Residuals on Straw Tubes (LOST)

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 565 -0.1969E-02 0.3552E-01

32.00 10.00 523.0 39.73 / 19 Constant 36.83 2.424 Mean 0.1308E-02 0.1028E-02 Sigma 0.1925E-01 0.1005E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 565 -0.2241E-02 0.3010E-01 47.00 4.000 514.0 31.11 / 19 Constant 37.14 2.386 Mean 0.1532E-02 0.1009E-02 Sigma 0.1930E-01 0.9632E-03

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 565 -0.9326E-02 0.3167E-01

23.00 2.000 540.0 27.87 / 19 Constant 44.40 2.687 Mean -0.7024E-02 0.8642E-03 Sigma 0.1687E-01 0.7290E-03

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 565 -0.9985E-02 0.2887E-01 30.00 1.000 534.0 22.76 / 19 Constant 44.72 2.691 Mean -0.6291E-02 0.8669E-03 Sigma 0.1703E-01 0.7346E-03

cm counts

Residuals on Straw Tubes (RIST)

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 565 0.7912E-05 0.5961E-01

46.00 13.00 506.0 29.41 / 19 Constant 26.14 1.996 Mean 0.3799E-02 0.1261E-02 Sigma 0.2045E-01 0.1314E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 306 0.3647E-02 0.6221E-01 46.00 5.000 255.0 11.54 / 18 Constant 9.712 1.154 Mean 0.1440E-02 0.4257E-02 Sigma 0.3318E-01 0.7540E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 565 -0.1398E-01 0.5671E-01

45.00 8.000 512.0 28.94 / 19 Constant 22.08 1.707 Mean -0.1305E-02 0.1829E-02 Sigma 0.2613E-01 0.2243E-02

cm counts

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 190 -0.1570E-01 0.6039E-01 24.00 4.000 162.0 28.01 / 19 Constant 15.30 26.06 Mean -0.6244 0.2490 Sigma 0.3545 0.8409E-01

cm counts

Residuals on Straw Tubes (LEST)

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 565 0.1230E-02 0.5303E-01

54.00 12.00 499.0 24.26 / 19 Constant 27.67 2.032 Mean 0.4588E-02 0.1245E-02 Sigma 0.2065E-01 0.1283E-02

cm counts

0

5

10

15

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 302 -0.3719E-02 0.5426E-01 44.00 2.000 256.0 14.38 / 19 Constant 10.72 1.136 Mean -0.3887E-02 0.3146E-02 Sigma 0.2947E-01 0.4105E-02

cm counts

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 565 -0.1380E-01 0.5029E-01

46.00 5.000 514.0 31.84 / 19 Constant 28.02 2.026 Mean -0.6339E-02 0.1304E-02 Sigma 0.2076E-01 0.1293E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 565 -0.8974E-02 0.5042E-01 28.00 225.0 312.0 18.04 / 19 Constant 13.34 1.255 Mean 0.2267E-02 0.2502E-02 Sigma 0.2738E-01 0.2914E-02

cm counts

Z Residuals on Straw Tubes

0 10 20 30 40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 565 -0.1722 1.417 0.000 0.000 565.0 23.37 / 31 Constant 31.59 1.717 Mean -0.1118 0.6235E-01 Sigma 1.374 0.5012E-01

cm counts

0

10

20

30

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 565 -0.6814E-01 1.417 0.000 0.000 565.0 13.97 / 28 Constant 29.61 1.636 Mean -0.7980E-02 0.7475E-01 Sigma 1.539 0.6926E-01

cm counts

Residuals on Drift Chambers

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 220 0.4082E-01 0.3326 17.00 30.00 173.0 23.32 / 15 Constant 19.28 2.815 Mean 0.1395E-01 0.6579E-02 Sigma 0.5934E-01 0.6775E-02

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 220 -0.2218 1.499 1.000 2.000 217.0 32.85 / 16 Constant 20.94 2.711 Mean -0.3718 0.6664E-01 Sigma 0.8295 0.9055E-01

cm counts

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 220 -0.7786E-01 0.4114 6.000 4.000 210.0 21.77 / 9 Constant 32.12 5.243 Mean -0.8449E-02 0.4085E-02 Sigma 0.3704E-01 0.5095E-02

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 220 0.7392E-01 0.3967 12.00 22.00 186.0 8.439 / 5 Constant 24.91 3.515 Mean 0.1434E-01 0.5039E-02 Sigma 0.4538E-01 0.5672E-02

cm counts

Residuals on Drift Chambers

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 208 -0.5731E-01 0.3240 11.00 14.00 183.0 18.16 / 16 Constant 15.46 2.173 Mean -0.7059E-01 0.7468E-02 Sigma 0.7821E-01 0.9086E-02

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 208 0.5397 1.588 0.000 0.000 208.0 14.51 / 16 Constant 17.03 1.697 Mean 0.2478 0.8566E-01 Sigma 1.030 0.7714E-01

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 208 -0.8131E-02 0.3633 1.000 1.000 206.0 24.07 / 10 Constant 26.55 4.035 Mean -0.4282E-01 0.4344E-02 Sigma 0.4669E-01 0.5876E-02

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 208 0.1497E-01 0.3696 8.000 8.000 192.0 6.574 / 5 Constant 24.30 7.527 Mean 0.9502E-01 0.4623E-01 Sigma 0.7503E-01 0.2049E-01

cm counts

Residuals on Drift Chambers

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 158 -0.3787E-01 0.4153 16.00 6.000 136.0 23.96 / 14 Constant 8.492 1.472 Mean 0.3846E-01 0.1177E-01 Sigma 0.8934E-01 0.1469E-01

cm counts

0

5

10

15

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 158 1.138 1.733 2.000 1.000 155.0 16.65 / 14 Constant 11.58 1.354 Mean 1.470 0.2785 Sigma 1.327 0.2356

