Residuals on Straw Tubes (LOST)

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 90 -0.1238E-01 0.2455E-01

6.000 0.000 84.00 16.65 / 17 Constant 7.393 1.597 Mean -0.9187E-02 0.1928E-02 Sigma 0.1370E-01 0.2424E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 90 -0.1252E-01 0.2449E-01 6.000 0.000 84.00 20.89 / 18 Constant 6.664 1.655 Mean -0.8251E-02 0.1829E-02 Sigma 0.1300E-01 0.2830E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 90 -0.5045E-02 0.2691E-01

1.000 1.000 88.00 10.20 / 17 Constant 7.245 1.135 Mean -0.6273E-02 0.2213E-02 Sigma 0.1746E-01 0.2250E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 90 -0.7241E-02 0.1607E-01 3.000 0.000 87.00 11.20 / 16 Constant 7.767 1.343 Mean -0.6817E-02 0.2076E-02 Sigma 0.1616E-01 0.2523E-02

cm counts

Residuals on Straw Tubes (RIST)

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 90 -0.8976E-02 0.4030E-01

6.000 2.000 82.00 13.66 / 19 Constant 2.787 0.5480 Mean 0.7732E-03 0.8792E-02 Sigma 0.3492E-01 0.1420E-01

cm counts

0 1 2 3 4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 44 -0.8900E-02 0.4653E-01 4.000 0.000 40.00 6.328 / 17 Constant 1.328 0.3484 Mean -0.1776E-01 0.5225E-01 Sigma 0.8014E-01 0.1004

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 90 -0.9389E-02 0.5055E-01

17.00 1.000 72.00 7.941 / 18 Constant 3.364 0.7205 Mean -0.1118E-01 0.5087E-02 Sigma 0.2449E-01 0.6633E-02

cm counts

0

2

4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 66 -0.1000E-01 0.4872E-01 17.00 0.000 49.00 8.649 / 14 Constant 3.403 10.19 Mean -0.5348 0.5864 Sigma 0.4050 0.3962

cm counts

Residuals on Straw Tubes (LEST)

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 90 -0.3446E-02 0.4265E-01

7.000 0.000 83.00 19.04 / 18 Constant 2.791 0.5689 Mean -0.6300E-02 0.9902E-02 Sigma 0.3505E-01 0.1715E-01

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 43 -0.5122E-02 0.5105E-01 2.000 0.000 41.00 4.855 / 15 Constant 1.530 0.4213 Mean 0.6703E-02 0.2886E-01 Sigma 0.5676E-01 0.6888E-01

cm counts

0 1 2 3 4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 90 -0.2189E-01 0.4961E-01

18.00 0.000 72.00 8.836 / 15 Constant 9.008 19.42 Mean -0.6539 0.5198 Sigma 0.3753 0.2057

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 90 -0.3000E-01 0.5610E-01 1.000 74.00 15.00 1.167 / 4 Constant 1.280 0.7203 Mean 0.6512E-02 0.3398E-01 Sigma 0.4475E-01 0.7391E-01

cm counts

Z Residuals on Straw Tubes

0 2.5 5 7.5 10

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 90 -0.2200 1.580 0.000 0.000 90.00 19.03 / 25 Constant 3.657 0.6126 Mean 0.2116E-01 0.2837 Sigma 1.743 0.3364

cm counts

0 2.5 5 7.5 10

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 90 -0.6844 1.567 0.000 0.000 90.00 20.96 / 22 Constant 3.767 0.6828 Mean 0.4088 0.5979 Sigma 1.793 0.6586

cm counts

Residuals on Drift Chambers

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 40 -0.7812E-01 0.3425 3.000 5.000 32.00 1.374 / 4 Constant 4.935 1.446 Mean -0.1029 0.1833E-01 Sigma 0.4976E-01 0.1947E-01

cm counts

0 1 2 3 4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 40 0.6736 1.652 1.000 3.000 36.00 4.199 / 10 Constant 2.704 0.7389 Mean 0.2177 0.4766 Sigma 1.507 0.6854

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 40 0.2563E-01 0.1634 0.000 0.000 40.00 2.314 / 4 Constant 22.94 9.927 Mean -0.1872E-01 0.1001E-01 Sigma 0.3776E-01 0.5439E-02

cm counts

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 40 0.7813E-01 0.3392 3.000 5.000 32.00 0.000 / 0 Constant 7.235 23.94 Mean 0.3259 0.8220 Sigma 0.2103 0.4600

cm counts

Residuals on Drift Chambers

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 31 0.1600 0.3232 1.000 0.000 30.00 3.367 / 7 Constant 2.742 1.091 Mean 0.8415E-01 0.3096E-01 Sigma 0.8582E-01 0.4878E-01

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 31 0.3266 2.044 0.000 0.000 31.00 3.018 / 8 Constant 2.547 0.7834 Mean 0.1208 1.008 Sigma 1.114 1.610

cm counts

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 31 0.1573E-01 0.9625E-01 0.000 0.000 31.00 11.32 / 6 Constant 3.605 1.524 Mean -0.2499E-01 0.5079E-01 Sigma 0.8767E-01 0.5459E-01

cm counts

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 31 0.1558 0.3148 1.000 0.000 30.00 1.876 / 3 Constant 2.575 2.545 Mean 0.1167 0.3680 Sigma 0.1232 0.2489

cm counts

Residuals on Drift Chambers

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 37 -0.1512 0.2792 2.000 4.000 31.00 0.7125 / 6 Constant 4.217 1.087 Mean -0.7746E-01 0.7154E-01 Sigma 0.9287E-01 0.5881E-01

