Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3112 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3212 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

0

5

10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2311 217 -0.3690E-01 0.3840 33.00 17.00 167.0 18.67 / 16 Constant 10.69 13.45 Mean -0.4114 0.6638 Sigma 0.3072 0.2552

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3311 217 1.518 1.812 0.000 48.00 169.0 25.29 / 19 Constant 12.44 1.495 Mean 1.417 0.9748E-01 Sigma 1.068 0.9686E-01

cm counts

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2312 3 0.7917E-01 0.2552 0.000 0.000 3.000 -9999. / -1 Constant 1.284 14.34 Mean -0.7500E-01 0.2300 Sigma 0.2301 5.160

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3312 3 3.500 2.125 0.000 1.000 2.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 1.375 20.11 Sigma 1.375 0.5834

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3412 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2421 286 -0.1072 0.3298 29.00 30.00 227.0 38.57 / 15 Constant 14.86 11.34 Mean -0.6024 0.4988 Sigma 0.4427 0.1890

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3421 286 0.7099 1.965 7.000 5.000 274.0 13.75 / 18 Constant 21.20 1.844 Mean 0.7658 0.7964E-01 Sigma 1.117 0.7455E-01

cm counts

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2422 6 0.3313 0.5345 0.000 2.000 4.000 -9999. / -1 Constant 1.346 15.05 Mean -0.2000 0.4560E-01 Sigma 0.4866E-01 0.9163

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3422 6 3.375 5.071 0.000 2.000 4.000 0.000 / 0 Constant 1.005 0.5389 Mean 0.5444 1.408 Sigma 3.841 1.414

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3512 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3612 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3622 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2711 1 0.2125 0.8334E-09 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 0.1197E+08 2.000 Mean 0.1488 1.414 Sigma 0.8334E-09 1.414

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3711 1 2.625 0.000 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 2.625 20.11 Sigma 1.375 0.5834

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2712 266 0.5905E-01 0.2957 14.00 13.00 239.0 22.88 / 17 Constant 12.92 1.239 Mean 0.8401E-01 0.2339E-01 Sigma 0.1421 0.1664E-01

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3712 266 1.134 1.590 0.000 1.000 265.0 40.51 / 19 Constant 29.47 2.964 Mean 1.091 0.5495E-01 Sigma 0.6888 0.4997E-01

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3812 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2821 2 0.1625 0.1053E-08 0.000 1.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.1762E-01 Mean 0.1159 5.352 Sigma 5.091 0.1519E+09

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3821 2 2.875 0.000 0.000 1.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 2.875 20.11 Sigma 1.375 0.5834

cm counts

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2822 237 0.7949E-01 0.4640 15.00 16.00 206.0 25.15 / 17 Constant 10.60 1.228 Mean 0.2044E-01 0.1220E-01 Sigma 0.1156 0.1013E-01

cm counts

0

5

10

15

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3822 237 1.141 1.786 1.000 1.000 235.0 22.55 / 19 Constant 13.56 1.286 Mean 1.232 0.1272 Sigma 1.446 0.1192

cm counts

Residuals on OSIM - module 1

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 61 -0.7852E-01

0.3206 0.000 0.000 61.00 11.02 / 12 Constant 2.636 0.6660 Mean 0.1366E-01 0.4099E-01 Sigma 0.1263 0.6650E-01

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 61 -0.1316E-01 0.2853 3.000 1.000 57.00 10.34 / 16 Constant 2.267 0.6506 Mean 0.5421E-01 0.9319E-01 Sigma 0.1671 0.1360

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 2

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 322 0.3739E-01

0.2429 0.000 0.000 322.0 24.28 / 16 Constant 26.44 2.474 Mean 0.3360E-01 0.4856E-02 Sigma 0.6956E-01 0.5014E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 322 -0.4756E-01 0.3213 21.00 22.00 279.0 39.34 / 19 Constant 14.41 7.511 Mean -0.1769 0.8673 Sigma 0.1948 0.1324

