Residuals on Straw Tubes (LOST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 669 -0.3659E-02 0.3388E-01

49.00 15.00 605.0 15.68 / 19 Constant 43.80 2.569 Mean 0.1158E-02 0.9204E-03 Sigma 0.1932E-01 0.8738E-03

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 669 -0.4680E-02 0.3483E-01 65.00 7.000 597.0 19.92 / 19 Constant 43.26 2.566 Mean 0.1168E-02 0.9263E-03 Sigma 0.1938E-01 0.8952E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 669 -0.8851E-02 0.3050E-01

19.00 6.000 644.0 17.85 / 19 Constant 52.24 2.894 Mean -0.4868E-02 0.7711E-03 Sigma 0.1736E-01 0.6869E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 669 -0.8852E-02 0.2617E-01 35.00 0.000 634.0 27.63 / 19 Constant 53.16 3.019 Mean -0.4963E-02 0.7445E-03 Sigma 0.1674E-01 0.6842E-03

cm counts

Residuals on Straw Tubes (RIST)

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 669 0.5079E-02 0.5399E-01

63.00 20.00 586.0 23.56 / 19 Constant 27.43 1.943 Mean 0.5781E-02 0.1621E-02 Sigma 0.2516E-01 0.1931E-02

cm counts

0 5 10 15 20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 425 -0.8400E-02 0.6188E-01 56.00 9.000 360.0 13.40 / 19 Constant 15.11 1.308 Mean 0.1994E-03 0.2714E-02 Sigma 0.3045E-01 0.3485E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 669 -0.6862E-02 0.5770E-01

54.00 12.00 603.0 13.44 / 19 Constant 26.32 1.828 Mean -0.4545E-02 0.1836E-02 Sigma 0.2770E-01 0.2308E-02

cm counts

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 265 -0.3836E-02 0.6073E-01 55.00 3.000 207.0 11.48 / 19 Constant 9.068 1.095 Mean -0.9385E-03 0.2629E-02 Sigma 0.2460E-01 0.3032E-02

cm counts

Residuals on Straw Tubes (LEST)

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 669 -0.1623E-02 0.5204E-01

78.00 8.000 583.0 19.80 / 19 Constant 27.86 1.806 Mean 0.1921E-02 0.1506E-02 Sigma 0.2474E-01 0.1503E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 350 -0.5146E-02 0.5737E-01 41.00 14.00 295.0 21.65 / 19 Constant 11.13 1.145 Mean -0.1373E-02 0.3918E-02 Sigma 0.3428E-01 0.6084E-02

cm counts

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 669 -0.9566E-02 0.5514E-01

57.00 4.000 608.0 22.78 / 19 Constant 30.81 2.061 Mean -0.4774E-02 0.1320E-02 Sigma 0.2271E-01 0.1403E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 669 -0.9989E-02 0.5780E-01 31.00 281.0 357.0 22.58 / 19 Constant 14.46 1.457 Mean -0.1585E-02 0.2270E-02 Sigma 0.2624E-01 0.3131E-02

cm counts

Z Residuals on Straw Tubes

0 10 20 30 40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 669 -0.1204 1.616 1.000 0.000 668.0 23.52 / 31 Constant 34.57 1.706 Mean -0.4031E-01 0.6377E-01 Sigma 1.480 0.4978E-01

cm counts

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 669 -0.2343 1.623 2.000 0.000 667.0 23.52 / 32 Constant 35.51 1.768 Mean -0.1250 0.5989E-01 Sigma 1.417 0.4633E-01

cm counts

Residuals on Drift Chambers

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 239 0.6202E-01 0.3765 13.00 19.00 207.0 17.83 / 16 Constant 15.68 2.065 Mean 0.2859E-01 0.7577E-02 Sigma 0.8292E-01 0.8761E-02

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 239 -0.4974 1.216 1.000 1.000 237.0 12.58 / 17 Constant 24.65 2.406 Mean -0.4070 0.6245E-01 Sigma 0.8577 0.6303E-01

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 239 -0.5179E-01 0.3670 5.000 3.000 231.0 24.37 / 11 Constant 27.18 3.716 Mean -0.1444E-01 0.4338E-02 Sigma 0.4869E-01 0.5193E-02

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 239 0.4079E-01 0.3604 9.000 17.00 213.0 7.773 / 5 Constant 20.31 2.507 Mean 0.2951E-01 0.9743E-02 Sigma 0.6308E-01 0.9637E-02

cm counts

Residuals on Drift Chambers

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 231 -0.4489E-01 0.2473 7.000 11.00 213.0 34.10 / 17 Constant 25.88 3.183 Mean -0.7511E-01 0.4715E-02 Sigma 0.5511E-01 0.5028E-02

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 231 0.1975 1.263 0.000 0.000 231.0 28.06 / 17 Constant 19.72 1.834 Mean 0.3150 0.8548E-01 Sigma 0.9971 0.6721E-01

cm counts

0

20

40

60

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 231 -0.1305E-01 0.2717 1.000 2.000 228.0 34.84 / 10 Constant 46.53 5.807 Mean -0.4170E-01 0.2645E-02 Sigma 0.3240E-01 0.3101E-02

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 231 0.1961E-01 0.2697 7.000 6.000 218.0 16.90 / 5 Constant 36.33 5.601 Mean 0.5652E-01 0.6606E-02 Sigma 0.3738E-01 0.8375E-02

cm counts

Residuals on Drift Chambers

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 169 -0.5490E-01 0.3517 12.00 9.000 148.0 17.97 / 13 Constant 12.79 2.286 Mean 0.3578E-01 0.1250E-01 Sigma 0.7788E-01 0.1226E-01

