Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3112 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2211 336 -0.5286E-01 0.3209 37.00 19.00 280.0 20.27 / 17 Constant 21.13 1.963 Mean -0.2724E-01 0.6949E-02 Sigma 0.9178E-01 0.5800E-02

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3211 336 1.529 1.695 3.000 3.000 330.0 20.87 / 19 Constant 29.67 2.565 Mean 1.314 0.6073E-01 Sigma 0.9173 0.5826E-01

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2212 3 0.000 0.000 0.000 0.000 3.000

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3212 3 1.125 1.021 0.000 0.000 3.000 0.000 / 0 Constant 1.010 0.5403 Mean 1.125 1.411 Sigma 6.930 1.414

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3312 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2321 337 0.3346E-01 0.3291 17.00 35.00 285.0 36.34 / 17 Constant 15.14 1.328 Mean 0.1033E-01 0.1201E-01 Sigma 0.1389 0.1032E-01

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3321 337 0.7807 1.704 1.000 2.000 334.0 21.53 / 17 Constant 30.51 2.631 Mean 0.7070 0.5981E-01 Sigma 0.9546 0.6683E-01

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2322 3 0.000 0.000 1.000 1.000 1.000

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3322 3 0.000 0.000 2.000 0.000 1.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3412 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3512 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3611 0 0.000 0.000 0.000 0.000 0.000

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2612 309 -0.3305E-01 0.2846 19.00 9.000 281.0 25.67 / 17 Constant 16.66 1.563 Mean -0.1363E-01 0.9421E-02 Sigma 0.1114 0.7492E-02

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3612 309 1.657 1.656 1.000 0.000 308.0 15.84 / 18 Constant 26.78 2.116 Mean 1.601 0.6971E-01 Sigma 1.028 0.5787E-01

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3622 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3712 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2721 3 -0.5000E-01 0.1125 0.000 1.000 2.000 -9999. / -1 Constant 1.295 14.48 Mean -0.5000E-01 0.1540 Sigma 0.1565 3.388

cm counts

0 0.5 1 1.5 2

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3721 3 4.875 4.596 0.000 0.000 3.000 -0.2000E+05/ -2 Constant 2.000 1.414 Mean 1.625 20.07 Sigma 1.375 0.5834

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2722 392 -0.5301E-01 0.2673 32.00 20.00 340.0 15.11 / 17 Constant 25.06 1.864 Mean -0.4338E-01 0.8040E-02 Sigma 0.1119 0.6025E-02

cm counts

0

20

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3722 392 2.022 1.965 2.000 1.000 389.0 25.22 / 18 Constant 39.03 2.660 Mean 1.758 0.4699E-01 Sigma 0.8277 0.3361E-01

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3812 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3822 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 1

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 2

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 4 -0.4450 0.2586 0.000 0.000 4.000 -0.2000E+05/ -2 Constant 1.000 0.1814E-01 Mean -0.9241E-01 12.84 Sigma 6.978 0.2605E+08

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 4 0.000 0.000 1.000 0.000 3.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 3

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 316 -0.4482E-01

0.2798 7.000 4.000 305.0 28.58 / 17 Constant 22.78 2.311 Mean -0.3425E-01 0.4957E-02 Sigma 0.6604E-01 0.4887E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 316 -0.1418E-01 0.2866 24.00 24.00 268.0 26.23 / 19 Constant 14.91 1.594 Mean -0.6138E-01 0.4508E-01 Sigma 0.1229 0.3287E-01

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 4

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

411 303 0.1202E-01

0.2571 2.000 4.000 297.0 24.26 / 17 Constant 20.08 1.969 Mean -0.2771E-01 0.5948E-02 Sigma 0.7862E-01 0.5853E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

421 303 0.2179E-01 0.3133 10.00 13.00 280.0 23.26 / 18 Constant 12.87 1.348 Mean -0.7482E-02 0.1719E-01 Sigma 0.1155 0.1558E-01

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 1 0.000 0.000 0.000 0.000 1.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 0 0.000 0.000 0.000 0.000 0.000

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 7 -0.3380 0.3154 1.000 1.000 5.000 -9999. / -1 Constant 1.328 14.85 Mean -0.1000E-01 0.4991E-01 Sigma 0.5313E-01 1.048

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 7 0.2900 0.4301 0.000 3.000 4.000 -0.2000E+05/ -2 Constant 1.000 0.1522E-01 Mean 0.8104E-01 5.211 Sigma 4.495 0.1797E+08

cm counts

Residuals on OSIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 0 0.000 0.000 0.000 0.000 0.000

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 316 -0.4366E-01

0.2412 6.000 4.000 306.0 18.70 / 16 Constant 20.59 1.964 Mean -0.2142E-01 0.6193E-02 Sigma 0.8210E-01 0.6236E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 316 -0.8369E-02 0.2948 17.00 17.00 282.0 27.14 / 19 Constant 13.48 2.216 Mean -0.9678E-01 0.6767E-01 Sigma 0.1697 0.3559E-01

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

911 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

921 0 0.000 0.000 0.000 0.000 0.000

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

912 292 -0.2691E-01

0.2715 2.000 5.000 285.0 41.02 / 17 Constant 17.95 2.816 Mean -0.2869E-01 0.6852E-02 Sigma 0.7416E-01 0.1077E-01

