Residuals on Straw Tubes (LOST)

0 2000

4000

6000

8000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 117286 -0.3419E-02 0.3619E-01 0.1052E+05

1147. 0.1056E+06 557.5 / 19 Constant 8145. 35.57 Mean 0.3349E-03 0.6531E-04 Sigma 0.1876E-01 0.6202E-04

cm counts

0 2000

4000

6000

8000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 117286 -0.3589E-02 0.3488E-01 0.1170E+05 847.0 0.1047E+06 563.6 / 19 Constant 8159. 35.66 Mean 0.2723E-03 0.6500E-04 Sigma 0.1868E-01 0.6158E-04

cm counts

0 2500

5000

7500

10000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 117286 -0.2741E-02 0.3186E-01

4429. 684.0 0.1122E+06 807.9 / 19 Constant 9239. 38.90 Mean 0.8727E-04 0.5855E-04 Sigma 0.1777E-01 0.5499E-04

cm counts

0 2500

5000

7500

10000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 117286 -0.2840E-02 0.3104E-01 5187. 377.0 0.1117E+06 834.4 / 19 Constant 9295. 39.14 Mean 0.1040E-03 0.5807E-04 Sigma 0.1765E-01 0.5444E-04

cm counts

Residuals on Straw Tubes (RIST)

0

2000

4000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 117286 -0.2546E-02 0.5477E-01 0.1480E+05

2128. 0.1004E+06 92.01 / 19 Constant 4691. 24.23 Mean 0.8893E-03 0.1319E-03 Sigma 0.2743E-01 0.1627E-03

cm counts

0

1000

2000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 71261 -0.3693E-02 0.5846E-01 0.1156E+05 1770.

0.5793E+05 27.17 / 19 Constant 2493. 17.34 Mean -0.1985E-03 0.2046E-03 Sigma 0.2999E-01 0.2719E-03

cm counts

0

2000

4000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 117286 -0.4038E-02 0.5471E-01 0.1185E+05

2163. 0.1033E+06 206.5 / 19 Constant 5077. 25.69 Mean 0.7437E-03 0.1172E-03 Sigma 0.2586E-01 0.1394E-03

cm counts

0

1000

2000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 62597 -0.5051E-02 0.5756E-01 0.1006E+05 1518.

0.5101E+05 55.38 / 19 Constant 2328. 17.01 Mean -0.1242E-05 0.1901E-03 Sigma 0.2777E-01 0.2366E-03

cm counts

Residuals on Straw Tubes (LEST)

0

2000

4000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 117286 -0.2938E-02 0.5485E-01 0.1425E+05

2014. 0.1010E+06 106.2 / 19 Constant 4719. 24.28 Mean 0.1470E-02 0.1323E-03 Sigma 0.2753E-01 0.1633E-03

cm counts

0

1000

2000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 64505 -0.3177E-02 0.5923E-01 0.1017E+05 1538.

0.5280E+05 52.85 / 19 Constant 2244. 16.50 Mean 0.2012E-02 0.2130E-03 Sigma 0.2963E-01 0.2796E-03

cm counts

0

2000

4000

6000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 117286 -0.3778E-02 0.5483E-01 0.1232E+05

1850. 0.1031E+06 174.2 / 19 Constant 5086. 25.65 Mean 0.4752E-03 0.1161E-03 Sigma 0.2569E-01 0.1363E-03

cm counts

0

500

1000

1500

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 117286 -0.3156E-02 0.5872E-01 4488.

0.7846E+05 0.3434E+05 27.67 / 19 Constant 1453. 13.24 Mean 0.1064E-02 0.2685E-03 Sigma 0.2999E-01 0.3568E-03

cm counts

Z Residuals on Straw Tubes

0

2000

4000

6000

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 117286 -0.1527 1.672 364.0 15.00 0.1169E+06 543.9 / 33 Constant 6143. 22.83 Mean -0.7724E-01 0.4689E-02 Sigma 1.482 0.3662E-02

cm counts

0

2000

4000

6000

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 117286 -0.2189 1.655 250.0 19.00 0.1170E+06 1018. / 33 Constant 6145. 22.67 Mean -0.1499 0.4761E-02 Sigma 1.478 0.3579E-02

cm counts

Residuals on Drift Chambers

0

500

1000

1500

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 32907 -0.4081E-01 0.3968 3169. 3154.