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 2 0.2000E-01 0.5000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.317 14.73 Mean 0.2000E-01 0.6427E-01 Sigma 0.6739E-01 1.369

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 2 -0.1300 0.1400 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.6191E-03 Mean 0.7084E-02 0.7293 Sigma 10.18 0.2456E+07

cm counts

Residuals on OSIM - module 3

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 193 0.3926E-01

0.2278 0.000 3.000 190.0 29.04 / 17 Constant 19.91 2.819 Mean 0.1184E-01 0.4792E-02 Sigma 0.4886E-01 0.5343E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 193 -0.7972E-01 0.3375 5.000 11.00 177.0 15.18 / 16 Constant 10.24 1.543 Mean -0.3468E-01 0.1468E-01 Sigma 0.7533E-01 0.1374E-01

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 1 0.1500 0.9740E-09

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.2465E-01 Mean 0.1071 19.59 Sigma 6.788 0.5089E+09

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 1 -0.3000E-01 0.1062E-09 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.3647E-02 Mean -0.3788E-01 1.195 Sigma 4.595 0.6278E+08

cm counts

Residuals on OSIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 0 0.000 0.000 0.000 0.000 0.000

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 18 -0.1100 0.2182 0.000 0.000 18.00 1.578 / 4 Constant 2.138 0.9294 Mean -0.4556E-01 0.6370E-01 Sigma 0.1158 0.1251

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 18 -0.3533E-01 0.3243 1.000 2.000 15.00 0.6909 / 5 Constant 1.454 1.004 Mean 0.1030 0.1046 Sigma 0.1802 0.2411

cm counts

Residuals on OSIM - module 7

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 1 0.000 0.000 0.000 0.000 1.000

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 339 -0.5509E-01

0.2134 0.000 1.000 338.0 28.85 / 17 Constant 28.47 2.971 Mean -0.2990E-01 0.4519E-02 Sigma 0.6742E-01 0.5769E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 339 -0.1818E-01 0.2871 12.00 24.00 303.0 37.79 / 19 Constant 13.91 1.978 Mean -0.9106E-01 0.5800E-01 Sigma 0.1466 0.3630E-01

cm counts

Residuals on OSIM - module 8

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 1 -0.9000E-01 0.8430E-09

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.7138E-02 Mean -0.1170 2.768 Sigma 6.505 0.3675E+09

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 1 0.000 0.000 0.000 0.000 1.000

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 186 -0.2707E-01

0.2686 1.000 1.000 184.0 32.70 / 17 Constant 16.19 2.766 Mean -0.8256E-01 0.5831E-02 Sigma 0.5145E-01 0.7810E-02

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 186 0.6352E-02 0.3643 12.00 15.00 159.0 19.71 / 17 Constant 5.557 2.454 Mean -0.9114E-01 0.2035 Sigma 0.1904 0.1162

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

911 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

921 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

912 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

922 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 10

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1011 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1021 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1012 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1022 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 1

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1111 176 0.3389E-01

0.2584 0.000 1.000 175.0 16.68 / 17 Constant 15.05 1.945 Mean -0.5679E-02 0.5927E-02 Sigma 0.6281E-01 0.5825E-02

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1121 176 -0.6516E-01 0.3322 9.000 6.000 161.0 8.486 / 16 Constant 8.760 4.267 Mean -0.1058 0.1695 Sigma 0.1688 0.8076E-01

cm counts

0

2

4

6

8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1112 8 0.3250E-01

0.4476 0.000 0.000 8.000 0.000 / 0 Constant 7.207 11.21 Mean -0.7001E-01 0.3000E-01 Sigma 0.3019E-01 0.6007E-01

