Residuals on Drift Chambers

0 25 50 75 100

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

501 1148 -0.3880E-01 0.1991 10.00 19.00 1119.

35.71 / 14 Constant 90.22 4.446 Mean -0.4397E-01 0.3922E-02 Sigma 0.1021 0.4697E-02

cm counts

0

50

100

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

601 1148 0.9582 1.489 1.000 14.00 1133.

18.09 / 15 Constant 114.5 4.609 Mean 0.9721 0.3042E-01 Sigma 0.9336 0.2713E-01

cm counts

0

50

100

150

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

701 1148 -0.6200E-02 0.1953 11.00 10.00 1127.

22.12 / 9 Constant 109.2 5.437 Mean 0.4229E-03 0.3344E-02 Sigma 0.8137E-01 0.4095E-02

cm counts

0

100

200

300

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

801 1148 0.2021E-01 0.1289 6.000 4.000 1138.

0.4870 / 1 Constant 313.9 15.10 Mean 0.2530E-02 0.1100E-02 Sigma 0.2628E-01 0.1147E-02

cm counts

Residuals on Drift Chambers

0 25 50 75 100

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

502 1220 -0.2196E-03 0.1756 9.000 16.00 1195.

20.64 / 14 Constant 105.9 4.216 Mean -0.4588E-02 0.3541E-02 Sigma 0.1020 0.3176E-02

cm counts

0

50

100

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

602 1220 1.098 1.471 5.000 10.00 1205.

29.73 / 15 Constant 106.3 4.245 Mean 1.093 0.3576E-01 Sigma 1.052 0.3317E-01

cm counts

0

50

100

150

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

702 1195 -0.1222E-01 0.1451 9.000 9.000 1177.

10.02 / 9 Constant 134.4 5.521 Mean -0.1354E-01 0.2976E-02 Sigma 0.7921E-01 0.2882E-02

cm counts

0

50

100

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

802 811 0.3370E-01 0.1358 10.00 5.000 796.0 4.250 / 5 Constant 120.0 6.540 Mean 0.3937E-01 0.2777E-02 Sigma 0.5369E-01 0.2795E-02

cm counts

Residuals on OSIM

0

100

200

300

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

53 3195 -0.7847E-01

0.2185 13.00 9.000 3173.

31.93 / 11 Constant 227.3 7.044 Mean -0.8438E-01 0.2142E-02 Sigma 0.8023E-01 0.2641E-02

cm counts

0

100

200

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

63 3195 -0.3407E-02 0.2282 59.00 72.00 3064.

32.08 / 12 Constant 219.6 6.581 Mean -0.4189E-02 0.2173E-02 Sigma 0.8332E-01 0.2484E-02

cm counts

0

100

200

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

73 3195 0.1341E-01

0.1793 5.000 6.000 3184.

34.27 / 15 Constant 229.0 6.038 Mean 0.1300E-01 0.2214E-02 Sigma 0.9560E-01 0.2308E-02

cm counts

0

200

400

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

83 3195 0.1771E-01 0.1548 2.000 4.000 3189.

23.43 / 1 Constant 473.6 17.99 Mean 0.3131E-02 0.1023E-02 Sigma 0.2601E-01 0.1257E-02

cm counts

Residuals on ISIM

0

100

200

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

33 3476 0.6750E-01

0.2487 41.00 43.00 3392.

20.40 / 11 Constant 213.2 6.564 Mean 0.6859E-01 0.2525E-02 Sigma 0.8863E-01 0.3261E-02

cm counts

0

100

200

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

43 3476 -0.1197E-02 0.2400 69.00 99.00 3308.

29.56 / 12 Constant 221.9 6.615 Mean -0.3514E-02 0.2203E-02 Sigma 0.8469E-01 0.2578E-02

cm counts

0

100

200

300

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

13 3476 0.1944E-01

0.1991 14.00 28.00 3434.

22.74 / 11 Constant 267.3 7.281 Mean 0.1652E-01 0.1984E-02 Sigma 0.8058E-01 0.2229E-02

cm counts

0

100

200

300

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

23 3476 0.1370E-01 0.1863 20.00 33.00 3423.

16.38 / 8 Constant 302.6 8.911 Mean 0.9926E-02 0.1707E-02 Sigma 0.6488E-01 0.2061E-02

cm counts

Residuals on Φ angle

0

50

100

150

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10013 1148 -0.5486E-01

0.6220 8.000 9.000 1131.

29.83 / 8 Constant 150.5 7.057 Mean -0.1019 0.9315E-02 Sigma 0.2570 0.1060E-01

Φ_{det}-Φ_{fit} (deg.)

counts

0

100

200

300

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10023 1220 0.2325E-01 0.4425 5.000 4.000 1211.

10.33 / 3 Constant 308.4 12.04 Mean -0.2733E-02 0.4756E-02 Sigma 0.1402 0.4059E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0 50 100 150 200

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10033 3195 0.5222 1.320 34.00 42.00 3119.

46.91 / 17 Constant 164.0 5.096 Mean 0.5637 0.1464E-01 Sigma 0.5591 0.1809E-01

Φ_{det}-Φ_{fit} (deg.)

counts

0

50

100

150

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10043 3476 0.5357 1.618 117.0 150.0 3209.

28.95 / 21 Constant 122.8 3.785 Mean 0.5944 0.2210E-01 Sigma 0.7659 0.2843E-01

Φ_{det}-Φ_{fit} (deg.)

counts