Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3112 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2121 1 0.000 0.000 0.000 1.000 0.000

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3121 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 1 2 3 4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2122 32 0.1116 0.4810 1.000 2.000 29.00 3.124 / 8 Constant 1.335 0.5045 Mean -0.5050E-01 0.4585 Sigma 0.4728 1.154

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3122 32 1.289 2.428 0.000 0.000 32.00 5.199 / 10 Constant 1.687 0.6508 Mean 1.040 0.6640 Sigma 1.673 1.269

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3212 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3312 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

0

1

2

3

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2411 37 -0.6895E-01 0.3844 3.000 3.000 31.00 1.843 / 8 Constant 22.31 61.63 Mean 2.264 0.7178 Sigma 1.016 0.6699

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3411 37 1.904 1.400 0.000 3.000 34.00 7.663 / 12 Constant 1.718 0.7557 Mean 1.483 1.568 Sigma 2.880 3.866

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3412 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3512 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2521 35 -0.1450 0.3172 2.000 3.000 30.00 6.000 / 9 Constant 1.387 5.122 Mean 1.745 63.64 Sigma 6.580 181.2

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3521 35 1.588 1.934 1.000 0.000 34.00 4.954 / 10 Constant 3.302 1.071 Mean 1.432 0.3065 Sigma 1.071 0.4644

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2522 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3522 1 -0.6250 0.000 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.6250 20.11 Sigma 1.375 0.5834

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3612 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3622 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3712 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2811 2 0.000 0.000 0.000 2.000 0.000

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3811 2 0.000 0.000 0.000 0.000 2.000

cm counts

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2812 30 0.1832 0.3513 1.000 0.000 29.00 4.098 / 4 Constant 58.23 225.4 Mean 2.402 0.8858 Sigma 0.9056 0.4602

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3812 30 1.458 2.068 0.000 0.000 30.00 3.997 / 8 Constant 3.096 1.157 Mean 1.037 0.3809 Sigma 0.9870 0.7126

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3822 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 1

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 48 0.4130E-01

0.1322 0.000 2.000 46.00 13.24 / 10 Constant 8.039 2.169 Mean 0.3773E-01 0.5464E-02 Sigma 0.2855E-01 0.6163E-02

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 48 -0.2263E-01 0.2377 2.000 8.000 38.00 6.461 / 10 Constant 1.997 0.5148 Mean -0.1551E-01 0.1956 Sigma 0.2138 0.2291

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 1 -0.1000E-01 0.2137E-10

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.1121E-02 Mean -0.7070E-02 0.8575 Sigma 7.909 0.3963E+09

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 1 -0.7000E-01 0.6527E-09 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.8912E-02 Mean -0.8839E-01 2.928 Sigma 4.522 0.2718E+08

cm counts

Residuals on OSIM - module 2

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 12 0.3583 0.3023 0.000 0.000 12.00 0.6667 / 1 Constant 1.341 8.416 Mean 0.3990 154.2 Sigma 3.043 2.649

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 12 -0.7000E-01 0.1261 2.000 2.000 8.000 0.1532E-03/ 1 Constant 1.004 0.7274 Mean 0.4000E-01 2.875 Sigma 0.6974 3.209

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 1 0.000 0.000 0.000 0.000 1.000

cm counts

Residuals on OSIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 0 0.000 0.000 0.000 0.000 0.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 5 -0.4200 0.3270 1.000 0.000 4.000 -0.2000E+05/ -2 Constant 1.000 0.1814E-01 Mean -0.9241E-01 12.84 Sigma 6.978 0.2605E+08

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 5 -0.5000E-01 0.1424 0.000 2.000 3.000 -0.2000E+05/ -2 Constant 1.000 0.2465E-01 Mean 0.1071 19.59 Sigma 6.788 0.5089E+09

cm counts

Residuals on OSIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 0 0.000 0.000 0.000 0.000 0.000

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 35 -0.7364E-01

0.2164 2.000 0.000 33.00 5.697 / 7 Constant 5.117 1.494 Mean -0.4640E-01 0.9936E-02 Sigma 0.3874E-01 0.1095E-01

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 35 -0.5154E-01 0.2364 2.000 7.000 26.00 3.559 / 8 Constant 1.608 0.7563 Mean -0.8842E-02 0.1086 Sigma 0.1761 0.2159

cm counts

Residuals on OSIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 0 0.000 0.000 0.000 0.000 0.000

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 7 -0.3857E-01

0.1582 0.000 0.000 7.000 0.1995 / 1 Constant 12.13 93.70 Mean 0.3374 0.3897 Sigma 0.1837 0.3567

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 7 -0.2443 0.3253 0.000 0.000 7.000 0.000 / 0 Constant 1.027 0.6366 Mean 0.3294E-01 1.129 Sigma 0.4163 2.526

cm counts

Residuals on OSIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

911 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

921 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

912 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

922 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 10

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1011 2 -0.6000E-01 0.1000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.623 18.14 Mean -0.6000E-01 0.9421E-02 Sigma 0.1016E-01 0.1173

