 0.7811E-01 0.4914E-02

cm counts

0

50

100

150

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5321 340 -0.4412E-03 0.1249E-01 0.000 0.000 340.0 -9999. / -1 Constant 276.1 236.2 Mean -0.4550E-03 0.1062E-02 Sigma 0.1269E-01 0.1121E-01

cm counts

Residuals on Drift Ch. - module 3

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2322 3 0.000 0.000 1.000 1.000 1.000

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3322 3 0.000 0.000 2.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4322 3 0.000 0.000 1.000 1.000 1.000

cm counts

0 0.5 1 1.5 2

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5322 3 0.4167E-02 0.1179E-01 0.000 0.000 3.000 -9999. / -1 Constant 2.578 19.67 Mean 0.4006E-02 0.6311E-01 Sigma 0.1198E-01 0.9362E-01

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5411 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5412 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5421 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5511 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5512 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5521 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5611 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2612 313 -0.1708E-01 0.2717 20.00 9.000 284.0 20.99 / 17 Constant 22.40 2.458 Mean -0.2048E-01 0.6532E-02 Sigma 0.8916E-01 0.7859E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3612 313 0.5425 1.628 1.000 0.000 312.0 13.31 / 17 Constant 27.80 2.198 Mean 0.4630 0.7014E-01 Sigma 1.000 0.5923E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4612 313 -0.1725E-01 0.2657 20.00 9.000 284.0 10.97 / 11 Constant 25.59 2.694 Mean -0.1970E-01 0.5989E-02 Sigma 0.7596E-01 0.6821E-02

cm counts

0 25 50 75 100

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5612 313 0.1585E-01 0.1210 0.000 0.000 313.0 38.28 / 5 Constant 78.97 11.51 Mean 0.2867E-02 0.1942E-02 Sigma 0.2903E-01 0.3760E-02

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5621 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5622 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5711 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5712 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2721 3 -0.3750E-01 0.7500E-01 0.000 1.000 2.000 -9999. / -1 Constant 1.309 14.64 Mean -0.3750E-01 0.9848E-01 Sigma 0.1022 2.121

cm counts

0 0.5 1 1.5 2

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3721 3 3.625 4.596 0.000 0.000 3.000 -0.2000E+05/ -2 Constant 2.000 1.414 Mean 0.3750 19.05 Sigma 1.250 0.5303

cm counts

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4721 3 -0.3750E-01 0.7500E-01 0.000 1.000 2.000 -9999. / -1 Constant 1.309 14.64 Mean -0.3750E-01 0.9848E-01 Sigma 0.1022 2.121

cm counts

0 0.5 1 1.5 2

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5721 3 0.4167E-02 0.1179E-01 0.000 0.000 3.000 -9999. / -1 Constant 2.578 19.67 Mean 0.4006E-02 0.6311E-01 Sigma 0.1198E-01 0.9362E-01

cm counts

Residuals on Drift Ch. - module 7

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2722 392 -0.3911E-01 0.2594 32.00 19.00 341.0 28.95 / 17 Constant 30.74 2.764 Mean -0.3591E-01 0.5664E-02 Sigma 0.8662E-01 0.6039E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3722 392 0.8583 1.915 2.000 1.000 389.0 20.36 / 15 Constant 39.11 2.786 Mean 0.6838 0.4893E-01 Sigma 0.8262 0.4057E-01

cm counts

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4722 392 -0.3911E-01 0.2594 32.00 19.00 341.0 22.17 / 11 Constant 33.44 2.987 Mean -0.3118E-01 0.5859E-02 Sigma 0.7715E-01 0.6040E-02

cm counts

0 50 100 150 200

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5722 392 -0.1403E-02 0.1242E-01 0.000 0.000 392.0 -9999. / -1 Constant 320.3 249.2 Mean -0.1435E-02 0.2381E-02 Sigma 0.1261E-01 0.1012E-01

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5811 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5812 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5821 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5822 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 1

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

131 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

141 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 1

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

132 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

142 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 2

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 4 -0.5350 0.2571 0.000 0.000 4.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.2100 337.1 Sigma 21.50 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 4 -0.7667E-01 0.3450 1.000 0.000 3.000 -0.2000E+05/ -2 Constant 1.000 0.1814E-01 Mean -0.9241E-01 12.84 Sigma 6.978 0.2605E+08

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

231 4 -0.4050 0.1997 0.000 0.000 4.000 -0.2000E+05/ -2 Constant 1.000 0.5459E-02 Mean -0.1059 5.247 Sigma 12.66 0.1198E+06

