Residuals on Straw Tubes (LOST)

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 836 -0.7525E-02 0.2796E-01

42.00 7.000 787.0 26.15 / 19 Constant 57.22 2.996 Mean -0.4891E-02 0.8571E-03 Sigma 0.2003E-01 0.8815E-03

cm counts

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 836 -0.7588E-02 0.2648E-01 52.00 3.000 781.0 26.66 / 19 Constant 56.60 2.939 Mean -0.4979E-02 0.8830E-03 Sigma 0.2031E-01 0.8908E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 836 -0.3217E-02 0.2884E-01

26.00 5.000 805.0 28.12 / 19 Constant 70.72 3.430 Mean -0.8229E-03 0.6649E-03 Sigma 0.1650E-01 0.5500E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 836 -0.4306E-02 0.2725E-01 32.00 1.000 803.0 37.23 / 19 Constant 72.15 3.574 Mean -0.6368E-03 0.6628E-03 Sigma 0.1599E-01 0.5493E-03

cm counts

Residuals on Straw Tubes (RIST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 836 -0.6074E-02 0.4554E-01

74.00 8.000 754.0 13.30 / 19 Constant 40.17 2.260 Mean -0.4295E-02 0.1344E-02 Sigma 0.2581E-01 0.1547E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 505 -0.7516E-02 0.4953E-01 50.00 9.000 446.0 23.56 / 19 Constant 25.30 1.917 Mean -0.7331E-02 0.1485E-02 Sigma 0.2179E-01 0.1530E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 836 -0.4973E-02 0.4379E-01

55.00 14.00 767.0 21.19 / 19 Constant 43.58 2.415 Mean 0.4611E-03 0.1095E-02 Sigma 0.2292E-01 0.1150E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 403 -0.4792E-02 0.5031E-01 35.00 7.000 361.0 21.67 / 19 Constant 18.97 1.614 Mean -0.2343E-02 0.1779E-02 Sigma 0.2418E-01 0.2066E-02

cm counts

Residuals on Straw Tubes (LEST)

0 10 20 30 40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 836 -0.6253E-02 0.5012E-01

66.00 12.00 758.0 15.21 / 19 Constant 35.71 2.096 Mean -0.4948E-02 0.1597E-02 Sigma 0.2761E-01 0.1908E-02

cm counts

0 5 10 15 20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 400 -0.1248E-01 0.4772E-01 46.00 5.000 349.0 12.01 / 19 Constant 17.24 1.436 Mean -0.4117E-02 0.2190E-02 Sigma 0.2656E-01 0.2421E-02

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 836 -0.5735E-02 0.4527E-01

62.00 5.000 769.0 11.53 / 19 Constant 44.14 2.471 Mean -0.1470E-02 0.1116E-02 Sigma 0.2314E-01 0.1218E-02

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 836 -0.5719E-02 0.5848E-01 16.00 706.0 114.0 20.67 / 19 Constant 3.130 0.5688 Mean -0.1481E-01 0.1552E-01 Sigma 0.4337E-01 0.1826E-01

cm counts

Z Residuals on Straw Tubes

0

20

40

60

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 836 0.8254E-01 1.455 0.000 0.000 836.0 34.44 / 32 Constant 45.04 1.995 Mean 0.1795 0.5425E-01 Sigma 1.427 0.4244E-01

cm counts

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 836 -0.1885 1.527 1.000 1.000 834.0 40.58 / 33 Constant 43.59 1.882 Mean -0.1752 0.5475E-01 Sigma 1.456 0.3919E-01

cm counts

Residuals on Drift Chambers

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 223 -0.1076 0.3856 19.00 10.00 194.0 20.75 / 15 Constant 16.22 2.437 Mean -0.8501E-01 0.7171E-02 Sigma 0.7297E-01 0.9453E-02

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 223 0.6580 1.730 0.000 49.00 174.0 18.00 / 14 Constant 17.70 2.346 Mean 0.2952 0.7031E-01 Sigma 0.8007 0.8794E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 223 0.1049 0.3760 7.000 15.00 201.0 14.63 / 10 Constant 20.60 2.842 Mean 0.7221E-01 0.6372E-02 Sigma 0.6043E-01 0.7748E-02

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 223 0.8589E-01 0.3588 1.000 5.000 217.0 5.619 / 5 Constant 31.05 4.650 Mean 0.4652E-01 0.5790E-02 Sigma 0.4222E-01 0.7443E-02

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 293 0.8204E-01 0.2703 9.000 14.00 270.0 28.37 / 17 Constant 28.14 3.273 Mean 0.8533E-01 0.5073E-02 Sigma 0.6507E-01 0.6110E-02

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 293 0.2825E-01 1.661 0.000 1.000 292.0 18.24 / 17 Constant 27.20 2.409 Mean 0.1414 0.6035E-01 Sigma 0.9186 0.6047E-01

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 293 0.6576E-01 0.2770 8.000 9.000 276.0 19.14 / 10 Constant 35.73 4.199 Mean 0.6909E-01 0.4043E-02 Sigma 0.5115E-01 0.5196E-02

cm counts

0

20

40

60

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 293 0.5556E-01 0.2745 4.000 1.000 288.0 16.06 / 5 Constant 52.81 6.631 Mean 0.4648E-01 0.3125E-02 Sigma 0.3489E-01 0.4595E-02

