Residuals on Drift Ch. - module 1

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2111 216 0.4744E-01 0.3372 15.00 30.00 171.0 16.18 / 17 Constant 11.97 1.606 Mean 0.2323E-01 0.1097E-01 Sigma 0.1014 0.1104E-01

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3111 216 0.8034 1.100 1.000 2.000 213.0 31.89 / 16 Constant 23.63 3.256 Mean 0.7504 0.5996E-01 Sigma 0.7330 0.8692E-01

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2112 2 0.6250E-01 0.6177E-09 1.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.6016E-02 Mean 0.5314E-01 0.9903 Sigma 2.743 0.4430E+09

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3112 2 4.125 0.2500 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 3.875 20.11 Sigma 1.375 0.5834

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3212 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

0 2 4 6 8

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2221 155 -0.5602E-01 0.4232 15.00 5.000 135.0 9.265 / 15 Constant 4.654 0.7127 Mean 0.6499E-01 0.1639 Sigma 0.3505 0.2838

cm counts

0

5

10

15

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3221 155 2.278 1.686 1.000 0.000 154.0 20.68 / 15 Constant 13.14 1.685 Mean 2.317 0.9785E-01 Sigma 0.9360 0.1041

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2222 5 0.6250E-01 0.6177E-09 4.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.6016E-02 Mean 0.5314E-01 0.9903 Sigma 2.743 0.4430E+09

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3222 5 0.000 0.000 2.000 2.000 1.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3312 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3412 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2511 2 0.000 0.000 2.000 0.000 0.000

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3511 2 0.000 0.000 0.000 0.000 2.000

cm counts

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2512 204 -0.7014E-01 0.3367 10.00 14.00 180.0 14.14 / 16 Constant 9.247 1.097 Mean -0.9003E-01 0.2612E-01 Sigma 0.1505 0.2389E-01

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3512 204 1.636 1.568 0.000 0.000 204.0 12.77 / 17 Constant 17.42 1.742 Mean 1.412 0.8428E-01 Sigma 1.023 0.7635E-01

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3612 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2621 3 0.000 0.000 1.000 0.000 2.000

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3621 3 -1.375 0.000 1.000 1.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -1.375 20.11 Sigma 1.375 0.5834

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2622 232 -0.8182E-01 0.2804 12.00 13.00 207.0 26.74 / 16 Constant 12.29 1.590 Mean -0.7064E-01 0.1849E-01 Sigma 0.1113 0.1581E-01

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3622 232 1.297 1.493 1.000 1.000 230.0 9.514 / 18 Constant 21.02 1.937 Mean 1.202 0.7280E-01 Sigma 0.9917 0.6484E-01

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3712 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3812 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3822 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 1

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 2 -0.2300 0.1800 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 0.6825E+08 0.1080E+10 Mean -0.5000E-01 0.3348E-02 Sigma 0.6202E-09 0.2723E-09

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 2 0.2900 0.2600 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.4967E-03 Mean 0.3775E-01 0.6635 Sigma 21.17 0.1715E+07

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 15 0.5533E-01

0.4624 0.000 0.000 15.00 0.3742 / 2 Constant 1.267 0.8220 Mean -0.3373E-01 0.2129 Sigma 0.2271 0.4924

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 15 0.2600E-01 0.4406 2.000 3.000 10.00 0.000 / 0 Constant 1.004 0.5775 Mean 0.5000E-01 1.851 Sigma 0.1774 0.3575E+07

cm counts

Residuals on OSIM - module 2

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 4

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

411 140 -0.1328E-01

0.2241 5.000 1.000 134.0 32.76 / 15 Constant 5.864 1.378 Mean -0.3289E-01 0.1778E-01 Sigma 0.1040 0.2831E-01

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

421 140 -0.5618E-01 0.2985 9.000 8.000 123.0 20.14 / 15 Constant 8.619 1.646 Mean -0.2534E-01 0.1267E-01 Sigma 0.6236E-01 0.1407E-01

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

412 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

422 1 0.000 0.000 0.000 0.000 1.000

cm counts

Residuals on OSIM - module 5

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 268 -0.6346E-01

0.2202 1.000 4.000 263.0 44.40 / 16 Constant 31.06 3.770 Mean -0.6735E-01 0.3355E-02 Sigma 0.4284E-01 0.4101E-02

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 268 -0.3568E-01 0.2712 18.00 7.000 243.0 23.92 / 17 Constant 11.92 1.707 Mean -0.6310E-01 0.7014E-01 Sigma 0.1428 0.5833E-01

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 18 -0.8444E-01

0.2286 0.000 0.000 18.00 1.457 / 5 Constant 2.431 1.398 Mean -0.2861E-01 0.6689E-01 Sigma 0.8157E-01 0.1207

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 18 -0.5714E-01 0.1358 2.000 2.000 14.00 2.459 / 5 Constant 1.548 0.7255 Mean -0.1822E-02 0.9303E-01 Sigma 0.1518 0.1702

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 3 0.000 0.000 0.000 1.000 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 3 0.000 0.000 1.000 1.000 1.000

cm counts

Residuals on OSIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

911 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

921 0 0.000 0.000 0.000 0.000 0.000

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

912 137 -0.1559E-01

0.2425 1.000 0.000 136.0 22.95 / 16 Constant 9.096 1.743 Mean -0.1154E-01 0.8890E-02 Sigma 0.7093E-01 0.1225E-01

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

922 137 -0.8194E-01 0.3158 8.000 5.000 124.0 7.841 / 14 Constant 6.406 6.328 Mean -0.8865E-01 0.2643 Sigma 0.1487 0.1209

cm counts

Residuals on OSIM - module 10

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1011 2 0.2500 0.1400 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.1522E-01 Mean 0.8104E-01 5.211 Sigma 4.495 0.1797E+08