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1122 8 -0.7857E-01 0.2416 0.000 1.000 7.000 0.7333E-04/ 2 Constant 1.005 0.1218 Mean 0.1803 16.01 Sigma 1.509 227.2

cm counts

Residuals on ISIM - module 2

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1211 367 -0.6632E-01

0.2486 2.000 1.000 364.0 29.59 / 17 Constant 31.81 3.103 Mean -0.5538E-01 0.4048E-02 Sigma 0.6080E-01 0.4743E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1221 367 -0.4667E-01 0.3278 22.00 27.00 318.0 37.23 / 17 Constant 0.1123E+06 0.2697E+05 Mean -3.603 0.2052 Sigma 0.8295 0.4578E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1212 12 -0.1083 0.3487 0.000 0.000 12.00 0.3510 / 2 Constant 1.338 1.030 Mean -0.3549E-01 0.1220 Sigma 0.1612 0.2710

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1222 12 0.1136 0.4587 1.000 0.000 11.00 0.4055 / 3 Constant 1.195 0.6618 Mean 0.1862E-02 0.2374 Sigma 0.2000 0.5398

cm counts

Residuals on ISIM - module 3

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1311 68 -0.1503 0.2616 2.000 0.000 66.00 11.03 / 12 Constant 3.127 0.8581 Mean -0.1715 0.1428 Sigma 0.1545 0.1148

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1321 68 -0.6710E-01 0.3209 4.000 2.000 62.00 4.777 / 10 Constant 0.3792E+05 0.1942E+05 Mean -4.255 0.5260 Sigma 0.9713 0.1169

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1312 2 0.000 0.000 0.000 0.000 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1322 2 -0.1100 0.8687E-09 0.000 1.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.8759E-02 Mean -0.1430 3.397 Sigma 6.505 0.3005E+09

cm counts

Residuals on ISIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 5

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1511 4 0.9500E-01

0.1291 0.000 0.000 4.000 0.000 / 0 Constant 1.004 0.5774 Mean 0.2075E-01 4.337 Sigma 0.4813 0.1358E+07

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1521 4 0.2033 0.1934 1.000 0.000 3.000 -0.2000E+05/ -2 Constant 1.000 0.8912E-02 Mean -0.8839E-01 2.928 Sigma 4.522 0.2718E+08

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1512 128 0.9048E-01

0.2498 0.000 3.000 125.0 20.17 / 15 Constant 7.453 1.404 Mean 0.5377E-01 0.1081E-01 Sigma 0.7249E-01 0.1345E-01

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1522 128 -0.4232E-01 0.2932 6.000 10.00 112.0 8.481 / 10 Constant 7.961 1.856 Mean -0.8204E-01 0.1059 Sigma 0.1102 0.7290E-01

cm counts

Residuals on ISIM - module 6

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1611 4 0.7000E-01 0.3742E-01

0.000 0.000 4.000 0.2098E-03/ 1 Constant 1.009 0.5842 Mean 0.8558E-01 1.013 Sigma 0.2720 0.7273

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1621 4 0.1167 0.4714E-01 0.000 1.000 3.000 -9999. / -1 Constant 2.090 7.726 Mean 0.1310 0.6573 Sigma 0.6656E-01 0.7005

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1612 386 0.3265E-01

0.2403 1.000 0.000 385.0 49.02 / 17 Constant 31.06 3.435 Mean 0.3159E-01 0.4282E-02 Sigma 0.6423E-01 0.5999E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1622 386 -0.1047E-01 0.2947 15.00 32.00 339.0 36.96 / 19 Constant 18.30 2.935 Mean -0.1184E-01 0.1102E-01 Sigma 0.8614E-01 0.1901E-01

cm counts

Residuals on ISIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1711 1 0.000 0.000 1.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1721 1 0.000 0.000 1.000 0.000 0.000

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1712 62 -0.2273E-01

0.2923 7.000 0.000 55.00 13.58 / 14 Constant 1.723 0.5925 Mean 0.1641E-01 0.5183E-01 Sigma 0.1524 0.1012

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1722 62 0.2306E-01 0.3669 8.000 5.000 49.00 7.255 / 14 Constant 1.700 0.4750 Mean 0.1386E-01 0.1204 Sigma 0.2340 0.1990

cm counts

Residuals on ISIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1822 0 0.000 0.000 0.000 0.000 0.000

cm counts