Residuals on Straw Tubes (LOST)

0 2.5 5 7.5 10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 84 -0.1005E-01 0.3152E-01

8.000 0.000 76.00 11.58 / 16 Constant 4.893 0.9571 Mean -0.3361E-02 0.3166E-02 Sigma 0.1963E-01 0.3838E-02

cm counts

0 2.5 5 7.5 10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 84 -0.1079E-01 0.3392E-01 7.000 1.000 76.00 9.228 / 15 Constant 5.017 0.9691 Mean -0.5369E-02 0.4192E-02 Sigma 0.2080E-01 0.5019E-02

cm counts

0 2.5 5 7.5 10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 84 -0.8000E-02 0.1995E-01

2.000 0.000 82.00 16.79 / 16 Constant 8.002 1.729 Mean -0.7201E-02 0.1569E-02 Sigma 0.1182E-01 0.2150E-02

cm counts

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 84 -0.7902E-02 0.1977E-01 2.000 0.000 82.00 12.51 / 15 Constant 8.051 1.416 Mean -0.3459E-02 0.1803E-02 Sigma 0.1365E-01 0.1829E-02

cm counts

Residuals on Straw Tubes (RIST)

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 84 -0.1373E-01 0.5413E-01

9.000 0.000 75.00 16.70 / 15 Constant 4.297 10.01 Mean -0.3838 0.4222 Sigma 0.3296 0.2437

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 46 -0.2195E-02 0.5484E-01 5.000 0.000 41.00 3.281 / 13 Constant 1.527 0.4889 Mean -0.9544E-02 0.2545E-01 Sigma 0.4888E-01 0.4476E-01

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 84 -0.9710E-02 0.4275E-01

14.00 1.000 69.00 16.18 / 18 Constant 2.374 0.5043 Mean -0.8683E-02 0.1850E-01 Sigma 0.3778E-01 0.2829E-01

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 51 -0.1349E-01 0.5496E-01 11.00 1.000 39.00 3.661 / 12 Constant 1.359 0.5492 Mean -0.3077E-01 0.1802 Sigma 0.1167 0.3287

cm counts

Residuals on Straw Tubes (LEST)

0 2 4 6 8

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 84 -0.1301E-01 0.4921E-01

10.00 1.000 73.00 17.83 / 16 Constant 2.561 0.6281 Mean -0.8828E-02 0.4582E-01 Sigma 0.3610E-01 0.5422E-01

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 21 -0.3075E-01 0.7077E-01 5.000 0.000 16.00 1.120 / 3 Constant 1.351 0.8213 Mean -0.1360E-01 0.2097E-01 Sigma 0.2808E-01 0.4554E-01

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 84 -0.8319E-02 0.4989E-01

15.00 0.000 69.00 13.02 / 15 Constant 4.827 10.76 Mean -0.5294 0.6896 Sigma 0.4147 0.3425

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 84 -0.2200E-01 0.4942E-01 0.000 60.00 24.00 2.067 / 9 Constant 16.49 61.54 Mean 0.7363 0.3691 Sigma 0.3251 0.2121

cm counts

Z Residuals on Straw Tubes

0 2 4 6 8

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 84 -0.3738 1.393 0.000 0.000 84.00 11.82 / 23 Constant 3.953 0.6366 Mean -0.1943 0.2569 Sigma 1.635 0.3069

cm counts

0

2

4

6

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 84 -0.2690 1.616 0.000 0.000 84.00 22.37 / 27 Constant 2.585 0.4801 Mean 0.4155E-01 0.4514 Sigma 2.188 0.6482

cm counts

Residuals on Drift Chambers

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 37 -0.5720E-01 0.2114 2.000 2.000 33.00 5.022 / 6 Constant 5.655 1.640 Mean -0.9216E-01 0.1367E-01 Sigma 0.5129E-01 0.1469E-01

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 37 0.2353 1.972 1.000 2.000 34.00 5.536 / 9 Constant 2.931 0.8656 Mean 0.4548 0.5292 Sigma 1.387 0.8520

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 37 0.2196E-01 0.1786 0.000 0.000 37.00 5.851 / 5 Constant 19.61 4.752 Mean 0.1662E-01 0.2733E-02 Sigma 0.1376E-01 0.2291E-02

cm counts

0 2 4 6 8

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 37 0.5492E-01 0.2080 2.000 2.000 33.00 1.498 / 1 Constant 8.810 9.194 Mean 0.1033 0.1428 Sigma 0.4823E-01 0.6867E-01

cm counts

Residuals on Drift Chambers

0 2 4 6 8

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 33 0.4609E-01 0.1080 0.000 1.000 32.00 7.232 / 5 Constant 5.802 2.364 Mean 0.7076E-01 0.5006E-01 Sigma 0.4221E-01 0.6547E-01

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 33 0.4962 1.650 0.000 0.000 33.00 7.897 / 10 Constant 1.800 0.5879 Mean 0.4668E-01 0.8161 Sigma 1.898 1.506

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 33 0.1932E-01 0.6806E-01 0.000 0.000 33.00 2.000 / 1 Constant 26.02 5.099 Mean 0.1249E-01 0.2733E-02 Sigma 0.1103E-01 0.1214E-02

cm counts

0 2 4 6 8

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 33 0.4531E-01 0.1067 0.000 1.000 32.00 0.7506 / 2 Constant 29.78 92.99 Mean 0.7923 0.5103 Sigma 0.3769 0.4336

cm counts

Residuals on Drift Chambers

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 36 -0.7222E-01 0.2680 0.000 0.000 36.00 2.476 / 9 Constant 4.308 1.118 Mean -0.8099E-01 0.1852E-01 Sigma 0.8628E-01 0.2038E-01

