Residuals on Straw Tubes (LOST)

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 775 -0.1021E-01 0.2861E-01

52.00 2.000 721.0 24.02 / 19 Constant 55.44 2.790 Mean -0.7942E-02 0.8306E-03 Sigma 0.1889E-01 0.6999E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 775 -0.9872E-02 0.3024E-01 52.00 2.000 721.0 28.37 / 19 Constant 55.19 2.782 Mean -0.7572E-02 0.8207E-03 Sigma 0.1878E-01 0.6875E-03

cm counts

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 775 -0.6175E-02 0.2814E-01

20.00 1.000 754.0 14.65 / 19 Constant 65.17 3.241 Mean -0.2367E-02 0.6941E-03 Sigma 0.1741E-01 0.6190E-03

cm counts

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 775 -0.5420E-02 0.2750E-01 23.00 0.000 752.0 14.89 / 19 Constant 66.31 3.260 Mean -0.2543E-02 0.6770E-03 Sigma 0.1708E-01 0.5851E-03

cm counts

Residuals on Straw Tubes (RIST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 775 -0.9688E-02 0.4355E-01

63.00 6.000 706.0 20.44 / 19 Constant 42.15 2.356 Mean -0.6113E-02 0.1155E-02 Sigma 0.2177E-01 0.1052E-02

cm counts

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 482 -0.9086E-02 0.4233E-01 46.00 7.000 429.0 19.34 / 19 Constant 23.31 1.746 Mean -0.5365E-02 0.1681E-02 Sigma 0.2472E-01 0.1886E-02

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 775 -0.4530E-02 0.4884E-01

87.00 16.00 672.0 18.04 / 19 Constant 36.09 2.255 Mean 0.1735E-03 0.1278E-02 Sigma 0.2402E-01 0.1501E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 396 0.1189E-02 0.5583E-01 86.00 9.000 301.0 21.46 / 19 Constant 15.10 1.458 Mean -0.1690E-02 0.2047E-02 Sigma 0.2363E-01 0.2223E-02

cm counts

Residuals on Straw Tubes (LEST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 775 -0.9575E-02 0.4689E-01

60.00 9.000 706.0 25.27 / 19 Constant 39.75 2.394 Mean -0.2698E-02 0.1054E-02 Sigma 0.2116E-01 0.1080E-02

cm counts

0 5 10 15 20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 335 -0.1095E-01 0.5233E-01 41.00 4.000 290.0 17.17 / 19 Constant 13.14 1.321 Mean -0.1419E-02 0.2325E-02 Sigma 0.2582E-01 0.2843E-02

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 775 -0.4682E-02 0.4790E-01

77.00 18.00 680.0 10.67 / 19 Constant 40.16 2.368 Mean -0.1309E-02 0.1040E-02 Sigma 0.2105E-01 0.1021E-02

cm counts

0 2.5 5 7.5 10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 775 -0.5685E-02 0.6023E-01 20.00 590.0 165.0 19.48 / 19 Constant 4.902 0.7239 Mean 0.2064E-03 0.9288E-02 Sigma 0.4130E-01 0.1717E-01

cm counts

Z Residuals on Straw Tubes

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 775 0.1525E-01 1.511 1.000 0.000 774.0 53.28 / 31 Constant 40.73 1.916 Mean 0.6449E-01 0.5645E-01 Sigma 1.417 0.4536E-01

cm counts

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 775 -0.3362 1.525 1.000 0.000 774.0 32.52 / 33 Constant 40.99 1.869 Mean -0.2959 0.5692E-01 Sigma 1.429 0.4179E-01

cm counts

Residuals on Drift Chambers

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 218 -0.3001E-01 0.3613 34.00 17.00 167.0 16.76 / 14 Constant 16.34 2.528 Mean -0.7282E-01 0.6454E-02 Sigma 0.6508E-01 0.8201E-02

cm counts

0

5

10

15

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 218 0.4103 1.798 0.000 48.00 170.0 27.96 / 16 Constant 12.23 1.567 Mean 0.3794 0.1046 Sigma 1.052 0.1176

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 218 0.6020E-01 0.4554 11.00 22.00 185.0 14.83 / 10 Constant 23.00 2.975 Mean 0.6034E-01 0.4616E-02 Sigma 0.4497E-01 0.3954E-02

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 218 0.6667E-01 0.4506 2.000 6.000 210.0 8.285 / 5 Constant 32.41 4.318 Mean 0.4201E-01 0.3979E-02 Sigma 0.3467E-01 0.4089E-02

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 273 0.8107E-01 0.2842 16.00 12.00 245.0 26.92 / 16 Constant 25.42 2.831 Mean 0.8571E-01 0.5315E-02 Sigma 0.6650E-01 0.5708E-02

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 273 0.2352E-01 1.600 0.000 2.000 271.0 26.77 / 15 Constant 30.74 3.004 Mean -0.1304E-01 0.5528E-01 Sigma 0.7014 0.5125E-01

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 273 0.6497E-01 0.3062 12.00 8.000 253.0 19.06 / 11 Constant 32.51 4.008 Mean 0.6976E-01 0.4346E-02 Sigma 0.5127E-01 0.5408E-02

cm counts

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 273 0.2068E-01 0.3385 0.000 1.000 272.0 6.578 / 5 Constant 46.50 5.047 Mean 0.4790E-01 0.4298E-02 Sigma 0.3946E-01 0.4473E-02