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

241 4 0.000 0.000 0.000 0.000 4.000

cm counts

Residuals on OSIM - module 2

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

232 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

242 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 3

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 317 -0.9961E-01

0.2785 6.000 5.000 306.0 34.62 / 14 Constant 20.90 2.324 Mean -0.9448E-01 0.5725E-02 Sigma 0.6821E-01 0.6339E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 317 0.3755E-02 0.2892 23.00 25.00 269.0 15.12 / 13 Constant 16.21 1.844 Mean 0.5571E-02 0.8191E-02 Sigma 0.8118E-01 0.8828E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

331 317 -0.9941E-01

0.2771 6.000 5.000 306.0 42.71 / 15 Constant 23.50 2.987 Mean -0.8591E-01 0.5209E-02 Sigma 0.5678E-01 0.7155E-02

cm counts

0

50

100

150

200

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

341 317 -0.9243E-02 0.3735E-01 0.000 0.000 317.0 27.55 / 3 Constant 182.4 14.04 Mean -0.8966E-02 0.7211E-03 Sigma 0.1140E-01 0.5480E-03

cm counts

Residuals on OSIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

332 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

342 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 4

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

411 303 -0.5389E-01

0.2593 2.000 3.000 298.0 12.90 / 14 Constant 20.70 2.047 Mean -0.9871E-01 0.6309E-02 Sigma 0.7840E-01 0.6687E-02

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

421 303 0.4441E-01 0.3091 9.000 15.00 279.0 14.47 / 13 Constant 12.62 1.401 Mean 0.2796E-01 0.1604E-01 Sigma 0.1102 0.1781E-01

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

431 303 -0.3993E-01

0.2324 2.000 1.000 300.0 26.86 / 15 Constant 21.09 2.822 Mean -0.8313E-01 0.8372E-02 Sigma 0.8034E-01 0.1346E-01

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

441 303 0.2470E-01 0.1565 0.000 1.000 302.0 1.668 / 3 Constant 0.2262E+08 0.2191E+08 Mean 1.227 0.1609E-01 Sigma 0.2306 0.1055E-01

cm counts

Residuals on OSIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

432 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

442 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

531 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

541 1 0.000 0.000 0.000 0.000 1.000

cm counts

Residuals on OSIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

532 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

542 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

631 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

641 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

632 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

642 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

731 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

741 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 7

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 7 -0.4140 0.3258 1.000 1.000 5.000 -9999. / -1 Constant 1.346 15.05 Mean -0.8000E-01 0.3588E-01 Sigma 0.3893E-01 0.7331

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 7 0.3150 0.4311 0.000 3.000 4.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 0.1300 337.1 Sigma 21.50 1.414

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

732 7 0.1333 0.4585 0.000 1.000 6.000 -9999. / -1 Constant 1.328 14.85 Mean 0.7000E-01 0.4996E-01 Sigma 0.5313E-01 1.048

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

742 7 0.1233 0.4009 0.000 1.000 6.000 -0.2000E+05/ -2 Constant 1.000 0.5204E-02 Mean 0.3593E-01 2.475 Sigma 6.233 0.5161E+08

cm counts

Residuals on OSIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

831 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

841 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 8

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 318 -0.8560E-01

0.2517 6.000 3.000 309.0 20.22 / 14 Constant 19.70 1.959 Mean -0.6877E-01 0.6825E-02 Sigma 0.8467E-01 0.7689E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 318 0.8310E-02 0.2941 16.00 18.00 284.0 14.38 / 13 Constant 15.02 1.684 Mean 0.8991E-03 0.9564E-02 Sigma 0.9333E-01 0.1163E-01

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

832 318 0.8528E-01

0.2508 3.000 6.000 309.0 23.23 / 13 Constant 19.05 2.208 Mean 0.6420E-01 0.8395E-02 Sigma 0.8698E-01 0.1223E-01

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

842 318 0.5031E-02 0.3272E-01 0.000 0.000 318.0 12.95 / 3 Constant 116.6 10.08 Mean 0.4566E-02 0.1172E-02 Sigma 0.1955E-01 0.1259E-02

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

911 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

921 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

931 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

941 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 9

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

912 292 -0.6157E-01

0.2769 1.000 4.000 287.0 26.14 / 14 Constant 17.73 1.976 Mean -0.7422E-01 0.6703E-02 Sigma 0.7891E-01 0.7816E-02

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

922 292 -0.5642E-02 0.2814 18.00 17.00 257.0 11.50 / 13 Constant 15.36 1.691 Mean -0.2645E-01 0.9548E-02 Sigma 0.9385E-01 0.1169E-01

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

932 292 0.4611E-01

0.2429 3.000 1.000 288.0 38.19 / 15 Constant 23.55 2.695 Mean 0.5808E-01 0.4776E-02 Sigma 0.5898E-01 0.5621E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