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 169 1.119 1.279 2.000 1.000 166.0 10.39 / 16 Constant 16.19 1.783 Mean 1.018 0.9372E-01 Sigma 0.8910 0.8089E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 169 0.6918E-01 0.3733 5.000 3.000 161.0 16.28 / 9 Constant 18.48 2.976 Mean -0.2539E-01 0.8335E-02 Sigma 0.5439E-01 0.7144E-02

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 169 -0.6933E-01 0.3732 3.000 5.000 161.0 5.860 / 5 Constant 18.13 2.412 Mean 0.5201E-01 0.2648E-01 Sigma 0.7796E-01 0.2397E-01

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 260 -0.6746E-01 0.1786 17.00 6.000 237.0 22.51 / 15 Constant 26.60 2.778 Mean -0.8366E-01 0.5453E-02 Sigma 0.7139E-01 0.5752E-02

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 260 -0.2797 1.773 2.000 1.000 257.0 5.850 / 17 Constant 23.73 2.078 Mean -0.2109 0.6600E-01 Sigma 0.9471 0.5770E-01

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 260 -0.4935E-01 0.2699 6.000 5.000 249.0 16.00 / 9 Constant 38.36 3.982 Mean -0.5726E-01 0.3896E-02 Sigma 0.5127E-01 0.4173E-02

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 260 0.4945E-01 0.2686 5.000 6.000 249.0 12.78 / 5 Constant 36.59 5.855 Mean 0.7742E-01 0.3942E-01 Sigma 0.6973E-01 0.2567E-01

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 563 -0.8011E-01

0.2415 3.000 2.000 558.0 43.51 / 14 Constant 39.60 3.185 Mean -0.9797E-01 0.4466E-02 Sigma 0.7537E-01 0.5420E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 563 0.2910E-01 0.2907 28.00 25.00 510.0 29.72 / 13 Constant 26.03 2.317 Mean 0.6782E-02 0.7879E-02 Sigma 0.1011 0.1155E-01

cm counts

0 25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 563 -0.3649E-01

0.1446 1.000 1.000 561.0 102.9 / 15 Constant 46.05 3.433 Mean -0.4328E-01 0.3816E-02 Sigma 0.6806E-01 0.4233E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 563 0.6719E-01 0.2120 0.000 0.000 563.0 1.904 / 3 Constant 213.0 207.3 Mean 0.4413 0.5117E-01 Sigma 0.2073 0.5777E-01

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 529 -0.7471E-01

0.2234 3.000 4.000 522.0 54.19 / 14 Constant 41.01 3.273 Mean -0.6931E-01 0.4608E-02 Sigma 0.6662E-01 0.4233E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 529 -0.1080E-01 0.2949 32.00 19.00 478.0 13.64 / 13 Constant 25.96 2.224 Mean -0.3802E-01 0.7994E-02 Sigma 0.9105E-01 0.8932E-02

cm counts

0 25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 529 0.4146E-01

0.1627 0.000 0.000 529.0 79.28 / 15 Constant 69.95 6.544 Mean 0.3101E-01 0.2304E-02 Sigma 0.4298E-01 0.3373E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 529 -0.5861E-01 0.1766 0.000 4.000 525.0 8.344 / 3 Constant 67.24 6.129 Mean -0.4341E-01 0.1262E-01 Sigma 0.4230E-01 0.8552E-02

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 579 0.8916E-01

0.2261 4.000 4.000 571.0 48.25 / 15 Constant 38.60 2.996 Mean 0.7408E-01 0.4497E-02 Sigma 0.7974E-01 0.5428E-02

cm counts

0 10 20 30 40 50

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 579 0.2748E-01 0.2928 36.00 19.00 524.0 25.90 / 13 Constant 26.28 2.291 Mean 0.5063E-02 0.7853E-02 Sigma 0.1011 0.1121E-01

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 579 -0.3295E-01

0.1298 3.000 0.000 576.0 73.30 / 11 Constant 62.42 5.288 Mean -0.2596E-01 0.2769E-02 Sigma 0.5267E-01 0.3975E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 579 0.6505E-01 0.2147 0.000 1.000 578.0 19.46 / 9 Constant 51.03 3.461 Mean 0.8137E-01 0.1413E-01 Sigma 0.8291E-01 0.1030E-01

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 583 0.6401E-01

0.2372 4.000 1.000 578.0 30.80 / 15 Constant 42.22 3.010 Mean 0.6594E-01 0.4246E-02 Sigma 0.7648E-01 0.4432E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 583 -0.6547E-02 0.3081 36.00 20.00 527.0 11.85 / 13 Constant 27.51 2.315 Mean -0.2953E-01 0.8036E-02 Sigma 0.9691E-01 0.1014E-01

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 583 0.3162E-01

0.1555 0.000 1.000 582.0 57.03 / 11 Constant 77.99 6.226 Mean 0.2433E-01 0.2179E-02 Sigma 0.4417E-01 0.2916E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 583 -0.5179E-01 0.1889 0.000 3.000 580.0 40.71 / 9 Constant 54.72 4.906 Mean -0.3942E-01 0.3903E-02 Sigma 0.5265E-01 0.5150E-02

cm counts