Residuals on Drift Chambers

0

1000

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

501 28650 -0.2341E-01 0.2226 368.0 353.0 0.2793E+05 107.6 / 14 Constant 2172. 19.79 Mean -0.2214E-01 0.8370E-03 Sigma 0.1088 0.8953E-03

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

601 28650 1.101 1.485 80.00 324.0 0.2825E+05 119.2 / 15 Constant 3002. 24.29 Mean 1.122 0.5730E-02 Sigma 0.8897 0.5121E-02

cm counts

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

701 28650 0.1688E-01 0.2043 281.0 276.0 0.2809E+05 173.9 / 9 Constant 2828. 26.94 Mean 0.1143E-01 0.6444E-03 Sigma 0.7871E-01 0.7074E-03

cm counts

0

2000

4000

6000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

801 28650 0.2103E-01 0.1433 135.0 142.0 0.2837E+05 17.18 / 1 Constant 6794. 69.44 Mean 0.5454E-02 0.2574E-03 Sigma 0.2729E-01 0.2687E-03

cm counts

Residuals on Drift Chambers

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

502 31757 -0.2597E-02 0.1813 299.0 236.0 0.3122E+05 86.65 / 14 Constant 2836. 22.70 Mean -0.8820E-03 0.6620E-03 Sigma 0.9901E-01 0.6300E-03

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

602 31757 1.149 1.476 214.0 198.0 0.3134E+05 131.5 / 15 Constant 2828. 22.11 Mean 1.166 0.6890E-02 Sigma 1.057 0.6675E-02

cm counts

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

702 30932 -0.8944E-03 0.1665 188.0 209.0 0.3054E+05 33.47 / 9 Constant 3388. 28.37 Mean -0.5252E-02 0.5820E-03 Sigma 0.7928E-01 0.5998E-03

cm counts

0

1000

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

802 15519 0.4482E-01 0.1575 89.00 93.00 0.1534E+05 51.09 / 5 Constant 2242. 28.67 Mean 0.4327E-01 0.6338E-03 Sigma 0.5554E-01 0.7097E-03

cm counts

Residuals on OSIM

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

53 85229 -0.7009E-01

0.2445 530.0 417.0 0.8428E+05 164.0 / 11 Constant 5240. 31.52 Mean -0.7902E-01 0.5501E-03 Sigma 0.9367E-01 0.7129E-03

cm counts

0

2000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

63 85229 -0.1056E-01 0.2593 2448. 2479.

0.8030E+05 185.9 / 12 Constant 4831. 30.11 Mean -0.1040E-01 0.5474E-03 Sigma 0.9499E-01 0.7046E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

73 85229 0.2985E-01

0.2074 170.0 184.0 0.8488E+05 273.1 / 15 Constant 5602. 29.63 Mean 0.2583E-01 0.4731E-03 Sigma 0.9960E-01 0.5089E-03

cm counts

0

5000

10000

15000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

83 85229 0.1351E-01 0.1619 92.00 222.0 0.8492E+05 134.9 / 1 Constant 0.1458E+05 101.2 Mean 0.2878E-02 0.1503E-03 Sigma 0.2325E-01 0.1695E-03

cm counts

Residuals on ISIM

0

2000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

33 93022 0.5296E-01

0.2710 1341. 1674.

0.9001E+05 118.5 / 11 Constant 4971. 30.20 Mean 0.5992E-01 0.6419E-03 Sigma 0.1023 0.8995E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

43 93025 -0.9048E-02 0.2735 3084. 2934.

0.8701E+05 156.9 / 12 Constant 5054. 30.71 Mean -0.1024E-01 0.5322E-03 Sigma 0.9460E-01 0.6778E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

13 93025 0.3076E-01

0.2206 570.0 691.0 0.9176E+05 350.7 / 11 Constant 6548. 36.36 Mean 0.2365E-01 0.4236E-03 Sigma 0.8351E-01 0.5039E-03

cm counts

0 2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

23 93022 0.1133E-01 0.1952 795.0 1094.

0.9113E+05 268.8 / 8 Constant 8076. 45.94 Mean 0.9413E-02 0.3337E-03 Sigma 0.6548E-01 0.4061E-03

cm counts

Residuals on Φ angle

0 1000

2000

3000

4000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10013 28650 -0.5363E-01

0.6502 202.0 207.0 0.2824E+05 97.23 / 8 Constant 3682. 32.55 Mean -0.5441E-01 0.1899E-02 Sigma 0.2611 0.1906E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

2000

4000

6000

8000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10023 31757 -0.7203E-02 0.4315 57.00 53.00 0.3165E+05 12.63 / 3 Constant 8069. 63.76 Mean -0.2983E-03 0.9221E-03 Sigma 0.1392 0.8503E-03

Φ_{det}-Φ_{fit} (deg.)

counts

0 1000

2000

3000

4000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10033 85229

0.4632 1.442 1280. 1597.

0.8235E+05 180.0 / 17 Constant 3843. 22.72 Mean 0.5313 0.3631E-02 Sigma 0.6444 0.4551E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

1000

2000

3000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10043 93025 0.4153 1.706 3984. 5201.

0.8384E+05 122.3 / 21 Constant 2870. 17.47 Mean 0.5171 0.5597E-02 Sigma 0.8851 0.7880E-02

Φ_{det}-Φ_{fit} (deg.)

counts