Residuals on Straw Tubes (LOST)

0

25

50

75

100

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 984 -0.4652E-02 0.3757E-01

61.00 6.000 917.0 27.63 / 19 Constant 75.75 3.536 Mean 0.8172E-03 0.6258E-03 Sigma 0.1703E-01 0.5610E-03

cm counts

0

25

50

75

100

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 984 -0.5366E-02 0.3615E-01 65.00 4.000 915.0 28.38 / 19 Constant 77.02 3.639 Mean 0.8359E-03 0.6109E-03 Sigma 0.1668E-01 0.5594E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 984 -0.2932E-02 0.2988E-01

35.00 1.000 948.0 23.81 / 19 Constant 86.20 3.789 Mean 0.5361E-03 0.5583E-03 Sigma 0.1586E-01 0.4583E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 984 -0.3485E-02 0.2765E-01 43.00 1.000 940.0 28.60 / 19 Constant 85.37 3.781 Mean 0.4000E-03 0.5610E-03 Sigma 0.1591E-01 0.4672E-03

cm counts

Residuals on Straw Tubes (RIST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 984 -0.4078E-02 0.5018E-01

115.0 18.00 851.0 13.27 / 19 Constant 43.90 2.396 Mean -0.1567E-02 0.1181E-02 Sigma 0.2449E-01 0.1318E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 570 -0.1642E-03 0.5229E-01 88.00 7.000 475.0 22.99 / 19 Constant 19.56 1.403 Mean 0.7732E-02 0.3267E-02 Sigma 0.3481E-01 0.4050E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 984 -0.2889E-03 0.4096E-01

68.00 16.00 900.0 26.40 / 19 Constant 53.82 2.726 Mean 0.1030E-02 0.9841E-03 Sigma 0.2267E-01 0.1039E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 510 -0.1301E-04 0.4546E-01 39.00 10.00 461.0 13.55 / 19 Constant 23.58 1.664 Mean 0.1315E-02 0.1851E-02 Sigma 0.2721E-01 0.2117E-02

cm counts

Residuals on Straw Tubes (LEST)

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 984 -0.8975E-04 0.4728E-01

102.0 13.00 869.0 18.02 / 19 Constant 45.12 2.417 Mean 0.2197E-03 0.1239E-02 Sigma 0.2560E-01 0.1443E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 615 -0.1627E-02 0.5389E-01 74.00 15.00 526.0 53.91 / 19 Constant 23.64 1.713 Mean -0.4207E-02 0.1852E-02 Sigma 0.2513E-01 0.1886E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 984 -0.1106E-02 0.4545E-01

66.00 10.00 908.0 16.26 / 19 Constant 50.85 2.650 Mean 0.1374E-02 0.1058E-02 Sigma 0.2377E-01 0.1205E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 984 0.2444E-02 0.4916E-01 34.00 716.0 234.0 25.83 / 19 Constant 10.71 1.185 Mean 0.9470E-03 0.2894E-02 Sigma 0.2746E-01 0.3705E-02

cm counts

Z Residuals on Straw Tubes

0

20

40

60

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 984 -0.1784 1.679 4.000 0.000 980.0 25.09 / 32 Constant 51.84 2.127 Mean -0.4620E-01 0.5034E-01 Sigma 1.433 0.3889E-01

cm counts

0

20

40

60

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 984 0.8411E-01 1.380 2.000 0.000 982.0 35.97 / 32 Constant 55.67 2.232 Mean 0.6559E-01 0.4615E-01 Sigma 1.359 0.3425E-01

cm counts

Residuals on Drift Chambers

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 417 -0.2413E-01 0.3232 19.00 9.000 389.0 37.64 / 17 Constant 35.73 3.207 Mean -0.1514E-01 0.4628E-02 Sigma 0.7440E-01 0.4948E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 417 0.8686E-01 1.696 2.000 2.000 413.0 9.495 / 17 Constant 38.48 2.590 Mean 0.7293E-02 0.5194E-01 Sigma 0.9556 0.4352E-01

cm counts

0

20

40

60

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 417 0.1886E-01 0.3169 11.00 17.00 389.0 16.12 / 11 Constant 39.45 3.240 Mean 0.1596E-01 0.4297E-02 Sigma 0.6664E-01 0.3895E-02

cm counts

0

50

100

150

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 417 -0.9263E-02 0.1191 0.000 0.000 417.0 36.03 / 5 Constant 161.3 13.06 Mean -0.3980E-02 0.1108E-02 Sigma 0.1874E-01 0.1073E-02

cm counts

Residuals on Drift Chambers

0

20

40

60

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 420 -0.4130E-01 0.2685 27.00 11.00 382.0 45.03 / 17 Constant 36.04 3.740 Mean -0.2851E-01 0.4506E-02 Sigma 0.7201E-01 0.6093E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 420 0.4571 1.553 1.000 2.000 417.0 20.20 / 17 Constant 33.05 2.327 Mean 0.3769 0.6749E-01 Sigma 1.129 0.6493E-01

cm counts

0

20

40

60

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 420 -0.3593E-01 0.2709 25.00 12.00 383.0 20.84 / 11 Constant 40.00 3.609 Mean -0.2560E-01 0.4203E-02 Sigma 0.6455E-01 0.4554E-02

cm counts

0

50

100

150

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 420 0.1387E-01 0.1378 0.000 0.000 420.0 49.47 / 5 Constant 146.9 15.06 Mean 0.5323E-02 0.1256E-02 Sigma 0.2067E-01 0.1766E-02

cm counts

Residuals on Drift Chambers

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 443 0.1852E-01 0.2840 18.00 26.00 399.0 22.79 / 17 Constant 42.18 3.076 Mean 0.1709E-02 0.4391E-02 Sigma 0.7507E-01 0.3536E-02

cm counts

0 10 20 30 40 50

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 443 -0.3002 1.860 2.000 3.000 438.0 18.32 / 17 Constant 40.91 2.846 Mean -0.2944 0.4980E-01 Sigma 0.9327 0.4713E-01

