Residuals on Drift Chambers

0

1000

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

501 28646 0.2234E-01 0.2202 359.0 360.0 0.2793E+05 100.8 / 11 Constant 2324. 22.05 Mean 0.2208E-01 0.8480E-03 Sigma 0.9908E-01 0.9720E-03

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

601 28646 -0.9698E-02 1.481 94.00 311.0 0.2824E+05 124.9 / 15 Constant 2999. 24.25 Mean 0.4668E-02 0.5715E-02 Sigma 0.8900 0.5098E-02

cm counts

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

701 28646 0.1158E-01 0.2023 286.0 274.0 0.2809E+05 118.0 / 6 Constant 3018. 30.80 Mean -0.9988E-03 0.6760E-03 Sigma 0.6884E-01 0.8111E-03

cm counts

0

2000

4000

6000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

801 28646 0.1829E-01 0.1412 137.0 144.0 0.2836E+05 0.8564 / 1 Constant 7274. 73.24 Mean 0.4833E-02 0.2218E-03 Sigma 0.2540E-01 0.2233E-03

cm counts

Residuals on Drift Chambers

0

1000

2000

3000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

502 31755 0.4684E-02 0.1764 301.0 230.0 0.3122E+05 249.9 / 11 Constant 3273. 27.66 Mean 0.6392E-02 0.5651E-03 Sigma 0.8239E-01 0.5801E-03

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

602 31755 -0.3728E-02 1.476 230.0 178.0 0.3135E+05 100.7 / 15 Constant 2842. 22.10 Mean 0.5665E-02 0.6820E-02 Sigma 1.047 0.6464E-02

cm counts

0 1000

2000

3000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

702 30930 0.9894E-02 0.1627 187.0 212.0 0.3053E+05 46.48 / 6 Constant 3894. 35.04 Mean 0.4519E-02 0.5581E-03 Sigma 0.6509E-01 0.6244E-03

cm counts

0

1000

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

802 15518 0.9857E-02 0.1562 93.00 91.00 0.1533E+05 115.3 / 7 Constant 2168. 26.50 Mean 0.5326E-02 0.5983E-03 Sigma 0.6010E-01 0.6257E-03

cm counts

Residuals on OSIM

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

53 85283 0.3112E-03

0.2415 443.0 460.0 0.8438E+05 207.4 / 11 Constant 5887. 34.89 Mean -0.6925E-03 0.4236E-03 Sigma 0.8075E-01 0.4985E-03

cm counts

0

2000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

63 85283 -0.1306E-02 0.2597 2410. 2503.

0.8037E+05 153.6 / 11 Constant 4917. 31.22 Mean -0.4470E-03 0.5493E-03 Sigma 0.9170E-01 0.7275E-03

cm counts

0

2500

5000

7500

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

73 85283 0.5579E-02

0.1992 174.0 164.0 0.8494E+05 104.9 / 5 Constant 8972. 56.17 Mean 0.2383E-02 0.2819E-03 Sigma 0.4912E-01 0.3490E-03

cm counts

0

5000

10000

15000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

83 85283 0.1361E-01 0.1544 96.00 204.0 0.8498E+05 4.221 / 1 Constant 0.1790E+05 113.4 Mean 0.3543E-02 0.1257E-03 Sigma 0.2220E-01 0.1386E-03

cm counts

Residuals on ISIM

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

33 93051 0.2168E-02

0.2662 1468. 1529.

0.9005E+05 67.87 / 9 Constant 5866. 36.38 Mean 0.1419E-02 0.4698E-03 Sigma 0.7912E-01 0.6123E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

43 93051 -0.4011E-03 0.2732 3037. 2981.

0.8703E+05 167.3 / 11 Constant 5156. 32.01 Mean -0.6368E-03 0.5332E-03 Sigma 0.9131E-01 0.7041E-03

cm counts

0

2500

5000

7500

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

13 93051 0.9839E-02

0.2161 599.0 630.0 0.9182E+05 160.4 / 5 Constant 9174. 56.97 Mean 0.3905E-02 0.2810E-03 Sigma 0.4926E-01 0.3504E-03

cm counts

0

5000

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

23 93051 0.1144E-01 0.1889 798.0 1089.

0.9116E+05 833.9 / 5 Constant 0.1052E+05 64.07 Mean 0.6080E-02 0.2353E-03 Sigma 0.4521E-01 0.2902E-03

cm counts

Residuals on Φ angle

0 1000

2000

3000

4000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10013 28646 0.5385E-01

0.6458 202.0 206.0 0.2824E+05 260.6 / 8 Constant 3787. 34.41 Mean 0.4735E-01 0.1871E-02 Sigma 0.2525 0.1959E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

2500

5000

7500

10000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10023 31755 0.2602E-02 0.4295 55.00 51.00 0.3165E+05 206.2 / 3 Constant 8952. 72.27 Mean 0.8756E-02 0.7852E-03 Sigma 0.1235 0.7303E-03

Φ_{det}-Φ_{fit} (deg.)

counts

0

2000

4000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10033 85283 0.2880E-02

1.420 1460. 1295.

0.8253E+05 78.20 / 13 Constant 4458. 27.46 Mean 0.7565E-02 0.3000E-02 Sigma 0.5139 0.3778E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

1000

2000

3000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10043 93052 0.1397E-01 1.674 4353. 4452.

0.8425E+05 66.83 / 15 Constant 3444. 22.36 Mean 0.1299E-01 0.4319E-02 Sigma 0.6534 0.6113E-02

Φ_{det}-Φ_{fit} (deg.)

counts