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 36 1.028 1.104 0.000 0.000 36.00 2.790 / 7 Constant 4.015 1.008 Mean 0.9436 0.3532 Sigma 0.9671 0.4387

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 36 -0.8333E-02 0.9317E-02 0.000 0.000 36.00 -9999. / -1 Constant 38.00 83.44 Mean -0.5911E-02 0.1967E-01 Sigma 0.9583E-02 0.1594E-01

cm counts

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 36 0.7222E-01 0.2680 0.000 0.000 36.00 1.271 / 3 Constant 4.504 1.412 Mean 0.5916E-01 0.4711E-01 Sigma 0.6144E-01 0.4731E-01

cm counts

Residuals on Drift Chambers

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 46 0.7471E-01 0.4062 2.000 1.000 43.00 2.787 / 7 Constant 4.179 1.208 Mean 0.5928E-01 0.4183E-01 Sigma 0.8178E-01 0.5235E-01

cm counts

0 2 4 6 8 10

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 46 0.2065 1.935 0.000 0.000 46.00 9.814 / 10 Constant 3.029 0.7771 Mean 0.3912E-02 0.3553 Sigma 1.219 0.4580

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 46 -0.4891E-02 0.1150E-01 0.000 0.000 46.00 -9999. / -1 Constant 40.25 75.44 Mean -0.4553E-02 0.1734E-01 Sigma 0.1173E-01 0.2231E-01

cm counts

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 46 0.7471E-01 0.4062 2.000 1.000 43.00 0.2551 / 2 Constant 156.0 489.1 Mean 1.177 0.3661 Sigma 0.4152 0.1892

cm counts

Residuals on OSIM

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 62 -0.3459E-01

0.1948 1.000 0.000 61.00 21.21 / 11 Constant 7.097 2.333 Mean -0.3497E-02 0.6267E-02 Sigma 0.3009E-01 0.9752E-02

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 62 0.3655E-01 0.3112 1.000 3.000 58.00 8.993 / 10 Constant 2.724 0.6755 Mean 0.3406E-01 0.1884 Sigma 0.1225 0.1672

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 62 -0.8387E-02

0.1308 0.000 0.000 62.00 13.07 / 10 Constant 26.91 5.991 Mean -0.5499E-02 0.2144E-02 Sigma 0.1303E-01 0.2195E-02

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 62 -0.4903E-01 0.1956 0.000 0.000 62.00 2.011 / 3 Constant 10.98 2.855 Mean -0.5942E-02 0.4892E-02 Sigma 0.2191E-01 0.4385E-02

cm counts

Residuals on OSIM

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 63 -0.6677E-01

0.2333 1.000 0.000 62.00 7.053 / 12 Constant 5.613 1.188 Mean -0.1245 0.1071E-01 Sigma 0.6072E-01 0.1140E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 63 0.1630E-01 0.2804 3.000 6.000 54.00 6.034 / 11 Constant 3.581 1.012 Mean 0.2831E-01 0.2048E-01 Sigma 0.8809E-01 0.3258E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 63 -0.9365E-02

0.1448 0.000 0.000 63.00 20.25 / 12 Constant 7.443 2.786 Mean 0.2462E-01 0.7164E-02 Sigma 0.3940E-01 0.1280E-01

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 63 0.6839E-01 0.2072 0.000 1.000 62.00 0.8072 / 1 Constant 0.7988E+05 0.3069E+06 Mean 0.9333 0.6280E-01 Sigma 0.1981 0.4732E-01

cm counts

Residuals on ISIM

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 67 0.1277E-01

0.2164 0.000 2.000 65.00 14.86 / 12 Constant 7.339 2.090 Mean -0.1913E-01 0.7269E-02 Sigma 0.3949E-01 0.1007E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 67 0.2667E-01 0.2881 1.000 6.000 60.00 12.91 / 13 Constant 2.424 0.6842 Mean 0.7618E-02 0.3479E-01 Sigma 0.1069 0.5806E-01

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 67 0.1667E-01

0.1362 1.000 0.000 66.00 12.11 / 9 Constant 16.47 5.536 Mean -0.3698E-02 0.3520E-02 Sigma 0.2126E-01 0.6501E-02

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 67 -0.1667E-01 0.1876 0.000 1.000 66.00 16.42 / 6 Constant 7.313 1.997 Mean 0.2875E-01 0.9808E-02 Sigma 0.3894E-01 0.1322E-01

cm counts

Residuals on ISIM

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 68 0.5061E-01

0.2017 1.000 1.000 66.00 16.31 / 11 Constant 3.859 0.9517 Mean 0.9873E-01 0.4553E-01 Sigma 0.9436E-01 0.5250E-01

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 68 0.2322E-01 0.2867 2.000 7.000 59.00 12.32 / 12 Constant 2.415 0.6425 Mean 0.1965E-01 0.4607E-01 Sigma 0.1072 0.5988E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 68 0.7313E-02

0.1352 1.000 0.000 67.00 6.591 / 6 Constant 8.364 1.627 Mean 0.3128E-01 0.1040E-01 Sigma 0.5169E-01 0.9635E-02

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 68 0.6029E-01 0.1976 0.000 0.000 68.00 4.470 / 9 Constant 6610. 0.1188E+05 Mean 1.043 0.9321E-01 Sigma 0.2608 0.4084E-01

cm counts