Residuals on Drift Chambers

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

501 41306 -0.2565E-01 0.2795 1014. 916.0 0.3938E+05 138.6 / 14 Constant 2829. 22.49 Mean -0.2236E-01 0.7488E-03 Sigma 0.1109 0.8130E-03

cm counts

0 1000

2000

3000

4000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

601 41306 1.085 1.717 153.0 540.0 0.4061E+05 163.3 / 15 Constant 3855. 26.84 Mean 1.112 0.5405E-02 Sigma 0.9639 0.5071E-02

cm counts

0 1000

2000

3000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

701 41306 0.1532E-01 0.2595 732.0 741.0 0.3983E+05 259.6 / 9 Constant 3770. 31.24 Mean 0.1119E-01 0.5544E-03 Sigma 0.7838E-01 0.6118E-03

cm counts

0 2000

4000

6000

8000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

801 41306 0.1977E-01 0.1857 333.0 318.0 0.4066E+05 13.60 / 1 Constant 8637. 78.03 Mean 0.5779E-02 0.2373E-03 Sigma 0.2803E-01 0.2544E-03

cm counts

Residuals on Drift Chambers

0

1000

2000

3000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

502 45434 -0.2625E-02 0.2415 686.0 600.0 0.4415E+05 86.78 / 14 Constant 3652. 25.54 Mean -0.2162E-02 0.6012E-03 Sigma 0.1020 0.5845E-03

cm counts

0

1000

2000

3000

4000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

602 45434 1.121 1.696 347.0 370.0 0.4472E+05 150.8 / 15 Constant 3746. 25.14 Mean 1.159 0.6302E-02 Sigma 1.111 0.6354E-02

cm counts

0 1000

2000

3000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

702 44067 -0.1359E-03 0.2244 473.0 451.0 0.4314E+05 33.65 / 9 Constant 4375. 32.09 Mean -0.4369E-02 0.5261E-03 Sigma 0.8113E-01 0.5538E-03

cm counts

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

802 23788 0.4044E-01 0.2086 197.0 197.0 0.2339E+05 64.53 / 5 Constant 3106. 33.65 Mean 0.4307E-01 0.5488E-03 Sigma 0.5659E-01 0.6281E-03

cm counts

Residuals on OSIM

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

53 116817 -0.6576E-01

0.2692 1117. 960.0 0.1147E+06 219.9 / 11 Constant 6757. 35.62 Mean -0.7819E-01 0.4998E-03 Sigma 0.9558E-01 0.6566E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

63 116817 -0.1427E-01 0.3138 7796. 6604.

0.1024E+06 186.4 / 12 Constant 5196. 30.92 Mean -0.1078E-01 0.5692E-03 Sigma 0.1003 0.7688E-03

cm counts

0 2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

73 116817 0.2586E-01

0.2283 407.0 405.0 0.1160E+06 407.6 / 15 Constant 7420. 34.34 Mean 0.2523E-01 0.4092E-03 Sigma 0.9936E-01 0.4460E-03

cm counts

0

5000

10000

15000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

83 116817 0.1403E-01 0.1799 222.0 463.0 0.1161E+06 147.4 / 1 Constant 0.1876E+05 114.5 Mean 0.2840E-02 0.1365E-03 Sigma 0.2381E-01 0.1583E-03

cm counts

Residuals on ISIM

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

33 127639 0.4906E-01

0.2921 2472. 2882.

0.1223E+06 164.1 / 11 Constant 6429. 34.24 Mean 0.5930E-01 0.5804E-03 Sigma 0.1042 0.8256E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

43 127642 -0.1332E-01 0.3242 9118. 7599.

0.1109E+06 170.4 / 12 Constant 5435. 31.57 Mean -0.1066E-01 0.5569E-03 Sigma 0.1003 0.7494E-03

cm counts

0

2500

5000

7500

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

13 127643 0.2706E-01

0.2403 1091. 1238.

0.1253E+06 482.3 / 11 Constant 8600. 41.79 Mean 0.2326E-01 0.3708E-03 Sigma 0.8380E-01 0.4461E-03

cm counts

0 2500

5000

7500

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

23 127639 0.1176E-01 0.2109 1341. 1771.

0.1245E+06 360.6 / 8 Constant 0.1045E+05 52.11 Mean 0.9553E-02 0.3001E-03 Sigma 0.6664E-01 0.3714E-03

cm counts

Residuals on Φ angle

0

2000

4000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10013 41306 -0.6385E-01

0.8812 456.0 441.0 0.4041E+05 137.0 / 8 Constant 4793. 36.97 Mean -0.5466E-01 0.1700E-02 Sigma 0.2665 0.1736E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0 2500

5000

7500

10000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10023 45434 -0.5703E-02 0.5573 107.0 85.00 0.4524E+05 11.73 / 3 Constant 0.1037E+05 71.77 Mean -0.1822E-02 0.8419E-03 Sigma 0.1440 0.8010E-03

Φ_{det}-Φ_{fit} (deg.)

counts

0

2000

4000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10033 116817

0.4339 1.536 2679. 3178.

0.1110E+06 242.3 / 17 Constant 4949. 25.66 Mean 0.5251 0.3303E-02 Sigma 0.6594 0.4220E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

1000

2000

3000

4000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10043 127643 0.3927 1.765 7141. 8591.

0.1119E+06 155.0 / 21 Constant 3711. 19.79 Mean 0.5135 0.5061E-02 Sigma 0.9015 0.7228E-02

Φ_{det}-Φ_{fit} (deg.)

counts