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

922 292 -0.1383E-01 0.2813 19.00 17.00 256.0 21.77 / 18 Constant 14.85 1.614 Mean -0.6428E-01 0.5082E-01 Sigma 0.1276 0.3409E-01

cm counts

Residuals on OSIM - module 10

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1011 1 0.000 0.000 0.000 1.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1021 1 0.000 0.000 0.000 1.000 0.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1012 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1022 1 0.000 0.000 0.000 0.000 1.000

cm counts

Residuals on ISIM - module 1

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 2

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1211 122 0.5232E-01

0.3045 4.000 6.000 112.0 26.64 / 15 Constant 4.462 4.033 Mean 0.4498E-01 0.1972E-01 Sigma 0.8790E-01 0.4215E-01

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1221 122 -0.3990E-01 0.2395 8.000 9.000 105.0 8.743 / 13 Constant 0.5660E+07 0.2273E+07 Mean -7.914 0.4558 Sigma 1.493 0.8460E-01

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1212 4 0.6333E-01

0.4309 1.000 0.000 3.000 -0.2000E+05/ -2 Constant 1.000 0.6888E-02 Mean -0.1343 6.501 Sigma 12.42 0.9246E+05

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1222 4 -0.7000E-01 0.2400 1.000 1.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.2300E-01 Mean 0.1212 13.53 Sigma 5.091 0.3679E+05

cm counts

Residuals on ISIM - module 3

0 10 20 30 40 50

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1311 471 -0.1039E-01

0.2559 3.000 4.000 464.0 39.47 / 17 Constant 30.31 2.339 Mean -0.9890E-02 0.5078E-02 Sigma 0.8075E-01 0.4627E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1321 471 0.1897E-02 0.3279 21.00 23.00 427.0 15.16 / 19 Constant 20.26 2.190 Mean -0.8036E-01 0.5046E-01 Sigma 0.1666 0.2927E-01

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1312 7 -0.1214 0.1700 0.000 0.000 7.000 0.2102E-04/ 2 Constant 1.004 0.7388 Mean -0.7487E-01 3.265 Sigma 1.154 0.7372

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1322 7 -0.8200E-01 0.2405 1.000 1.000 5.000 0.000 / 0 Constant 1.012 0.9145 Mean 0.1169 2.527 Sigma 0.6824 19.84

cm counts

Residuals on ISIM - module 4

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1411 56 -0.2258E-07

0.3837 7.000 1.000 48.00 6.153 / 13 Constant 1.597 0.5084 Mean 0.2688E-01 0.6842E-01 Sigma 0.1694 0.1129

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1421 56 0.8265E-01 0.3411 2.000 5.000 49.00 5.729 / 14 Constant 1.259 0.3500 Mean 0.6685E-03 0.4222 Sigma 0.4235 0.8875

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1412 2 -0.3400 0.3900 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.5204E-02 Mean 0.3593E-01 2.475 Sigma 6.233 0.5161E+08

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1422 2 0.4300 0.3800 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.5204E-02 Mean 0.3593E-01 2.475 Sigma 6.233 0.5161E+08

cm counts

Residuals on ISIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 6

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1611 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1621 1 0.000 0.000 0.000 0.000 1.000

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1612 156 0.4856E-01

0.3025 0.000 3.000 153.0 14.87 / 16 Constant 8.333 1.255 Mean 0.3733E-01 0.1301E-01 Sigma 0.9379E-01 0.1454E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1622 156 0.4489E-01 0.3049 7.000 8.000 141.0 21.66 / 16 Constant 5.846 1.295 Mean 0.4319E-01 0.2270E-01 Sigma 0.1131 0.3046E-01

cm counts

Residuals on ISIM - module 7

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1711 5 -0.3620 0.2625 0.000 0.000 5.000 -9999. / -1 Constant 1.317 14.67 Mean -0.1200 0.1113 Sigma 0.6739E-01 1.368

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1721 5 -0.1500 0.4424 0.000 0.000 5.000 -9999. / -1 Constant 1.623 16.97 Mean 0.6000E-01 0.9421E-02 Sigma 0.1016E-01 0.1173

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1712 411 0.5250E-02

0.2686 6.000 5.000 400.0 29.53 / 17 Constant 23.28 2.085 Mean 0.3229E-02 0.6379E-02 Sigma 0.9032E-01 0.6914E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1722 411 0.3595E-02 0.3214 22.00 33.00 356.0 24.00 / 19 Constant 20.49 5.240 Mean -0.1156 0.9379E-01 Sigma 0.1530 0.4647E-01

cm counts

Residuals on ISIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1821 0 0.000 0.000 0.000 0.000 0.000

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1812 61 -0.3667E-01

0.3553 3.000 1.000 57.00 5.787 / 12 Constant 2.874 0.8839 Mean 0.1370E-01 0.3088E-01 Sigma 0.1144 0.5134E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1822 61 0.3462E-02 0.3177 4.000 5.000 52.00 11.60 / 13 Constant 2.146 0.7927 Mean -0.9061E-01 0.3843 Sigma 0.2668 0.3371

cm counts