Residuals on Drift Chambers

0

50

100

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

501 1148 0.9216E-02 0.1975 10.00 19.00 1119.

26.75 / 11 Constant 97.02 4.801 Mean 0.3584E-02 0.3694E-02 Sigma 0.9197E-01 0.4452E-02

cm counts

0

50

100

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

601 1148 -0.1634 1.489 1.000 14.00 1133.

20.12 / 15 Constant 117.5 4.591 Mean -0.1646 0.2976E-01 Sigma 0.9046 0.2407E-01

cm counts

0

50

100

150

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

701 1148 -0.1008E-01 0.1910 11.00 10.00 1127.

6.856 / 6 Constant 137.0 6.677 Mean -0.8894E-02 0.2565E-02 Sigma 0.6051E-01 0.2792E-02

cm counts

0

100

200

300

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

801 1148 0.1839E-01 0.1286 6.000 4.000 1138.

1.382 / 1 Constant 354.6 16.62 Mean 0.3347E-02 0.8800E-03 Sigma 0.2284E-01 0.8235E-03

cm counts

Residuals on Drift Chambers

0

50

100

150

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

502 1220 0.1248E-01 0.1595 11.00 16.00 1193.

21.28 / 11 Constant 125.5 5.375 Mean 0.9239E-02 0.2959E-02 Sigma 0.8368E-01 0.3023E-02

cm counts

0

50

100

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

602 1220 -0.6084E-01 1.430 6.000 10.00 1204.

22.51 / 15 Constant 107.1 4.269 Mean -0.8274E-01 0.3612E-01 Sigma 1.041 0.3260E-01

cm counts

0

50

100

150

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

702 1195 0.6760E-02 0.1358 9.000 10.00 1176.

5.894 / 6 Constant 155.2 6.958 Mean 0.4627E-02 0.2830E-02 Sigma 0.6595E-01 0.3200E-02

cm counts

0

50

100

150

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

802 811 -0.2858E-02 0.1357 10.00 5.000 796.0 16.04 / 7 Constant 112.7 5.911 Mean -0.2682E-02 0.2656E-02 Sigma 0.5968E-01 0.2583E-02

cm counts

Residuals on OSIM

0

100

200

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

53 3199 -0.7766E-02

0.2172 12.00 9.000 3178.

26.11 / 11 Constant 235.6 7.153 Mean -0.8088E-02 0.2042E-02 Sigma 0.7825E-01 0.2423E-02

cm counts

0

100

200

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

63 3199 0.4540E-02 0.2294 57.00 69.00 3073.

31.79 / 11 Constant 226.8 6.968 Mean 0.5324E-02 0.2118E-02 Sigma 0.7936E-01 0.2517E-02

cm counts

0 100 200 300 400

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

73 3199 -0.8607E-02

0.1684 2.000 9.000 3188.

15.78 / 5 Constant 388.7 11.96 Mean -0.4043E-02 0.1204E-02 Sigma 0.4479E-01 0.1390E-02

cm counts

0

200

400

600

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

83 3199 0.2223E-01 0.1439 2.000 5.000 3192.

4.766 / 1 Constant 650.6 21.33 Mean 0.4331E-02 0.7034E-03 Sigma 0.2256E-01 0.7494E-03

cm counts

Residuals on ISIM

0

100

200

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

33 3480 0.1504E-01

0.2455 47.00 39.00 3394.

15.87 / 9 Constant 234.1 7.427 Mean 0.1190E-01 0.2351E-02 Sigma 0.7779E-01 0.3092E-02

cm counts

0

100

200

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

43 3480 0.5634E-02 0.2405 68.00 100.0 3312.

26.22 / 11 Constant 230.3 7.047 Mean 0.5315E-02 0.2144E-02 Sigma 0.8068E-01 0.2625E-02

cm counts

0 100 200 300 400

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

13 3480 0.1464E-02

0.1961 12.00 26.00 3442.

20.03 / 5 Constant 389.0 12.06 Mean -0.1050E-02 0.1229E-02 Sigma 0.4563E-01 0.1477E-02

cm counts

0

200

400

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

23 3480 0.1765E-01 0.1771 21.00 34.00 3425.

32.84 / 5 Constant 402.1 12.48 Mean 0.7067E-02 0.1207E-02 Sigma 0.4514E-01 0.1474E-02

cm counts

Residuals on Φ angle

0

50

100

150

200

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10013 1148 0.5283E-01

0.6191 8.000 9.000 1131.

23.14 / 8 Constant 157.1 7.165 Mean 0.4263E-02 0.8656E-02 Sigma 0.2426 0.9061E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

100

200

300

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10023 1220 0.3778E-01 0.4371 5.000 4.000 1211.

3.043 / 3 Constant 347.1 13.74 Mean 0.1146E-01 0.4042E-02 Sigma 0.1255 0.3537E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0 50 100 150 200

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10033 3199 0.5278E-01

1.315 34.00 35.00 3130.

24.52 / 13 Constant 177.9 5.541 Mean 0.5946E-01 0.1452E-01 Sigma 0.4975 0.1782E-01

Φ_{det}-Φ_{fit} (deg.)

counts

0

50

100

150

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10043 3480 0.1103 1.622 125.0 122.0 3233.

17.09 / 15 Constant 139.2 4.586 Mean 0.9296E-01 0.2025E-01 Sigma 0.6191 0.2759E-01

Φ_{det}-Φ_{fit} (deg.)

counts