Residuals on Drift Chambers

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

501 41302 0.1859E-01 0.2784 974.0 947.0 0.3938E+05 132.0 / 11 Constant 3024. 25.08 Mean 0.2181E-01 0.7611E-03 Sigma 0.1009 0.8861E-03

cm counts

0 1000

2000

3000

4000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

601 41302 -0.2351E-01 1.714 175.0 521.0 0.4061E+05 163.0 / 15 Constant 3848. 26.78 Mean -0.2983E-02 0.5403E-02 Sigma 0.9657 0.5067E-02

cm counts

0 1000

2000

3000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

701 41302 0.1063E-01 0.2584 738.0 731.0 0.3983E+05 172.6 / 6 Constant 4043. 35.87 Mean -0.9616E-03 0.5706E-03 Sigma 0.6791E-01 0.6838E-03

cm counts

0 2000

4000

6000

8000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

801 41302 0.1675E-01 0.1850 333.0 314.0 0.4066E+05 5.257 / 1 Constant 9197. 82.00 Mean 0.5012E-02 0.2059E-03 Sigma 0.2632E-01 0.2154E-03

cm counts

Residuals on Drift Chambers

0

2000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

502 45431 0.5100E-02 0.2378 691.0 594.0 0.4415E+05 318.0 / 11 Constant 4212. 31.16 Mean 0.5689E-02 0.5109E-03 Sigma 0.8450E-01 0.5346E-03

cm counts

0

1000

2000

3000

4000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

602 45431 -0.2935E-01 1.707 369.0 331.0 0.4473E+05 112.9 / 15 Constant 3762. 25.16 Mean -0.8312E-03 0.6232E-02 Sigma 1.102 0.6188E-02

cm counts

0

2000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

702 44064 0.9150E-02 0.2214 470.0 461.0 0.4313E+05 77.90 / 6 Constant 5043. 39.92 Mean 0.4047E-02 0.4965E-03 Sigma 0.6593E-01 0.5672E-03

cm counts

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

802 23786 0.5588E-02 0.2078 205.0 190.0 0.2339E+05 177.6 / 7 Constant 2995. 31.09 Mean 0.4776E-02 0.5220E-03 Sigma 0.6156E-01 0.5609E-03

cm counts

Residuals on OSIM

0

2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

53 116934 0.9756E-03

0.2663 985.0 1053.

0.1149E+06 210.0 / 11 Constant 7611. 39.43 Mean -0.2463E-03 0.3793E-03 Sigma 0.8190E-01 0.4488E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

63 116934 -0.5511E-02 0.3142 7716. 6680.

0.1025E+06 163.4 / 11 Constant 5278. 32.09 Mean -0.8651E-03 0.5737E-03 Sigma 0.9690E-01 0.8005E-03

cm counts

0

5000

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

73 116934 0.3524E-02

0.2211 432.0 380.0 0.1161E+06 163.1 / 5 Constant 0.1177E+05 64.42 Mean 0.3172E-02 0.2480E-03 Sigma 0.4931E-01 0.3089E-03

cm counts

0 5000

10000

15000

20000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

83 116934 0.1340E-01 0.1736 230.0 434.0 0.1163E+06 9.245 / 1 Constant 0.2291E+05 127.9 Mean 0.3465E-02 0.1148E-03 Sigma 0.2279E-01 0.1303E-03

cm counts

Residuals on ISIM

0

2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

33 127695 0.5898E-03

0.2879 2663. 2683.

0.1223E+06 78.34 / 9 Constant 7597. 41.23 Mean 0.7900E-03 0.4200E-03 Sigma 0.8010E-01 0.5511E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

43 127695 -0.5048E-02 0.3241 9020. 7691.

0.1110E+06 176.0 / 11 Constant 5537. 32.89 Mean -0.9662E-03 0.5584E-03 Sigma 0.9669E-01 0.7780E-03

cm counts

0

5000

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

13 127695 0.7517E-02

0.2361 1141. 1171.

0.1254E+06 207.4 / 5 Constant 0.1196E+05 64.94 Mean 0.4299E-02 0.2496E-03 Sigma 0.4974E-01 0.3139E-03

cm counts

0

5000

10000

15000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

23 127695 0.1117E-01 0.2057 1365. 1749.

0.1246E+06 988.8 / 5 Constant 0.1359E+05 72.43 Mean 0.5922E-02 0.2103E-03 Sigma 0.4577E-01 0.2606E-03

cm counts

Residuals on Φ angle

0

2000

4000

6000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10013 41302 0.4153E-01

0.8797 447.0 446.0 0.4041E+05 364.8 / 8 Constant 4930. 39.08 Mean 0.4642E-01 0.1674E-02 Sigma 0.2576 0.1778E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

5000

10000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10023 45431 0.4441E-02 0.5559 103.0 83.00 0.4524E+05 303.8 / 3 Constant 0.1150E+05 81.42 Mean 0.7851E-02 0.7099E-03 Sigma 0.1272 0.6766E-03

Φ_{det}-Φ_{fit} (deg.)

counts

0

2000

4000

6000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10033 116934 -0.1688E-02

1.517 2969. 2694.

0.1113E+06 87.52 / 13 Constant 5746. 31.05 Mean 0.3951E-02 0.2714E-02 Sigma 0.5238 0.3472E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

2000

4000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10043 127696 0.6205E-02 1.731 7685. 7609.

0.1124E+06 78.37 / 15 Constant 4443. 25.30 Mean 0.7953E-02 0.3937E-02 Sigma 0.6687 0.5691E-02

Φ_{det}-Φ_{fit} (deg.)

counts