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 158 0.8452E-01 0.4307 4.000 3.000 151.0 11.81 / 10 Constant 12.65 2.140 Mean -0.2250E-01 0.8365E-02 Sigma 0.6957E-01 0.1096E-01

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 158 -0.8452E-01 0.4307 3.000 4.000 151.0 6.547 / 5 Constant 14.24 2.213 Mean 0.2623E-01 0.9583E-02 Sigma 0.5933E-01 0.1056E-01

cm counts

Residuals on Drift Chambers

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 238 -0.7984E-01 0.2628 16.00 13.00 209.0 7.855 / 14 Constant 20.80 2.108 Mean -0.8899E-01 0.7759E-02 Sigma 0.8433E-01 0.6791E-02

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 238 0.2037 1.602 3.000 3.000 232.0 11.02 / 17 Constant 21.79 1.987 Mean -0.5956E-02 0.6996E-01 Sigma 0.9359 0.5814E-01

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 238 -0.3978E-01 0.3051 8.000 11.00 219.0 12.01 / 10 Constant 31.01 3.300 Mean -0.6607E-01 0.4823E-02 Sigma 0.5238E-01 0.4240E-02

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 238 0.3978E-01 0.3051 11.00 8.000 219.0 7.071 / 5 Constant 33.74 3.930 Mean 0.5439E-01 0.8593E-02 Sigma 0.4252E-01 0.6687E-02

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 431 -0.9798E-01

0.2350 8.000 2.000 421.0 58.29 / 14 Constant 39.72 5.494 Mean -0.1157 0.3776E-02 Sigma 0.4922E-01 0.6430E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 431 -0.4087E-02 0.2973 23.00 19.00 389.0 10.64 / 13 Constant 25.59 2.237 Mean 0.2023E-01 0.5699E-02 Sigma 0.7749E-01 0.5806E-02

cm counts

0

25

50

75

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 431 -0.4630E-01

0.1565 3.000 1.000 427.0 78.49 / 15 Constant 43.35 4.189 Mean -0.4996E-01 0.3325E-02 Sigma 0.5368E-01 0.4349E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 431 0.9005E-01 0.2220 1.000 1.000 429.0 11.79 / 3 Constant 0.2468E+06 0.2930E+06 Mean 1.212 0.2829E-01 Sigma 0.2724 0.2174E-01

cm counts

Residuals on OSIM

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 401 -0.3821E-01

0.2569 1.000 3.000 397.0 36.39 / 14 Constant 31.55 3.428 Mean -0.5498E-01 0.4222E-02 Sigma 0.6397E-01 0.6054E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 401 -0.5874E-01 0.3106 20.00 17.00 364.0 24.39 / 13 Constant 22.94 2.069 Mean -0.4594E-01 0.6913E-02 Sigma 0.7664E-01 0.6223E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 401 0.1915E-01

0.1446 0.000 1.000 400.0 71.21 / 15 Constant 48.03 6.964 Mean 0.2254E-01 0.2818E-02 Sigma 0.4516E-01 0.5945E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 401 -0.2829E-01 0.2179 2.000 1.000 398.0 5.996 / 3 Constant 53.10 59.06 Mean -0.6825E-01 0.8742E-01 Sigma 0.5948E-01 0.3462E-01

cm counts

Residuals on ISIM

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 445 0.9282E-01

0.2420 7.000 6.000 432.0 62.63 / 15 Constant 24.75 3.435 Mean 0.9170E-01 0.5889E-02 Sigma 0.8164E-01 0.1206E-01

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 445 -0.9150E-02 0.3107 23.00 22.00 400.0 20.58 / 13 Constant 24.31 2.223 Mean 0.1210E-01 0.6139E-02 Sigma 0.7792E-01 0.6351E-02

cm counts

0 25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 445 -0.1548E-01

0.1564 3.000 0.000 442.0 65.77 / 11 Constant 36.28 3.508 Mean -0.2100E-01 0.4654E-02 Sigma 0.6681E-01 0.6359E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 445 0.7686E-01 0.2366 2.000 3.000 440.0 14.33 / 9 Constant 38.56 6.069 Mean 0.1147 0.4063E-01 Sigma 0.1002 0.2243E-01

cm counts

Residuals on ISIM

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 430 0.4910E-01

0.2470 4.000 5.000 421.0 48.62 / 15 Constant 30.79 3.729 Mean 0.4888E-01 0.4447E-02 Sigma 0.6751E-01 0.7493E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 430 -0.4186E-01 0.3214 18.00 19.00 393.0 12.60 / 13 Constant 21.54 1.946 Mean -0.2844E-01 0.7524E-02 Sigma 0.8892E-01 0.8042E-02

cm counts

0 20 40 60 80 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 430 0.2185E-01

0.1609 0.000 3.000 427.0 49.70 / 11 Constant 54.99 5.936 Mean 0.1860E-01 0.2618E-02 Sigma 0.4369E-01 0.4073E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 430 -0.4009E-01 0.2152 2.000 2.000 426.0 27.80 / 9 Constant 43.06 4.755 Mean -0.3334E-01 0.3392E-02 Sigma 0.4875E-01 0.5253E-02

cm counts