Residuals on Drift Chambers

0

1000

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

501 28451 -0.2216E-01 0.2220 313.0 344.0 0.2779E+05 95.69 / 14 Constant 2153. 19.62 Mean -0.2142E-01 0.8487E-03 Sigma 0.1097 0.9087E-03

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

601 28451 1.023 1.491 77.00 192.0 0.2818E+05 86.19 / 15 Constant 2956. 23.77 Mean 1.046 0.5826E-02 Sigma 0.9038 0.5147E-02

cm counts

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

701 28451 0.1678E-01 0.2019 253.0 268.0 0.2793E+05 166.6 / 9 Constant 2804. 26.74 Mean 0.1151E-01 0.6527E-03 Sigma 0.7921E-01 0.7176E-03

cm counts

0

2000

4000

6000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

801 28451 0.2251E-01 0.1372 119.0 140.0 0.2819E+05 26.61 / 1 Constant 6742. 69.09 Mean 0.5274E-02 0.2600E-03 Sigma 0.2740E-01 0.2718E-03

cm counts

Residuals on Drift Chambers

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

502 31521 -0.2013E-02 0.1761 214.0 223.0 0.3108E+05 90.46 / 14 Constant 2838. 22.72 Mean -0.1188E-02 0.6605E-03 Sigma 0.9883E-01 0.6279E-03

cm counts

0

1000

2000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

602 31521 1.492 1.589 208.0 197.0 0.3112E+05 21.17 / 15 Constant 2426. 19.28 Mean 1.482 0.9949E-02 Sigma 1.235 0.9787E-02

cm counts

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

702 30697 -0.1320E-02 0.1576 177.0 173.0 0.3035E+05 33.91 / 9 Constant 3390. 28.38 Mean -0.5419E-02 0.5807E-03 Sigma 0.7915E-01 0.5971E-03

cm counts

0

1000

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

802 15318 0.4153E-01 0.1414 82.00 79.00 0.1516E+05 51.46 / 5 Constant 2241. 28.67 Mean 0.4324E-01 0.6334E-03 Sigma 0.5548E-01 0.7084E-03

cm counts

Residuals on OSIM

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

53 85229 -0.7009E-01

0.2445 530.0 417.0 0.8428E+05 164.0 / 11 Constant 5240. 31.52 Mean -0.7902E-01 0.5501E-03 Sigma 0.9367E-01 0.7129E-03

cm counts

0

2000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

63 85229 -0.1056E-01 0.2593 2448. 2479.

0.8030E+05 185.9 / 12 Constant 4831. 30.11 Mean -0.1040E-01 0.5474E-03 Sigma 0.9499E-01 0.7046E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

73 85229 0.2985E-01

0.2074 170.0 184.0 0.8488E+05 273.1 / 15 Constant 5602. 29.63 Mean 0.2583E-01 0.4731E-03 Sigma 0.9960E-01 0.5089E-03

cm counts

0

5000

10000

15000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

83 85229 0.1351E-01 0.1619 92.00 222.0 0.8492E+05 134.9 / 1 Constant 0.1458E+05 101.2 Mean 0.2878E-02 0.1503E-03 Sigma 0.2325E-01 0.1695E-03

cm counts

Residuals on ISIM

0

2000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

33 93022 0.5296E-01

0.2710 1341. 1674.

0.9001E+05 118.5 / 11 Constant 4971. 30.20 Mean 0.5992E-01 0.6419E-03 Sigma 0.1023 0.8995E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

43 93025 -0.9048E-02 0.2735 3084. 2934.

0.8701E+05 156.9 / 12 Constant 5054. 30.71 Mean -0.1024E-01 0.5322E-03 Sigma 0.9460E-01 0.6778E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

13 93025 0.3076E-01

0.2206 570.0 691.0 0.9176E+05 350.7 / 11 Constant 6548. 36.36 Mean 0.2365E-01 0.4236E-03 Sigma 0.8351E-01 0.5039E-03

cm counts

0 2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

23 93022 0.1133E-01 0.1952 795.0 1094.

0.9113E+05 268.8 / 8 Constant 8076. 45.94 Mean 0.9413E-02 0.3337E-03 Sigma 0.6548E-01 0.4061E-03

cm counts

Residuals on Φ angle

0 1000

2000

3000

4000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10013 28451 -0.4558E-01

0.6338 193.0 201.0 0.2806E+05 111.7 / 8 Constant 3643. 32.38 Mean -0.5277E-01 0.1925E-02 Sigma 0.2632 0.1954E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

2000

4000

6000

8000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10023 31521 -0.2180E-03 0.4083 57.00 49.00 0.3142E+05 11.71 / 3 Constant 8076. 63.78 Mean -0.4554E-03 0.9203E-03 Sigma 0.1390 0.8465E-03

Φ_{det}-Φ_{fit} (deg.)

counts

0 1000

2000

3000

4000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10033 85229

0.4632 1.442 1280. 1597.

0.8235E+05 180.0 / 17 Constant 3843. 22.72 Mean 0.5313 0.3631E-02 Sigma 0.6444 0.4551E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

1000

2000

3000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10043 93025 0.4153 1.706 3984. 5201.

0.8384E+05 122.3 / 21 Constant 2870. 17.47 Mean 0.5171 0.5597E-02 Sigma 0.8851 0.7880E-02

Φ_{det}-Φ_{fit} (deg.)

counts