Residuals on Straw Tubes (LOST)

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 806 -0.3550E-02 0.3303E-01

57.00 6.000 743.0 25.89 / 19 Constant 57.30 3.158 Mean 0.3528E-03 0.7675E-03 Sigma 0.1841E-01 0.8025E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 806 -0.3941E-02 0.3310E-01 58.00 4.000 744.0 32.95 / 19 Constant 56.86 3.218 Mean 0.3863E-03 0.7815E-03 Sigma 0.1860E-01 0.8612E-03

cm counts

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 806 -0.3249E-02 0.2761E-01

29.00 2.000 775.0 25.22 / 19 Constant 69.81 3.540 Mean -0.8617E-04 0.6386E-03 Sigma 0.1597E-01 0.5660E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 806 -0.3387E-02 0.2824E-01 27.00 3.000 776.0 21.59 / 19 Constant 69.71 3.513 Mean 0.5781E-03 0.6276E-03 Sigma 0.1611E-01 0.5668E-03

cm counts

Residuals on Straw Tubes (RIST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 806 -0.1780E-02 0.4379E-01

79.00 19.00 708.0 18.28 / 19 Constant 40.75 2.278 Mean -0.5427E-03 0.1150E-02 Sigma 0.2305E-01 0.1141E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 539 0.2757E-03 0.5116E-01 67.00 15.00 457.0 21.61 / 19 Constant 19.77 1.458 Mean -0.1942E-02 0.2636E-02 Sigma 0.3225E-01 0.3391E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 806 -0.2016E-02 0.3947E-01

48.00 6.000 752.0 21.55 / 19 Constant 47.10 2.545 Mean 0.2457E-02 0.1015E-02 Sigma 0.2196E-01 0.1032E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 403 -0.2053E-02 0.4551E-01 26.00 3.000 374.0 17.87 / 19 Constant 22.95 1.855 Mean -0.4102E-03 0.1383E-02 Sigma 0.2091E-01 0.1442E-02

cm counts

Residuals on Straw Tubes (LEST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 806 -0.4676E-02 0.4673E-01

86.00 7.000 713.0 14.31 / 19 Constant 38.60 2.242 Mean -0.5231E-03 0.1318E-02 Sigma 0.2542E-01 0.1541E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 459 -0.1206E-02 0.5322E-01 57.00 9.000 393.0 19.44 / 19 Constant 18.73 1.590 Mean 0.4162E-02 0.2059E-02 Sigma 0.2573E-01 0.2443E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 806 -0.4209E-02 0.4471E-01

50.00 8.000 748.0 20.62 / 19 Constant 44.61 2.426 Mean 0.3395E-04 0.1071E-02 Sigma 0.2250E-01 0.1067E-02

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 806 0.1493E-03 0.4879E-01 15.00 724.0 67.00 10.08 / 17 Constant 2.672 0.5871 Mean 0.1315E-02 0.1315E-01 Sigma 0.3846E-01 0.2189E-01

cm counts

Z Residuals on Straw Tubes

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 806 -0.2183 1.639 1.000 0.000 805.0 42.01 / 32 Constant 42.80 1.914 Mean -0.9954E-01 0.5358E-01 Sigma 1.390 0.3861E-01

cm counts

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 806 -0.5925E-01 1.446 1.000 0.000 805.0 38.46 / 31 Constant 43.43 1.969 Mean -0.7130E-01 0.5533E-01 Sigma 1.424 0.4369E-01

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 338 -0.4486E-01 0.3150 37.00 19.00 282.0 15.82 / 17 Constant 25.91 2.640 Mean -0.1226E-01 0.5527E-02 Sigma 0.7753E-01 0.5795E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 338 0.4096 1.709 3.000 3.000 332.0 21.11 / 17 Constant 28.39 2.440 Mean 0.2148 0.6295E-01 Sigma 0.9468 0.6197E-01

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 338 0.3918E-01 0.3173 18.00 37.00 283.0 12.05 / 11 Constant 28.10 2.845 Mean 0.1034E-01 0.5294E-02 Sigma 0.7010E-01 0.5545E-02

cm counts

0 25 50 75 100

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 338 -0.2840E-01 0.1774 0.000 0.000 338.0 30.52 / 5 Constant 119.5 10.55 Mean -0.3675E-02 0.1241E-02 Sigma 0.1832E-01 0.1048E-02

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 316 -0.2269E-01 0.2784 20.00 9.000 287.0 20.99 / 17 Constant 22.40 2.458 Mean -0.2048E-01 0.6532E-02 Sigma 0.8916E-01 0.7859E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 316 0.5369 1.625 1.000 0.000 315.0 14.05 / 17 Constant 27.95 2.194 Mean 0.4622 0.6998E-01 Sigma 1.004 0.5885E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 316 -0.1145E-01 0.2729 20.00 9.000 287.0 10.97 / 11 Constant 25.59 2.694 Mean -0.1970E-01 0.5989E-02 Sigma 0.7596E-01 0.6821E-02

cm counts

0 25 50 75 100

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 316 0.1464E-01 0.1212 0.000 0.000 316.0 39.61 / 5 Constant 75.53 11.53 Mean 0.2697E-02 0.2034E-02 Sigma 0.3044E-01 0.4132E-02