0.2658E+05 455.2 / 17 Constant 1542. 16.78 Mean -0.4138E-01 0.1034E-02 Sigma 0.1185 0.1184E-02

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 32907 -0.1052 2.125 290.0 1349.

0.3127E+05 429.0 / 17 Constant 2527. 21.37 Mean -0.1197 0.7073E-02 Sigma 1.079 0.7250E-02

cm counts

0

1000

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 32907 0.3117E-01 0.3922 2217. 2212.

0.2848E+05 552.3 / 11 Constant 2119. 23.61 Mean 0.2648E-01 0.7380E-03 Sigma 0.8252E-01 0.8408E-03

cm counts

0

2000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 32907 0.2030E-01 0.3335 880.0 942.0 0.3108E+05 1042. / 5 Constant 3617. 41.04 Mean 0.7578E-02 0.4344E-03 Sigma 0.4702E-01 0.4803E-03

cm counts

Residuals on Drift Chambers

0

500

1000

1500

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 34467 0.2116E-01 0.3737 2960. 2989.

0.2852E+05 83.78 / 17 Constant 1588. 15.39 Mean -0.1307E-02 0.1087E-02 Sigma 0.1311 0.1167E-02

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 34467 0.4823E-01 1.910 189.0 202.0 0.3408E+05 133.8 / 17 Constant 2772. 21.35 Mean 0.1056 0.6919E-02 Sigma 1.108 0.6622E-02

cm counts

0

1000

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 34467 0.1785E-01 0.3723 2219. 2076.

0.3017E+05 185.7 / 11 Constant 2094. 21.34 Mean -0.6659E-04 0.8331E-03 Sigma 0.9576E-01 0.9639E-03

cm counts

0

2000

4000

6000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 34467 0.2389E-01 0.3236 716.0 873.0 0.3288E+05 792.9 / 5 Constant 4068. 43.12 Mean 0.1707E-01 0.4170E-03 Sigma 0.4823E-01 0.4820E-03

cm counts

Residuals on Drift Chambers

0 500 1000

1500

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 36617 -0.1610E-01 0.3868 3609. 3662.

0.2935E+05 272.0 / 17 Constant 1894. 18.12 Mean -0.7202E-02 0.8429E-03 Sigma 0.1114 0.8582E-03

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 36617 0.1060E-02 2.250 707.0 401.0 0.3551E+05 195.3 / 17 Constant 2603. 20.34 Mean 0.6416E-01 0.7739E-02 Sigma 1.203 0.7931E-02

cm counts

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 36617 0.1402E-01 0.4061 2627. 2492.

0.3150E+05 334.8 / 11 Constant 2576. 24.99 Mean 0.2913E-02 0.6245E-03 Sigma 0.8075E-01 0.6505E-03

cm counts

0 2500

5000

7500

10000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 36617 0.9074E-02 0.3178 1166. 1219.

0.3423E+05 3830. / 5 Constant 0.1218E+05 107.5 Mean 0.2541E-02 0.1324E-03 Sigma 0.1734E-01 0.9581E-04

cm counts

Residuals on Drift Chambers

0

1000

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 41009 0.2147E-01 0.3763 3103. 3169.

0.3474E+05 108.2 / 17 Constant 2190. 18.54 Mean 0.4477E-02 0.8354E-03 Sigma 0.1192 0.8355E-03

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 41009 -0.1423 2.142 298.0 473.0 0.4024E+05 83.81 / 17 Constant 2713. 19.90 Mean -0.6792E-01 0.8446E-02 Sigma 1.321 0.8900E-02

cm counts

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 41009 0.1960E-01 0.3906 2197. 1696.

0.3712E+05 221.1 / 11 Constant 2865. 25.05 Mean 0.3276E-02 0.6581E-03 Sigma 0.8950E-01 0.7038E-03

cm counts

0 2500

5000

7500

10000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 41009 0.8147E-02 0.3215 767.0 780.0 0.3946E+05 4517. / 5 Constant 0.1322E+05 110.3 Mean 0.2179E-02 0.1172E-03 Sigma 0.1801E-01 0.9489E-04

cm counts

Residuals on OSIM

0 1000

2000

3000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 72326 -0.5636E-01

0.3008 1184. 1012.

