Residuals on Straw Tubes (LOST)

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 833 -0.7617E-02 0.2796E-01

42.00 7.000 784.0 26.58 / 19 Constant 57.19 2.993 Mean -0.4996E-02 0.8558E-03 Sigma 0.1993E-01 0.8714E-03

cm counts

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 833 -0.7681E-02 0.2647E-01 52.00 3.000 778.0 27.52 / 19 Constant 56.62 2.938 Mean -0.5104E-02 0.8809E-03 Sigma 0.2018E-01 0.8770E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 833 -0.3242E-02 0.2887E-01

26.00 5.000 802.0 27.96 / 19 Constant 70.59 3.436 Mean -0.8192E-03 0.6633E-03 Sigma 0.1647E-01 0.5514E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 833 -0.4335E-02 0.2727E-01 32.00 1.000 800.0 37.20 / 19 Constant 72.10 3.584 Mean -0.6026E-03 0.6597E-03 Sigma 0.1593E-01 0.5496E-03

cm counts

Residuals on Straw Tubes (RIST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 833 -0.6059E-02 0.4562E-01

74.00 8.000 751.0 13.26 / 19 Constant 39.92 2.253 Mean -0.4245E-02 0.1350E-02 Sigma 0.2585E-01 0.1558E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 503 -0.7559E-02 0.4964E-01 50.00 9.000 444.0 23.16 / 19 Constant 25.09 1.905 Mean -0.7422E-02 0.1500E-02 Sigma 0.2190E-01 0.1549E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 833 -0.5005E-02 0.4382E-01

55.00 14.00 764.0 20.58 / 19 Constant 43.65 2.419 Mean 0.4204E-03 0.1086E-02 Sigma 0.2276E-01 0.1132E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 402 -0.4611E-02 0.5027E-01 35.00 7.000 360.0 21.67 / 19 Constant 18.97 1.614 Mean -0.2343E-02 0.1779E-02 Sigma 0.2418E-01 0.2066E-02

cm counts

Residuals on Straw Tubes (LEST)

0 10 20 30 40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 833 -0.6275E-02 0.5020E-01

66.00 12.00 755.0 15.02 / 19 Constant 35.54 2.096 Mean -0.4996E-02 0.1599E-02 Sigma 0.2758E-01 0.1918E-02

cm counts

0 5 10 15 20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 398 -0.1258E-01 0.4783E-01 46.00 5.000 347.0 12.21 / 19 Constant 17.00 1.421 Mean -0.4250E-02 0.2237E-02 Sigma 0.2682E-01 0.2485E-02

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 833 -0.5723E-02 0.4528E-01

62.00 5.000 766.0 11.67 / 19 Constant 44.03 2.474 Mean -0.1580E-02 0.1116E-02 Sigma 0.2311E-01 0.1222E-02

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 833 -0.5398E-02 0.5864E-01 16.00 704.0 113.0 19.88 / 19 Constant 3.144 0.5832 Mean -0.1283E-01 0.1716E-01 Sigma 0.4120E-01 0.9226E-01

cm counts

Z Residuals on Straw Tubes

0

20

40

-10 -5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 833 0.1235 1.589 0.000 0.000 833.0 62.49 / 37 Constant 39.84 1.774 Mean 0.1414 0.5805E-01 Sigma 1.542 0.4314E-01

cm counts

0

20

40

-10 -5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 833 -0.2399 1.686 0.000 1.000 832.0 35.58 / 36 Constant 39.52 1.774 Mean -0.1524 0.6078E-01 Sigma 1.606 0.4872E-01

cm counts

Residuals on Drift Chambers

0

5

10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 223 -0.1077 0.4091 19.00 10.00 194.0 27.80 / 17 Constant 7.628 4.119 Mean -0.2359 0.2607 Sigma 0.2545 0.1172

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 223 1.645 1.227 0.000 51.00 172.0 25.34 / 15 Constant 19.15 2.759 Mean 1.397 0.6638E-01 Sigma 0.7237 0.9123E-01

cm counts

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 291 0.6567E-01 0.2889 9.000 14.00 268.0 17.92 / 16 Constant 15.06 1.466 Mean 0.8073E-01 0.1677E-01 Sigma 0.1372 0.1581E-01

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 291 1.137 1.675 0.000 1.000 290.0 17.22 / 19 Constant 27.21 2.314 Mean 1.222 0.6006E-01 Sigma 0.9253 0.5443E-01

cm counts

Residuals on Drift Chambers

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 329 -0.6010E-01 0.3170 20.00 17.00 292.0 46.39 / 17 Constant 13.91 1.494 Mean -0.2958E-01 0.1570E-01 Sigma 0.1252 0.1311E-01

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 329 1.265 1.524 5.000 2.000 322.0 17.75 / 19 Constant 29.84 2.447 Mean 1.298 0.5822E-01 Sigma 0.9642 0.5725E-01

cm counts

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 235 0.3209E-01 0.2927 8.000 10.00 217.0 20.44 / 17 Constant 13.83 1.375 Mean 0.3169E-01 0.1084E-01 Sigma 0.1166 0.8670E-02

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 235 1.420 2.028 0.000 0.000 235.0 19.59 / 19 Constant 14.89 1.532 Mean 1.366 0.1089 Sigma 1.318 0.1214

cm counts

Residuals on OSIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 669 0.3843E-01

0.2519 3.000 4.000 662.0 60.31 / 17 Constant 45.38 3.738 Mean 0.2356E-01 0.3844E-02 Sigma 0.7550E-01 0.5434E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 669 -0.1949E-01 0.2788 35.00 44.00 590.0 13.77 / 13 Constant 33.27 2.476 Mean -0.2135E-01 0.6807E-02 Sigma 0.9696E-01 0.8474E-02

cm counts

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 619 -0.3127E-01

0.2478 4.000 1.000 614.0 56.26 / 17 Constant 43.62 3.491 Mean -0.3829E-01 0.3969E-02 Sigma 0.7588E-01 0.5303E-02

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 619 -0.2180E-01 0.2826 28.00 40.00 551.0 14.23 / 13 Constant 30.63 2.337 Mean -0.3711E-01 0.8608E-02 Sigma 0.1000 0.9881E-02

cm counts

Residuals on ISIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 733 -0.4465E-01

0.2564 11.00 4.000 718.0 48.62 / 17 Constant 48.76 3.209 Mean -0.4164E-01 0.3947E-02 Sigma 0.7878E-01 0.4169E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 733 -0.1985E-01 0.2769 36.00 45.00 652.0 11.22 / 13 Constant 37.05 2.496 Mean -0.2190E-01 0.6415E-02 Sigma 0.9682E-01 0.7254E-02

cm counts

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 676 0.2601E-01

0.2537 8.000 6.000 662.0 55.26 / 17 Constant 44.85 3.281 Mean 0.2513E-01 0.3922E-02 Sigma 0.7731E-01 0.4657E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 676 -0.2116E-01 0.2885 32.00 40.00 604.0 11.63 / 13 Constant 33.27 2.442 Mean -0.2761E-01 0.7506E-02 Sigma 0.9932E-01 0.9012E-02

cm counts