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 37 0.3125 2.076 1.000 0.000 36.00 3.768 / 10 Constant 3.394 0.8541 Mean 0.4557 0.2367 Sigma 0.9945 0.2756

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 37 -0.9797E-02 0.7763E-02 0.000 0.000 37.00 -9999. / -1 Constant 49.17 125.3 Mean -0.5376E-02 0.1375E-01 Sigma 0.7982E-02 0.1022E-01

cm counts

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 37 0.1512 0.2792 3.000 3.000 31.00 0.000 / 0 Constant 5.050 2.480 Mean 0.5738E-01 0.2549E-01 Sigma 0.4403E-01 0.4070E-01

cm counts

Residuals on Drift Chambers

0 1 2 3 4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 34 0.8266E-01 0.4849 1.000 2.000 31.00 4.764 / 8 Constant 1.801 0.5988 Mean 0.8681E-02 0.1091 Sigma 0.2070 0.1545

cm counts

0 1 2 3 4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 34 0.1176 2.374 0.000 0.000 34.00 4.869 / 10 Constant 1.839 0.5438 Mean 0.1004 0.8544 Sigma 1.968 1.258

cm counts

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 34 -0.2941E-02 0.1215E-01 0.000 0.000 34.00 -9999. / -1 Constant 28.41 69.59 Mean -0.2917E-02 0.1478E-01 Sigma 0.1233E-01 0.3104E-01

cm counts

0 1 2 3 4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 34 0.1512 0.4680 1.000 2.000 31.00 2.335 / 3 Constant 2.635 4.457 Mean -0.8928E-01 0.6030 Sigma 0.1311 0.3835

cm counts

Residuals on OSIM

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 63 0.5131E-01

0.2113 0.000 2.000 61.00 6.279 / 8 Constant 8.360 1.964 Mean -0.1114E-01 0.7740E-02 Sigma 0.4362E-01 0.1025E-01

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 63 -0.2469E-01 0.2271 4.000 10.00 49.00 5.866 / 12 Constant 2.676 0.6775 Mean 0.3524E-02 0.3486E-01 Sigma 0.1079 0.5290E-01

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 63 0.4841E-01

0.1401 0.000 0.000 63.00 6.947 / 7 Constant 24.87 5.344 Mean -0.2138E-02 0.2516E-02 Sigma 0.1574E-01 0.2531E-02

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 63 0.3361E-01 0.1622 0.000 2.000 61.00 2.554 / 3 Constant 10.49 2.267 Mean -0.7710E-02 0.7440E-02 Sigma 0.2990E-01 0.6180E-02

cm counts

Residuals on OSIM

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 51 -0.1617 0.2427 3.000 0.000 48.00 6.300 / 10 Constant 3.965 1.251 Mean -0.1373 0.3180E-01 Sigma 0.7688E-01 0.4394E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 51 -0.9564E-01 0.2486 1.000 11.00 39.00 3.589 / 9 Constant 2.891 0.7969 Mean -0.3801E-01 0.3710E-01 Sigma 0.1042 0.5265E-01

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 51 0.1118E-01

0.1527 0.000 0.000 51.00 19.96 / 11 Constant 2.853 0.9908 Mean 0.3212E-01 0.2626E-01 Sigma 0.8328E-01 0.4628E-01

cm counts

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 51 0.1369 0.2531 0.000 2.000 49.00 0.1060 / 1 Constant 21.46 75.61 Mean -0.5779 0.6788 Sigma 0.2461 0.2291

cm counts

Residuals on ISIM

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 66 -0.7476E-01

0.2566 3.000 0.000 63.00 14.20 / 7 Constant 4.485 0.8667 Mean 0.8329E-02 0.1362 Sigma 0.1366 0.1022

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 66 -0.5415E-01 0.2460 2.000 11.00 53.00 6.207 / 9 Constant 3.622 0.9411 Mean 0.1329E-01 0.2073E-01 Sigma 0.8394E-01 0.2685E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 66 0.9121E-01

0.2415 0.000 0.000 66.00 11.35 / 8 Constant 12.21 4.436 Mean -0.6092E-02 0.5305E-02 Sigma 0.2928E-01 0.1020E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 66 0.6169E-01 0.1929 0.000 1.000 65.00 19.80 / 9 Constant 15.21 4.054 Mean -0.5288E-02 0.4354E-02 Sigma 0.1688E-01 0.3718E-02

cm counts

Residuals on ISIM

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 64 0.1205 0.2760 0.000 1.000 63.00 7.753 / 13 Constant 5.026 1.640 Mean 0.7787E-01 0.1361E-01 Sigma 0.6487E-01 0.2088E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 64 -0.3873E-01 0.3038 1.000 8.000 55.00 7.247 / 11 Constant 2.718 0.7664 Mean -0.3166E-01 0.3628E-01 Sigma 0.1098 0.5359E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 64 0.2937E-01

0.1590 0.000 0.000 64.00 12.16 / 8 Constant 8.863 4.859 Mean 0.3614E-01 0.1134E-01 Sigma 0.3413E-01 0.1817E-01

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 64 0.1397 0.2504 0.000 0.000 64.00 5.041 / 8 Constant 7.818 1.665 Mean 0.8871E-01 0.8739E-01 Sigma 0.5394E-01 0.4443E-01

cm counts