Residuals on Drift Chambers

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

501 53312 -0.2297E-01 0.3244 1800. 1735.

0.4978E+05 130.1 / 14 Constant 3083. 23.04 Mean -0.2178E-01 0.7872E-03 Sigma 0.1198 0.9071E-03

cm counts

0

2000

4000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

601 53312 1.002 1.875 310.0 536.0 0.5247E+05 154.6 / 15 Constant 4657. 28.85 Mean 1.034 0.5158E-02 Sigma 1.018 0.4950E-02

cm counts

0

2000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

701 53312 0.1879E-01 0.2962 1271. 1373.

0.5067E+05 282.4 / 9 Constant 4174. 32.40 Mean 0.1110E-01 0.5711E-03 Sigma 0.8382E-01 0.6659E-03

cm counts

0

2500

5000

7500

10000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

801 53312 0.1944E-01 0.2205 615.0 640.0 0.5206E+05 9.307 / 1 Constant 9475. 81.24 Mean 0.5357E-02 0.2444E-03 Sigma 0.2982E-01 0.2815E-03

cm counts

Residuals on Drift Chambers

0 1000

2000

3000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

502 59380 -0.4614E-03 0.2927 1650. 1683.

0.5605E+05 107.2 / 14 Constant 4102. 26.83 Mean -0.2587E-02 0.6024E-03 Sigma 0.1079 0.6195E-03

cm counts

0 1000

2000

3000

4000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

602 59380 1.402 2.024 646.0 707.0 0.5803E+05 34.92 / 15 Constant 4069. 24.79 Mean 1.443 0.8231E-02 Sigma 1.320 0.8726E-02

cm counts

0

2000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

702 57391 0.1154E-02 0.2720 1272. 1268.

0.5485E+05 34.63 / 9 Constant 4926. 33.80 Mean -0.4274E-02 0.5244E-03 Sigma 0.8498E-01 0.5778E-03

cm counts

0

1000

2000

3000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

802 31464 0.3431E-01 0.2589 625.0 599.0 0.3024E+05 66.88 / 5 Constant 3479. 35.18 Mean 0.4238E-01 0.5600E-03 Sigma 0.5986E-01 0.6697E-03

cm counts

Residuals on OSIM

0

2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

53 146047 -0.6324E-01

0.3027 2506. 2036.

0.1415E+06 211.6 / 11 Constant 7350. 36.95 Mean -0.7811E-01 0.5130E-03 Sigma 0.1002 0.7069E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

63 146047 -0.1382E-01 0.3422 0.1196E+05 0.1025E+05 0.1238E+06 190.3 / 12 Constant 5651. 32.04 Mean -0.1088E-01 0.5766E-03 Sigma 0.1042 0.8063E-03

cm counts

0

2500

5000

7500

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

73 146047 0.2673E-01

0.2565 927.0 1113.

0.1440E+06 452.6 / 15 Constant 8295. 36.11 Mean 0.2467E-01 0.4104E-03 Sigma 0.1043 0.4718E-03

cm counts

0 5000

10000

15000

20000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

83 146047 0.1279E-01 0.2056 606.0 916.0 0.1445E+06 128.3 / 1 Constant 0.2115E+05 121.1 Mean 0.2735E-02 0.1362E-03 Sigma 0.2490E-01 0.1666E-03

cm counts

Residuals on ISIM

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

33 159517 0.4714E-01

0.3225 4371. 5070.

0.1501E+06 146.0 / 11 Constant 7009. 35.61 Mean 0.5931E-01 0.5965E-03 Sigma 0.1091 0.8910E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

43 159520 -0.1293E-01 0.3513 0.1380E+05 0.1167E+05 0.1340E+06 176.2 / 12 Constant 5908. 32.70 Mean -0.1069E-01 0.5674E-03 Sigma 0.1046 0.7940E-03

cm counts

0 2500

5000

7500

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

13 159523 0.2710E-01

0.2671 1924. 2354.

0.1552E+06 472.6 / 11 Constant 9504. 43.54 Mean 0.2296E-01 0.3769E-03 Sigma 0.8819E-01 0.4756E-03

cm counts

0

5000

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

23 159517 0.1066E-01 0.2355 2298. 2833.

0.1544E+06 355.0 / 8 Constant 0.1158E+05 54.28 Mean 0.9283E-02 0.3065E-03 Sigma 0.7028E-01 0.3972E-03

cm counts

Residuals on Φ angle

0

2000

4000

6000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10013 53312 -0.5439E-01

1.026 860.0 849.0 0.5160E+05 157.0 / 8 Constant 5216. 37.90 Mean -0.5414E-01 0.1782E-02 Sigma 0.2891 0.1952E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

5000

10000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10023 59380 0.8537E-02 0.7582 391.0 271.0 0.5872E+05 16.30 / 3 Constant 0.1166E+05 75.52 Mean -0.2287E-02 0.8431E-03 Sigma 0.1522 0.8513E-03

Φ_{det}-Φ_{fit} (deg.)

counts

0

2000

4000

6000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10033 146047

0.4108 1.701 4881. 6021.

0.1351E+06 234.0 / 17 Constant 5384. 26.60 Mean 0.5245 0.3393E-02 Sigma 0.6921 0.4549E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0 1000

2000

3000

4000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10043 159521 0.3645 1.896 0.1171E+05 0.1402E+05 0.1338E+06 137.8 / 21 Constant 4041. 20.58 Mean 0.5134 0.5238E-02 Sigma 0.9477 0.7904E-02

Φ_{det}-Φ_{fit} (deg.)

counts