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1021 2 0.3000E-01 0.1936E-09 0.000 1.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.4967E-03 Mean 0.3775E-01 0.6635 Sigma 21.17 0.1715E+07

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1012 242 0.2083E-02

0.2292 0.000 2.000 240.0 52.41 / 17 Constant 27.93 4.890 Mean -0.1466E-01 0.3825E-02 Sigma 0.4016E-01 0.6550E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1022 242 -0.2714E-01 0.2868 9.000 9.000 224.0 31.51 / 17 Constant 11.28 1.597 Mean -0.2312E-01 0.2367E-01 Sigma 0.1126 0.2674E-01

cm counts

Residuals on ISIM - module 1

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1111 8 -0.1175 0.4011 0.000 0.000 8.000 0.1480E-03/ 1 Constant 1.005 0.9676 Mean -0.1766 5.536 Sigma 1.151 27.48

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1121 8 0.2714E-01 0.2932 0.000 1.000 7.000 0.1729E-04/ 1 Constant 1.002 0.5000 Mean 0.7981E-01 23.43 Sigma 0.7305 0.6728E+06

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1112 33 -0.7813E-01

0.3205 1.000 0.000 32.00 3.133 / 7 Constant 52.17 193.5 Mean -4.153 2.144 Sigma 1.513 0.5296

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1122 33 0.9483E-01 0.3713 1.000 3.000 29.00 1.821 / 6 Constant 2.295 0.9310 Mean 0.2401E-01 0.3702E-01 Sigma 0.8221E-01 0.6301E-01

cm counts

Residuals on ISIM - module 2

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 3

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1311 97 0.3602E-01

0.2303 1.000 3.000 93.00 17.86 / 14 Constant 4.875 1.114 Mean 0.3372E-01 0.1838E-01 Sigma 0.9229E-01 0.2324E-01

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1321 97 -0.3619E-01 0.3402 7.000 6.000 84.00 8.498 / 11 Constant 8.076 1.868 Mean -0.1718E-01 0.9391E-02 Sigma 0.5099E-01 0.1202E-01

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1312 4 -0.1750 0.2696 0.000 0.000 4.000 -0.2000E+05/ -2 Constant 1.000 0.5459E-02 Mean -0.1059 5.247 Sigma 12.66 0.1198E+06

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1322 4 0.2100 0.3447 0.000 0.000 4.000 -9999. / -1 Constant 1.299 14.53 Mean 0.1900 0.1085 Sigma 0.1106 2.367

cm counts

Residuals on ISIM - module 4

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1411 297 0.3048E-01

0.2307 5.000 2.000 290.0 56.58 / 17 Constant 29.80 6.132 Mean 0.3432E-01 0.3702E-02 Sigma 0.4349E-01 0.8987E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1421 297 -0.2726E-01 0.2899 18.00 9.000 270.0 26.58 / 19 Constant 14.61 1.792 Mean -0.2752E-01 0.2079E-01 Sigma 0.1027 0.2106E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1412 10 0.1200E-01

0.3370 0.000 0.000 10.00 0.4629E-01/ 3 Constant 1.999 1.033 Mean 0.5000E-01 0.4676E-01 Sigma 0.1107 0.5963E-01

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1422 10 -0.1889E-01 0.4111 0.000 1.000 9.000 0.1475E-04/ 1 Constant 1.002 0.5003 Mean -0.1500E-01 4.803 Sigma 0.6940 184.8

cm counts

Residuals on ISIM - module 5

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1511 36 0.9971E-01

0.1627 1.000 0.000 35.00 6.741 / 9 Constant 2.408 0.9326 Mean 0.1665 0.2943 Sigma 0.1894 0.2980

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1521 36 -0.2438E-01 0.2340 2.000 2.000 32.00 4.075 / 11 Constant 5180. 9574. Mean -3.710 0.6902 Sigma 0.9253 0.1617

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1512 4 -0.1167 0.1761 1.000 0.000 3.000 -0.2000E+05/ -2 Constant 1.000 0.2313E-01 Mean 0.9156E-01 13.81 Sigma 5.977 0.1267E+08

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1522 4 0.3100 0.2200 2.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.1875E-01 Mean 0.1157 8.559 Sigma 4.344 0.2697E+08

cm counts

Residuals on ISIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1622 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 7

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1711 2 -0.7000E-01 0.6000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.309 14.64 Mean -0.7000E-01 0.7878E-01 Sigma 0.8174E-01 1.697

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1721 2 0.000 0.000 0.000 0.000 2.000

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1712 109 0.2170E-01

0.2808 0.000 3.000 106.0 16.59 / 16 Constant 6.539 1.284 Mean -0.1008E-01 0.1226E-01 Sigma 0.8392E-01 0.1416E-01

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1722 109 -0.7122E-01 0.3083 7.000 4.000 98.00 11.39 / 13 Constant 14.52 17.63 Mean -0.6709 0.5096 Sigma 0.4026 0.1527

cm counts

Residuals on ISIM - module 8

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1811 2 0.000 0.000 0.000 0.000 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1821 2 0.000 0.000 0.000 1.000 1.000

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1812 267 -0.1083E-01

0.2155 2.000 0.000 265.0 42.12 / 17 Constant 25.42 3.705 Mean -0.1418E-01 0.4063E-02 Sigma 0.5113E-01 0.6360E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1822 267 -0.3867E-01 0.3100 8.000 10.00 249.0 18.81 / 19 Constant 11.62 1.292 Mean -0.3998E-01 0.3405E-01 Sigma 0.1290 0.2678E-01

cm counts