942 292 -0.3186E-01 0.1648 0.000 1.000 291.0 2.463 / 3 Constant 0.2030E+06 0.5139E+05 Mean -1.284 0.7752E-01 Sigma 0.2993 0.1764E-01

cm counts

Residuals on OSIM - module 10

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1011 1 0.000 0.000 0.000 1.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1021 1 0.000 0.000 0.000 1.000 0.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1031 1 0.000 0.000 0.000 0.000 1.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1041 1 0.000 0.000 0.000 1.000 0.000

cm counts

Residuals on OSIM - module 10

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1012 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1022 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1032 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1042 1 0.000 0.000 0.000 0.000 1.000

cm counts

Residuals on ISIM - module 1

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1131 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1141 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 1

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1132 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1142 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 2

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1211 123 0.9281E-01

0.3094 4.000 5.000 114.0 12.47 / 13 Constant 6.049 1.229 Mean 0.8264E-01 0.1750E-01 Sigma 0.8791E-01 0.2235E-01

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1221 123 -0.2000E-02 0.2367 9.000 9.000 105.0 8.654 / 12 Constant 5.609 1.005 Mean -0.8444E-02 0.2072E-01 Sigma 0.1078 0.3025E-01

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1231 123 -0.7783E-01

0.3037 5.000 3.000 115.0 4.683 / 10 Constant 7.785 1.348 Mean -0.8324E-01 0.2509E-01 Sigma 0.7450E-01 0.2011E-01

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1241 123 -0.3508E-01 0.1676 0.000 1.000 122.0 18.81 / 8 Constant 14.38 3.569 Mean -0.3419E-01 0.6892E-02 Sigma 0.4074E-01 0.1056E-01

cm counts

Residuals on ISIM - module 2

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1212 3 0.000 0.000 1.000 0.000 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1222 3 0.000 0.000 0.000 1.000 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1232 3 0.1900 0.6000E-01

0.000 1.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.2313E-01 Mean 0.9156E-01 13.81 Sigma 5.977 0.1267E+08

cm counts

0

0.5

1

1.5

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1242 3 0.2033 0.1893 0.000 0.000 3.000 -9999. / -1 Constant 1.386 15.51 Mean 0.7000E-01 0.2182E-01 Sigma 0.2474E-01 0.4233

cm counts

Residuals on ISIM - module 3

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1311 474 0.6139E-01

0.2590 3.000 4.000 467.0 31.13 / 15 Constant 31.58 2.531 Mean 0.6770E-01 0.4853E-02 Sigma 0.7761E-01 0.4972E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1321 474 0.3329E-01 0.3127 20.00 28.00 426.0 20.35 / 13 Constant 20.52 1.880 Mean 0.9342E-02 0.8558E-02 Sigma 0.9643E-01 0.9890E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1331 474 -0.5107E-01

0.2427 4.000 1.000 469.0 23.97 / 11 Constant 32.01 2.854 Mean -0.6519E-01 0.1061E-01 Sigma 0.8455E-01 0.1175E-01

cm counts

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1341 474 0.2775E-01 0.1243 0.000 2.000 472.0 23.56 / 9 Constant 57.04 4.660 Mean 0.2834E-01 0.3011E-02 Sigma 0.5105E-01 0.3761E-02

cm counts

Residuals on ISIM - module 3

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1312 7 -0.3857E-01

0.1645 0.000 0.000 7.000 0.1891E-04/ 2 Constant 1.003 0.6882 Mean 0.2570E-01 7.847 Sigma 1.298 29.63

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1322 7 -0.5000E-01 0.2463 1.000 1.000 5.000 0.000 / 0 Constant 1.016 0.5910 Mean -0.4100E-01 1.920 Sigma 0.5287 0.5593

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1332 7 0.3571E-01

0.1552 0.000 0.000 7.000 0.3863E-01/ 1 Constant 2.179 1.995 Mean -0.5141E-02 0.4558E-01 Sigma 0.9240E-01 0.6737E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1342 7 -0.1571E-01 0.6020E-01 0.000 0.000 7.000 0.4041 / 2 Constant 1.192 0.6739 Mean 0.3705E-01 0.5926 Sigma 0.1615 1.068

cm counts

Residuals on ISIM - module 4

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1411 55 0.2265E-01

0.4082 5.000 1.000 49.00 4.326 / 9 Constant 5.427 10.30 Mean 1.116 1.297 Sigma 0.6777 0.6142