0.7013E+05 271.9 / 14 Constant 3792. 25.52 Mean -0.7016E-01 0.5824E-03 Sigma 0.9812E-01 0.6916E-03

cm counts

0

1000

2000

3000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 72326 0.3236E-02 0.3412 5642. 5030.

0.6165E+05 181.9 / 13 Constant 2842. 22.30 Mean 0.1033E-01 0.7772E-03 Sigma 0.1045 0.1028E-02

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 72326 -0.4094E-01

0.2507 516.0 478.0 0.7133E+05 1694. / 15 Constant 4733. 31.84 Mean -0.4150E-01 0.4576E-03 Sigma 0.8628E-01 0.5605E-03

cm counts

0

5000

10000

15000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 72326 0.2132E-01 0.2039 292.0 432.0 0.7160E+05 3399. / 3 Constant 8879. 73.95 Mean -0.1186E-02 0.2242E-03 Sigma 0.3322E-01 0.3008E-03

cm counts

Residuals on OSIM

0

2000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 73061 -0.6894E-01

0.3015 1316. 936.0 0.7081E+05 664.6 / 14 Constant 4047. 27.80 Mean -0.7985E-01 0.5078E-03 Sigma 0.8964E-01 0.5982E-03

cm counts

0

1000

2000

3000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 73061 -0.1312E-01 0.3433 6150. 5301.

0.6161E+05 135.9 / 13 Constant 2782. 21.96 Mean -0.1174E-01 0.8143E-03 Sigma 0.1066 0.1087E-02

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 73061 0.5085E-01

0.2540 449.0 542.0 0.7207E+05 2186. / 15 Constant 4789. 33.85 Mean 0.4937E-01 0.4567E-03 Sigma 0.8432E-01 0.5983E-03

cm counts

0

2500

5000

7500

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 73061 0.1991E-02 0.2042 315.0 469.0 0.7228E+05 514.9 / 3 Constant 8781. 66.55 Mean 0.2078E-02 0.2437E-03 Sigma 0.3659E-01 0.3219E-03

cm counts

Residuals on ISIM

0 1000

2000

3000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 78445 0.4082E-01

0.3182 2058. 2262.

0.7412E+05 462.9 / 15 Constant 3704. 25.03 Mean 0.5171E-01 0.6007E-03 Sigma 0.1029 0.7351E-03

cm counts

0

1000

2000

3000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 78447 0.1450E-02 0.3504 6460. 5680.

0.6631E+05 189.5 / 13 Constant 2960. 22.80 Mean 0.6325E-02 0.7632E-03 Sigma 0.1051 0.1024E-02

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 78449 -0.2200E-01

0.2619 944.0 991.0 0.7651E+05 1454. / 11 Constant 5190. 35.76 Mean -0.2601E-01 0.4380E-03 Sigma 0.7643E-01 0.5612E-03

cm counts

0

2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 78445 0.2486E-01 0.2323 931.0 1324.

0.7619E+05 788.6 / 9 Constant 6016. 39.37 Mean 0.1082E-01 0.3844E-03 Sigma 0.6686E-01 0.4537E-03

cm counts

Residuals on ISIM

0

2000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 80323 0.5518E-01

0.3204 2300. 2737.

0.7529E+05 873.1 / 15 Constant 3838. 26.26 Mean 0.6431E-01 0.5539E-03 Sigma 0.9790E-01 0.6762E-03

cm counts

0

1000

2000

3000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 80324 -0.1009E-01 0.3524 7133. 6073.

0.6712E+05 182.6 / 13 Constant 2915. 22.57 Mean -0.6975E-02 0.7959E-03 Sigma 0.1075 0.1091E-02

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 80325 0.3622E-01

0.2679 1020. 1236.

0.7807E+05 1314. / 11 Constant 5228. 35.74 Mean 0.3458E-01 0.4695E-03 Sigma 0.7734E-01 0.5881E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 80323 -0.8406E-02 0.2343 1346. 1490.

0.7749E+05 403.9 / 9 Constant 5914. 38.06 Mean -0.3352E-02 0.3999E-03 Sigma 0.7024E-01 0.4864E-03

cm counts