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 443 -0.1664E-01 0.2841 24.00 20.00 399.0 8.022 / 11 Constant 43.15 3.104 Mean -0.1261E-02 0.4470E-02 Sigma 0.7278E-01 0.3610E-02

cm counts

0

100

200

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 443 0.4797E-03 0.1249E-01 0.000 0.000 443.0 -9999. / -1 Constant 359.8 269.5 Mean 0.4947E-03 0.9784E-03 Sigma 0.1269E-01 0.9811E-02

cm counts

Residuals on Drift Chambers

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 467 -0.2297E-01 0.2243 16.00 21.00 430.0 15.97 / 17 Constant 45.51 3.014 Mean -0.3029E-01 0.4333E-02 Sigma 0.7958E-01 0.3307E-02

cm counts

0

20

40

60

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 467 0.5119 1.474 0.000 3.000 464.0 24.93 / 17 Constant 41.93 2.857 Mean 0.5203 0.5396E-01 Sigma 1.006 0.5498E-01

cm counts

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 467 -0.2727E-01 0.2238 21.00 16.00 430.0 8.047 / 11 Constant 46.51 3.133 Mean -0.2856E-01 0.4919E-02 Sigma 0.7657E-01 0.3816E-02

cm counts

0

100

200

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 467 -0.1686E-02 0.1239E-01 0.000 0.000 467.0 -9999. / -1 Constant 382.8 269.9 Mean -0.1717E-02 0.2554E-02 Sigma 0.1257E-01 0.9138E-02

cm counts

Residuals on OSIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 796 -0.9522E-01

0.2663 5.000 5.000 786.0 37.79 / 14 Constant 53.93 3.615 Mean -0.9664E-01 0.3911E-02 Sigma 0.7693E-01 0.4741E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 796 0.4337E-01 0.3130 44.00 46.00 706.0 27.28 / 13 Constant 38.67 2.865 Mean 0.1185E-01 0.5098E-02 Sigma 0.8506E-01 0.6351E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 796 -0.8673E-01

0.2504 5.000 3.000 788.0 61.43 / 15 Constant 56.60 4.870 Mean -0.8618E-01 0.4670E-02 Sigma 0.7381E-01 0.7790E-02

cm counts

0

100

200

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 796 0.1241E-01 0.1237 0.000 0.000 796.0 131.9 / 3 Constant 102.0 8.478 Mean 0.1656E-02 0.2860E-02 Sigma 0.3573E-01 0.3818E-02

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 776 -0.3983E-01

0.2615 7.000 4.000 765.0 36.56 / 14 Constant 53.49 3.402 Mean -0.6835E-01 0.3604E-02 Sigma 0.7381E-01 0.3795E-02

cm counts

0 10 20 30 40 50

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 776 0.1299E-01 0.3074 40.00 46.00 690.0 15.51 / 13 Constant 37.64 2.841 Mean -0.1336E-01 0.5705E-02 Sigma 0.9068E-01 0.7676E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 776 0.3728E-01

0.2488 3.000 4.000 769.0 52.48 / 15 Constant 54.83 4.181 Mean 0.5875E-01 0.3919E-02 Sigma 0.7566E-01 0.5883E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 776 -0.1392E-02 0.1257 0.000 0.000 776.0 21.45 / 3 Constant 133.3 8.551 Mean -0.3835E-02 0.1879E-02 Sigma 0.3264E-01 0.2179E-02

cm counts

Residuals on ISIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 844 0.8623E-01

0.2810 10.00 11.00 823.0 48.71 / 15 Constant 47.18 3.107 Mean 0.7791E-01 0.4847E-02 Sigma 0.9148E-01 0.6004E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 844 0.4074E-01 0.3182 43.00 49.00 752.0 21.82 / 13 Constant 39.09 2.776 Mean 0.3034E-02 0.5173E-02 Sigma 0.8664E-01 0.6136E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 844 -0.7273E-01

0.2517 7.000 2.000 835.0 45.49 / 11 Constant 59.04 5.068 Mean -0.5628E-01 0.4200E-02 Sigma 0.6733E-01 0.6962E-02

cm counts

0 25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 844 0.1444E-01 0.1742 5.000 1.000 838.0 26.23 / 9 Constant 86.53 5.104 Mean 0.1771E-01 0.2622E-02 Sigma 0.5644E-01 0.2980E-02

cm counts

Residuals on ISIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 834 0.3677E-01

0.2800 11.00 11.00 812.0 36.19 / 15 Constant 50.65 3.189 Mean 0.5388E-01 0.3881E-02 Sigma 0.7969E-01 0.4109E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 834 0.1378E-01 0.3172 46.00 57.00 731.0 16.19 / 13 Constant 39.15 2.889 Mean -0.8781E-02 0.5334E-02 Sigma 0.8806E-01 0.6929E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 834 0.3212E-01

0.2496 4.000 8.000 822.0 34.75 / 11 Constant 61.70 4.185 Mean 0.3775E-01 0.3690E-02 Sigma 0.6841E-01 0.4716E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 834 -0.4327E-02 0.1555 2.000 7.000 825.0 46.20 / 9 Constant 89.13 5.800 Mean -0.1057E-01 0.2283E-02 Sigma 0.5014E-01 0.2791E-02

cm counts