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1021 2 -0.6000E-01 0.3000E-01 0.000 0.000 2.000 -9999. / -1 Constant 1.346 15.05 Mean -0.6000E-01 0.3580E-01 Sigma 0.3893E-01 0.7331

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1012 1 -0.7000E-01 0.6527E-09

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.8912E-02 Mean -0.8839E-01 2.928 Sigma 4.522 0.2718E+08

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1022 1 -0.9000E-01 0.8430E-09 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.7138E-02 Mean -0.1170 2.768 Sigma 6.505 0.3675E+09

cm counts

Residuals on ISIM - module 1

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1111 48 -0.8565E-01

0.1713 2.000 0.000 46.00 5.858 / 10 Constant 5.883 1.523 Mean -0.6219E-01 0.9416E-02 Sigma 0.4994E-01 0.1148E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1121 48 -0.5162E-01 0.1821 3.000 8.000 37.00 3.190 / 7 Constant 162.5 261.1 Mean -2.036 3.788 Sigma 0.6848 0.2060

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1112 2 -0.4000E-01 0.7000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.303 14.58 Mean -0.4000E-01 0.9345E-01 Sigma 0.9615E-01 2.029

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1122 2 0.4000E-01 0.3000E-01 0.000 0.000 2.000 -9999. / -1 Constant 1.346 13.75 Mean 0.4000E-01 0.3573E-01 Sigma 0.3893E-01 0.7331

cm counts

Residuals on ISIM - module 2

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1211 9 -0.4867 0.3428 3.000 0.000 6.000 -9999. / -1 Constant 1.346 15.05 Mean -0.1600 0.3648E-01 Sigma 0.3893E-01 0.7331

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1221 9 -0.3043 0.2390 0.000 2.000 7.000 -0.2000E+05/ -2 Constant 1.000 0.4967E-03 Mean 0.3775E-01 0.6635 Sigma 21.17 0.1715E+07

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1212 2 -0.5300 0.3400 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.6888E-02 Mean -0.1343 6.501 Sigma 12.42 0.9246E+05

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1222 2 0.000 0.000 0.000 1.000 1.000

cm counts

Residuals on ISIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 4

0

0.5

1

1.5

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1411 2 0.1100 0.2000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.386 15.47 Mean 0.1100 0.3387E-01 Sigma 0.2474E-01 0.4229

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1421 2 0.6000E-01 0.5000E-01 0.000 0.000 2.000 -9999. / -1 Constant 1.317 14.73 Mean 0.6000E-01 0.6427E-01 Sigma 0.6739E-01 1.369

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1412 9 0.3950 0.3538 0.000 1.000 8.000 0.000 / 0 Constant 7.298 57.87 Mean 0.9033 1.659 Sigma 0.4413 1.595

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1422 9 0.1250 0.1899 0.000 1.000 8.000 0.1941 / 2 Constant 22.96 108.4 Mean 2.389 1.015 Sigma 0.9396 0.9511

cm counts

Residuals on ISIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1521 0 0.000 0.000 0.000 0.000 0.000

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1512 40 0.4846E-01

0.1735 0.000 1.000 39.00 11.66 / 9 Constant 6.618 2.685 Mean 0.5271E-01 0.1044E-01 Sigma 0.2656E-01 0.1898E-01

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1522 40 -0.5424E-01 0.3218 1.000 6.000 33.00 2.989 / 9 Constant 1.552 0.4578 Mean -0.6764E-03 0.2658 Sigma 0.2381 0.3836

cm counts

Residuals on ISIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1621 0 0.000 0.000 0.000 0.000 0.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1612 6 -0.1000E-01

0.2355 0.000 0.000 6.000 0.1040E-03/ 1 Constant 1.004 0.6097 Mean -0.1926E-07 1.904 Sigma 0.4692 13.16

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1622 6 -0.2033 0.3883 0.000 0.000 6.000 -9999. / -1 Constant 1.309 14.64 Mean 0.2300 0.7956E-01 Sigma 0.8174E-01 1.697

cm counts

Residuals on ISIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 8

0

1

2

3

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1811 5 -0.4200E-01 0.4118E-01

0.000 0.000 5.000 0.6210E-01/ 1 Constant 45.57 197.4 Mean -0.9372 0.8379 Sigma 0.3356 0.2093

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1821 5 0.4600E-01 0.1582 0.000 0.000 5.000 0.000 / 0 Constant 55.89 254.0 Mean -2.144 2.269 Sigma 0.8297 0.6008

cm counts

0

1

2

3

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1812 5 -0.3800E-01 0.4665E-01

0.000 0.000 5.000 0.1984 / 1 Constant 16.61 86.64 Mean 0.8913 0.5645 Sigma 0.4083 0.5185

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1822 5 -0.1000E-01 0.8390E-01 0.000 0.000 5.000 0.3893 / 1 Constant 1.238 1.863 Mean -0.9910E-02 0.4406 Sigma 0.2341 0.9372

cm counts