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1421 55 0.1264 0.3393 2.000 3.000 50.00 6.365 / 9 Constant 5.742 16.45 Mean 3.508 1.064 Sigma 2.249 2.675

cm counts

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1431 55 0.3618E-01

0.2112 0.000 0.000 55.00 9.800 / 9 Constant 6.331 2.251 Mean -0.3616E-01 0.7330E-02 Sigma 0.3199E-01 0.1046E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1441 55 0.2400E-02 0.4021 4.000 1.000 50.00 1.767 / 6 Constant 4.206 16.67 Mean 1.229 1.497 Sigma 0.7724 1.361

cm counts

Residuals on ISIM - module 4

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1412 2 -0.2100 0.4000 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 0.1246E+08 2.000 Mean 0.1330 1.414 Sigma 0.6403E-09 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1422 2 0.4700 0.3800 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 0.9000E-01 337.1 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1432 2 0.8000E-01

0.1300 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 0.6825E+08 0.1080E+10 Mean -0.5000E-01 0.3348E-02 Sigma 0.6202E-09 0.2723E-09

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1442 2 0.000 0.000 0.000 0.000 2.000

cm counts

Residuals on ISIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1531 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1541 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1532 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1542 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 6

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1611 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1621 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1631 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1641 1 0.000 0.000 0.000 0.000 1.000

cm counts

Residuals on ISIM - module 6

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1612 156 0.6294E-01

0.3043 0.000 3.000 153.0 18.75 / 15 Constant 8.759 1.364 Mean 0.3601E-01 0.9797E-02 Sigma 0.8011E-01 0.1101E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1622 156 0.5113E-01 0.3035 7.000 8.000 141.0 19.38 / 13 Constant 6.649 1.266 Mean 0.1675E-01 0.1471E-01 Sigma 0.8048E-01 0.1599E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1632 156 0.5928E-01

0.2837 0.000 3.000 153.0 11.55 / 11 Constant 8.668 1.276 Mean 0.4597E-01 0.1798E-01 Sigma 0.9185E-01 0.1936E-01

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1642 156 0.3038E-01 0.1226 0.000 0.000 156.0 9.788 / 8 Constant 26.34 3.472 Mean 0.1698E-01 0.3284E-02 Sigma 0.3328E-01 0.3174E-02

cm counts

Residuals on ISIM - module 7

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1711 5 -0.3100 0.2710 0.000 0.000 5.000 -0.2000E+05/ -2 Constant 1.000 0.6191E-03 Mean 0.7084E-02 0.7293 Sigma 10.18 0.2456E+07

cm counts

0

0.5

1

1.5

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1721 5 -0.1380 0.4446 0.000 0.000 5.000 -9999. / -1 Constant 1.386 15.51 Mean 0.7000E-01 0.2182E-01 Sigma 0.2474E-01 0.4233

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1731 5 -0.2780 0.2519 0.000 0.000 5.000 -9999. / -1 Constant 1.309 14.64 Mean -0.5000E-01 0.7878E-01 Sigma 0.8174E-01 1.697

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1741 5 0.1340 0.1127 0.000 0.000 5.000 -9999. / -1 Constant 1.328 14.85 Mean 0.3000E-01 0.4991E-01 Sigma 0.5313E-01 1.048

cm counts

Residuals on ISIM - module 7

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1712 413 0.6484E-01

0.2749 6.000 4.000 403.0 39.65 / 15 Constant 22.13 2.061 Mean 0.6920E-01 0.6651E-02 Sigma 0.8679E-01 0.7266E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1722 413 0.1936E-01 0.3232 21.00 33.00 359.0 20.30 / 13 Constant 20.60 1.985 Mean -0.1539E-01 0.6380E-02 Sigma 0.7650E-01 0.6017E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1732 413 0.5655E-01

0.2620 4.000 3.000 406.0 28.19 / 11 Constant 25.42 2.568 Mean 0.5304E-01 0.7720E-02 Sigma 0.7569E-01 0.9154E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1742 413 -0.2472E-01 0.1468 0.000 0.000 413.0 38.49 / 9 Constant 47.31 4.861 Mean -0.3140E-01 0.3237E-02 Sigma 0.4720E-01 0.4620E-02

cm counts

Residuals on ISIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1831 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1841 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 8

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1812 62 -0.3103E-02

0.3668 2.000 2.000 58.00 8.902 / 11 Constant 2.233 0.6672 Mean 0.9469E-01 0.9731E-01 Sigma 0.1391 0.1405

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1822 62 -0.1308E-01 0.3178 5.000 5.000 52.00 10.45 / 11 Constant 2.271 0.5828 Mean 0.1365E-01 0.7054E-01 Sigma 0.1318 0.1077

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1832 62 -0.1936E-02

0.1577 0.000 0.000 62.00 11.74 / 11 Constant 4.366 1.202 Mean 0.1671E-01 0.1479E-01 Sigma 0.6732E-01 0.1933E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1842 62 0.2000E-02 0.3839 1.000 1.000 60.00 5.898 / 6 Constant 0.1325E+05 0.2664E+05 Mean -2.916 0.5404 Sigma 0.6897 0.1224

cm counts