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 343 0.2560E-01 0.3209 17.00 36.00 290.0 11.46 / 17 Constant 28.03 2.369 Mean -0.1057E-01 0.5450E-02 Sigma 0.8113E-01 0.4360E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 343 -0.2858 1.658 2.000 2.000 339.0 13.06 / 17 Constant 33.07 2.645 Mean -0.3878 0.5445E-01 Sigma 0.9015 0.5332E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 343 -0.2612E-01 0.3209 35.00 18.00 290.0 5.642 / 11 Constant 28.61 2.448 Mean 0.9387E-02 0.5782E-02 Sigma 0.7852E-01 0.4908E-02

cm counts

0

50

100

150

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 343 -0.4009E-03 0.1249E-01 0.000 0.000 343.0 -9999. / -1 Constant 278.5 237.3 Mean -0.4135E-03 0.1004E-02 Sigma 0.1269E-01 0.1116E-01

cm counts

Residuals on Drift Chambers

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 395 -0.4159E-01 0.2630 33.00 20.00 342.0 28.95 / 17 Constant 30.74 2.764 Mean -0.3591E-01 0.5664E-02 Sigma 0.8662E-01 0.6039E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 395 0.8635 1.915 4.000 1.000 390.0 20.36 / 15 Constant 39.11 2.786 Mean 0.6838 0.4893E-01 Sigma 0.8262 0.4057E-01

cm counts

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 395 -0.3640E-01 0.2638 33.00 20.00 342.0 22.17 / 11 Constant 33.44 2.987 Mean -0.3118E-01 0.5859E-02 Sigma 0.7715E-01 0.6040E-02

cm counts

0 50 100 150 200

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 395 -0.1361E-02 0.1243E-01 0.000 0.000 395.0 -9999. / -1 Constant 322.7 250.5 Mean -0.1392E-02 0.2310E-02 Sigma 0.1262E-01 0.1010E-01

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 626 -0.8074E-01

0.2729 8.000 9.000 609.0 36.23 / 14 Constant 42.34 3.049 Mean -0.9666E-01 0.4199E-02 Sigma 0.7442E-01 0.4522E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 626 0.2525E-01 0.3019 33.00 41.00 552.0 17.72 / 13 Constant 29.29 2.261 Mean 0.1214E-01 0.7442E-02 Sigma 0.9518E-01 0.8171E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 626 -0.7320E-01

0.2592 8.000 6.000 612.0 52.44 / 15 Constant 41.53 4.579 Mean -0.8917E-01 0.7300E-02 Sigma 0.8074E-01 0.1256E-01

cm counts

0 50 100 150 200

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 626 0.5769E-02 0.1189 0.000 2.000 624.0 101.7 / 3 Constant 83.26 7.822 Mean 0.3403E-02 0.3141E-02 Sigma 0.3238E-01 0.3512E-02

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 618 -0.7565E-01

0.2682 8.000 8.000 602.0 34.66 / 14 Constant 38.39 2.820 Mean -0.7095E-01 0.4782E-02 Sigma 0.8299E-01 0.5563E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 618 0.3553E-02 0.2906 34.00 38.00 546.0 10.55 / 13 Constant 31.43 2.415 Mean -0.1250E-01 0.6510E-02 Sigma 0.9526E-01 0.8177E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 618 0.6656E-01

0.2510 6.000 8.000 604.0 38.63 / 15 Constant 44.29 3.313 Mean 0.5859E-01 0.4113E-02 Sigma 0.7201E-01 0.4785E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 618 -0.1026E-01 0.1268 0.000 2.000 616.0 32.91 / 3 Constant 116.0 9.117 Mean -0.7898E-03 0.1740E-02 Sigma 0.2882E-01 0.2187E-02

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 658 0.6160E-01

0.2853 12.00 10.00 636.0 42.23 / 15 Constant 41.59 2.920 Mean 0.6925E-01 0.4203E-02 Sigma 0.7598E-01 0.4181E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 658 0.3446E-01 0.3071 31.00 40.00 587.0 15.60 / 13 Constant 30.00 2.284 Mean 0.6656E-02 0.7124E-02 Sigma 0.9698E-01 0.8313E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 658 -0.4953E-01

0.2549 9.000 4.000 645.0 29.77 / 11 Constant 44.97 3.596 Mean -0.6392E-01 0.7771E-02 Sigma 0.7790E-01 0.9057E-02

cm counts

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 658 0.1498E-01 0.1725 4.000 4.000 650.0 18.94 / 9 Constant 66.06 4.257 Mean 0.1796E-01 0.3111E-02 Sigma 0.5870E-01 0.3363E-02

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 643 0.5515E-01

0.2926 9.000 9.000 625.0 37.74 / 15 Constant 35.28 2.576 Mean 0.6404E-01 0.5279E-02 Sigma 0.8887E-01 0.5908E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 643 0.2515E-01 0.3189 34.00 48.00 561.0 22.37 / 13 Constant 32.25 2.486 Mean -0.6595E-02 0.5321E-02 Sigma 0.8068E-01 0.5485E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 643 0.5174E-01

0.2583 4.000 7.000 632.0 24.65 / 11 Constant 41.29 3.124 Mean 0.4373E-01 0.5887E-02 Sigma 0.7961E-01 0.7125E-02

cm counts

0

25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 643 -0.8159E-02 0.1812 1.000 1.000 641.0 22.96 / 9 Constant 66.63 4.406 Mean -0.1759E-01 0.3068E-02 Sigma 0.5433E-01 0.3077E-02

cm counts