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 332 -0.7803E-01 0.2880 22.00 17.00 293.0 15.08 / 16 Constant 26.12 2.456 Mean -0.7642E-01 0.6011E-02 Sigma 0.8236E-01 0.5894E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 332 0.1512 1.525 6.000 2.000 324.0 20.97 / 17 Constant 30.89 2.429 Mean 0.1848 0.5671E-01 Sigma 0.9138 0.4979E-01

cm counts

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 332 0.6839E-01 0.3174 11.00 11.00 310.0 14.37 / 11 Constant 37.46 3.503 Mean 0.5372E-01 0.4141E-02 Sigma 0.5727E-01 0.4004E-02

cm counts

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 332 0.6460E-01 0.3109 11.00 12.00 309.0 7.547 / 5 Constant 38.25 3.516 Mean 0.6010E-01 0.1371E-01 Sigma 0.6002E-01 0.9377E-02

cm counts

Residuals on Drift Chambers

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 235 0.4222E-01 0.2870 8.000 10.00 217.0 12.84 / 17 Constant 18.53 1.960 Mean 0.4155E-01 0.7376E-02 Sigma 0.9161E-01 0.7206E-02

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 235 0.2931 2.033 0.000 0.000 235.0 23.11 / 17 Constant 15.31 1.622 Mean 0.1112 0.1007 Sigma 1.180 0.1086

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 235 0.1894E-01 0.3159 4.000 2.000 229.0 6.886 / 11 Constant 26.53 2.802 Mean 0.3136E-01 0.5314E-02 Sigma 0.6650E-01 0.5422E-02

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 235 0.1883E-01 0.3164 4.000 2.000 229.0 1.101 / 5 Constant 28.24 2.835 Mean 0.4133E-01 0.1216E-01 Sigma 0.6724E-01 0.1019E-01

cm counts

Residuals on OSIM

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 675 -0.6168E-02

0.2583 4.000 3.000 668.0 57.01 / 14 Constant 47.98 4.043 Mean -0.3183E-01 0.3776E-02 Sigma 0.6980E-01 0.5590E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 675 0.5379E-02 0.2764 35.00 47.00 593.0 14.01 / 13 Constant 34.66 2.514 Mean 0.3792E-02 0.5813E-02 Sigma 0.9088E-01 0.6795E-02

cm counts

0

25

50

75

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 675 -0.9496E-03

0.2162 0.000 1.000 674.0 69.06 / 15 Constant 63.96 5.711 Mean -0.2534E-01 0.2676E-02 Sigma 0.5553E-01 0.4308E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 675 -0.1354E-01 0.1578 2.000 1.000 672.0 27.04 / 3 Constant 135.7 10.18 Mean -0.1085E-01 0.1332E-02 Sigma 0.2513E-01 0.1660E-02

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 624 -0.8774E-01

0.2558 4.000 0.000 620.0 51.29 / 14 Constant 45.90 4.077 Mean -0.9900E-01 0.3810E-02 Sigma 0.6910E-01 0.5699E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 624 -0.9025E-03 0.2797 29.00 41.00 554.0 23.67 / 13 Constant 31.84 2.423 Mean -0.1120E-01 0.5668E-02 Sigma 0.8572E-01 0.6167E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 624 0.6644E-01

0.2125 0.000 0.000 624.0 48.04 / 15 Constant 49.33 3.771 Mean 0.7794E-01 0.4666E-02 Sigma 0.7461E-01 0.6146E-02

cm counts

0

25

50

75

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 624 0.5158E-01 0.1648 0.000 2.000 622.0 8.022 / 3 Constant 84.11 6.348 Mean 0.2223E-01 0.4358E-02 Sigma 0.3841E-01 0.4514E-02

cm counts

Residuals on ISIM

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 737 0.9142E-02

0.2557 10.00 4.000 723.0 55.41 / 15 Constant 49.97 3.588 Mean 0.1775E-01 0.3845E-02 Sigma 0.7480E-01 0.4801E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 737 0.1682E-02 0.2777 37.00 46.00 654.0 18.97 / 13 Constant 37.71 2.596 Mean 0.1005E-02 0.5617E-02 Sigma 0.9152E-01 0.6483E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 737 0.2192E-02

0.2147 2.000 5.000 730.0 40.90 / 11 Constant 72.18 4.865 Mean -0.9478E-02 0.2566E-02 Sigma 0.5323E-01 0.2840E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 737 -0.1796E-01 0.1676 1.000 2.000 734.0 64.59 / 9 Constant 81.93 5.939 Mean -0.5111E-02 0.2355E-02 Sigma 0.4982E-01 0.3195E-02

cm counts

Residuals on ISIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 680 0.6856E-01

0.2519 7.000 6.000 667.0 50.44 / 15 Constant 44.55 3.209 Mean 0.7272E-01 0.4130E-02 Sigma 0.7838E-01 0.4849E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 680 0.1466E-02 0.2882 33.00 40.00 607.0 7.369 / 13 Constant 34.54 2.456 Mean -0.5544E-02 0.6157E-02 Sigma 0.9429E-01 0.7173E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 680 0.5227E-01

0.2154 6.000 3.000 671.0 29.09 / 11 Constant 56.91 4.255 Mean 0.5411E-01 0.4104E-02 Sigma 0.6598E-01 0.5387E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 680 0.4548E-01 0.1546 0.000 3.000 677.0 74.42 / 9 Constant 68.96 5.120 Mean 0.1989E-01 0.2872E-02 Sigma 0.5393E-01 0.3696E-02

cm counts