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 295 -0.1228 0.3215 29.00 31.00 235.0 20.08 / 15 Constant 21.50 2.366 Mean -0.8493E-01 0.6163E-02 Sigma 0.7324E-01 0.6059E-02

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 295 -0.4007 1.958 7.000 6.000 282.0 18.24 / 17 Constant 22.13 1.933 Mean -0.3174 0.7635E-01 Sigma 1.071 0.7204E-01

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 295 0.6699E-01 0.3829 18.00 21.00 256.0 17.29 / 10 Constant 29.20 3.243 Mean 0.6106E-01 0.4808E-02 Sigma 0.5533E-01 0.4936E-02

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 295 0.6719E-01 0.3836 18.00 21.00 256.0 8.749 / 5 Constant 31.76 4.386 Mean 0.4833E-01 0.6269E-02 Sigma 0.4282E-01 0.7227E-02

cm counts

Residuals on Drift Chambers

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 245 0.8224E-01 0.4489 15.00 21.00 209.0 13.78 / 16 Constant 14.16 1.587 Mean 0.3582E-01 0.9106E-02 Sigma 0.9545E-01 0.7596E-02

cm counts

0

5

10

15

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 245 0.4098E-01 1.918 1.000 3.000 241.0 25.16 / 17 Constant 13.79 1.328 Mean -0.4295E-01 0.1276 Sigma 1.407 0.1275

cm counts

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 245 0.5962E-01 0.4494 6.000 5.000 234.0 6.214 / 11 Constant 21.93 2.334 Mean 0.2918E-01 0.5765E-02 Sigma 0.6483E-01 0.4579E-02

cm counts

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 245 0.5962E-01 0.4494 6.000 5.000 234.0 1.375 / 5 Constant 22.14 2.428 Mean 0.5476E-01 0.2927E-01 Sigma 0.8287E-01 0.2086E-01

cm counts

Residuals on OSIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 582 -0.2287E-01

0.2399 1.000 3.000 578.0 37.73 / 14 Constant 47.42 3.766 Mean -0.3004E-01 0.3708E-02 Sigma 0.6793E-01 0.4814E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 582 -0.2915E-01 0.3207 27.00 35.00 520.0 16.66 / 13 Constant 29.73 2.583 Mean -0.8579E-02 0.5348E-02 Sigma 0.7894E-01 0.6435E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 582 -0.9516E-02

0.1870 0.000 3.000 579.0 64.82 / 15 Constant 57.28 4.773 Mean -0.2214E-01 0.2864E-02 Sigma 0.5688E-01 0.3914E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 582 -0.1812E-01 0.1513 1.000 0.000 581.0 29.38 / 3 Constant 125.3 10.01 Mean -0.8037E-02 0.1352E-02 Sigma 0.2482E-01 0.1727E-02

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 551 -0.1026 0.2340 2.000 2.000 547.0 41.53 / 14 Constant 43.08 3.862 Mean -0.1086 0.3958E-02 Sigma 0.6941E-01 0.5885E-02

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 551 0.3608E-02 0.3159 25.00 41.00 485.0 13.18 / 13 Constant 25.96 2.334 Mean -0.1797E-01 0.6776E-02 Sigma 0.9031E-01 0.8956E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 551 0.8089E-01

0.2065 1.000 1.000 549.0 31.70 / 15 Constant 48.83 4.137 Mean 0.8540E-01 0.4212E-02 Sigma 0.6755E-01 0.6121E-02

cm counts

0 25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 551 0.5330E-01 0.1339 0.000 0.000 551.0 16.56 / 3 Constant 81.57 7.031 Mean 0.1428E-01 0.2490E-02 Sigma 0.2945E-01 0.2627E-02

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 623 0.7023E-02

0.2565 3.000 2.000 618.0 30.08 / 15 Constant 49.62 3.834 Mean 0.1680E-01 0.3640E-02 Sigma 0.6939E-01 0.4720E-02

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 623 -0.1743E-01 0.3207 36.00 38.00 549.0 18.91 / 13 Constant 30.22 2.611 Mean -0.1913E-02 0.5562E-02 Sigma 0.8207E-01 0.6996E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 623 -0.1948E-02

0.2158 0.000 2.000 621.0 41.34 / 11 Constant 66.54 5.419 Mean -0.9970E-02 0.2504E-02 Sigma 0.4950E-01 0.3361E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 623 -0.1106E-01 0.1573 1.000 0.000 622.0 39.62 / 9 Constant 82.95 5.860 Mean -0.2045E-02 0.2126E-02 Sigma 0.4407E-01 0.2460E-02

cm counts

Residuals on ISIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 604 0.8212E-01

0.2608 9.000 4.000 591.0 42.48 / 15 Constant 41.45 3.182 Mean 0.7546E-01 0.4240E-02 Sigma 0.7546E-01 0.4896E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 604 -0.4466E-02 0.3053 30.00 50.00 524.0 14.00 / 13 Constant 31.44 2.691 Mean -0.1070E-01 0.5098E-02 Sigma 0.7747E-01 0.6139E-02

cm counts

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 604 0.6395E-01

0.2262 6.000 0.000 598.0 28.96 / 11 Constant 50.17 3.685 Mean 0.6481E-01 0.5863E-02 Sigma 0.7201E-01 0.6567E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 604 0.4128E-01 0.1715 0.000 3.000 601.0 59.43 / 9 Constant 72.04 6.535 Mean 0.2185E-01 0.2495E-02 Sigma 0.4441E-01 0.3627E-02

cm counts