Residuals on Drift Chambers

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

501 53709 0.1927E-01 0.3246 1849. 1810.

0.5005E+05 139.9 / 11 Constant 3312. 25.88 Mean 0.2133E-01 0.7933E-03 Sigma 0.1077 0.9723E-03

cm counts

0

2000

4000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

601 53709 -0.2123E-01 1.866 363.0 755.0 0.5259E+05 205.4 / 15 Constant 4716. 29.31 Mean -0.6572E-03 0.5060E-02 Sigma 1.005 0.4872E-02

cm counts

0

2000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

701 53709 0.1493E-01 0.2968 1354. 1384.

0.5097E+05 163.1 / 6 Constant 4509. 37.41 Mean -0.5359E-03 0.5843E-03 Sigma 0.7182E-01 0.7310E-03

cm counts

0 2500

5000

7500

10000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

801 53709 0.1530E-01 0.2226 682.0 649.0 0.5238E+05 6.134 / 1 Constant 0.1013E+05 85.37 Mean 0.4673E-02 0.2098E-03 Sigma 0.2782E-01 0.2322E-03

cm counts

Residuals on Drift Chambers

0

2000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

502 59838 0.6509E-02 0.2928 1828. 1699.

0.5631E+05 329.5 / 11 Constant 4677. 32.29 Mean 0.5728E-02 0.5177E-03 Sigma 0.8983E-01 0.5661E-03

cm counts

0

2000

4000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

602 59838 -0.4855E-01 1.950 724.0 629.0 0.5848E+05 139.8 / 15 Constant 4662. 27.85 Mean -0.6852E-02 0.5801E-02 Sigma 1.139 0.5950E-02

cm counts

0

2000

4000

6000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

702 57846 0.1026E-01 0.2743 1303. 1354.

0.5519E+05 88.37 / 6 Constant 5608. 41.68 Mean 0.4076E-02 0.5062E-03 Sigma 0.6944E-01 0.6029E-03

cm counts

0

1000

2000

3000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

802 31856 0.2589E-02 0.2654 672.0 618.0 0.3057E+05 175.4 / 7 Constant 3362. 32.34 Mean 0.4065E-02 0.5260E-03 Sigma 0.6535E-01 0.5878E-03

cm counts

Residuals on OSIM

0 2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

53 146222 0.5673E-03

0.3006 2156. 2282.

0.1418E+06 230.0 / 11 Constant 8184. 40.53 Mean -0.2431E-03 0.3918E-03 Sigma 0.8632E-01 0.4869E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

63 146222 -0.5586E-02 0.3424 0.1185E+05 0.1038E+05 0.1240E+06 162.0 / 11 Constant 5740. 33.25 Mean -0.8509E-03 0.5804E-03 Sigma 0.1005 0.8367E-03

cm counts

0

5000

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

73 146222 0.5048E-02

0.2510 973.0 1023.

0.1442E+06 182.3 / 5 Constant 0.1273E+05 66.57 Mean 0.3112E-02 0.2542E-03 Sigma 0.5168E-01 0.3316E-03

cm counts

0

10000

20000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

83 146222 0.1209E-01 0.2006 610.0 883.0 0.1447E+06 7.496 / 1 Constant 0.2554E+05 134.4 Mean 0.3262E-02 0.1144E-03 Sigma 0.2370E-01 0.1353E-03

cm counts

Residuals on ISIM

0 2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

33 159618 0.9125E-03

0.3194 4710. 4657.

0.1503E+06 93.17 / 9 Constant 8171. 42.57 Mean 0.7706E-03 0.4330E-03 Sigma 0.8390E-01 0.5966E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

43 159618 -0.5101E-02 0.3514 0.1366E+05 0.1180E+05 0.1342E+06 185.4 / 11 Constant 6018. 34.09 Mean -0.9451E-03 0.5680E-03 Sigma 0.1006 0.8219E-03

cm counts

0

5000

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

13 159618 0.8225E-02

0.2635 2019. 2237.

0.1554E+06 210.6 / 5 Constant 0.1291E+05 66.98 Mean 0.4120E-02 0.2555E-03 Sigma 0.5205E-01 0.3352E-03

cm counts

0

5000

10000

15000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

23 159618 0.9984E-02 0.2314 2319. 2801.

0.1545E+06 974.0 / 5 Constant 0.1473E+05 74.32 Mean 0.5768E-02 0.2171E-03 Sigma 0.4840E-01 0.2800E-03

cm counts

Residuals on Φ angle

0

2000

4000

6000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10013 53709 0.4227E-01

1.036 884.0 877.0 0.5195E+05 417.6 / 8 Constant 5376. 39.82 Mean 0.4388E-01 0.1755E-02 Sigma 0.2796 0.1952E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

5000

10000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10023 59838 0.1087E-01 0.7715 387.0 275.0 0.5918E+05 364.3 / 3 Constant 0.1276E+05 84.19 Mean 0.7684E-02 0.7169E-03 Sigma 0.1360 0.7165E-03

Φ_{det}-Φ_{fit} (deg.)

counts

0

2000

4000

6000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10033 146222 0.9245E-03

1.685 5497. 5122.

0.1356E+06 106.4 / 13 Constant 6174. 32.02 Mean 0.4096E-02 0.2810E-02 Sigma 0.5506 0.3787E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

2000

4000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10043 159619 0.6006E-02 1.867 0.1268E+05 0.1255E+05 0.1344E+06 80.35 / 15 Constant 4783. 26.14 Mean 0.7308E-02 0.4044E-02 Sigma 0.6970 0.6099E-02

Φ_{det}-Φ_{fit} (deg.)

counts